\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             0.960000 &              0.965714 &                   0.965714 &       0.977143 &                          0.902857 &                0.805714 &             0.845714 &                  0.891429 &          0.885714 &           0.885714 &                   0.645714 &               0.891429 &                 0.942857 &                 0.977143 &           0.977143 &           0.937143 &                 0.960000 &         0.965714 &           0.897143 \\
0.010 &                             0.903315 &              0.944751 &                   0.941989 &       0.947514 &                          0.817680 &                0.732044 &             0.732044 &                  0.781768 &          0.787293 &           0.776243 &                   0.621547 &               0.790055 &                 0.908840 &                 0.947514 &           0.972376 &           0.941989 &                 0.947514 &         0.958564 &           0.798343 \\
0.015 &                             0.829457 &              0.945736 &                   0.939922 &       0.947674 &                          0.746124 &                0.635659 &             0.653101 &                  0.703488 &          0.707364 &           0.697674 &                   0.567829 &               0.695736 &                 0.868217 &                 0.916667 &           0.949612 &           0.934109 &                 0.939922 &         0.953488 &           0.718992 \\
0.020 &                             0.820598 &              0.943522 &                   0.938538 &       0.946844 &                          0.712625 &                0.601329 &             0.624585 &                  0.667774 &          0.666113 &           0.664452 &                   0.544850 &               0.666113 &                 0.855482 &                 0.903654 &           0.946844 &           0.926910 &                 0.928571 &         0.951827 &           0.679402 \\
0.025 &                             0.817073 &              0.942073 &                   0.937500 &       0.948171 &                          0.689024 &                0.570122 &             0.606707 &                  0.646341 &          0.637195 &           0.640244 &                   0.532012 &               0.652439 &                 0.847561 &                 0.897866 &           0.945122 &           0.919207 &                 0.920732 &         0.949695 &           0.657012 \\
0.030 &                             0.814159 &              0.939528 &                   0.935103 &       0.943953 &                          0.675516 &                0.556047 &             0.604720 &                  0.632743 &          0.625369 &           0.631268 &                   0.529499 &               0.644543 &                 0.839233 &                 0.890855 &           0.939528 &           0.918879 &                 0.920354 &         0.946903 &           0.650442 \\
0.035 &                             0.811404 &              0.938596 &                   0.934211 &       0.942982 &                          0.672515 &                0.554094 &             0.602339 &                  0.630117 &          0.622807 &           0.628655 &                   0.527778 &               0.641813 &                 0.837719 &                 0.890351 &           0.938596 &           0.918129 &                 0.918129 &         0.945906 &           0.647661 \\
0.040 &                             0.809593 &              0.938953 &                   0.934593 &       0.941860 &                          0.670058 &                0.553779 &             0.601744 &                  0.629360 &          0.622093 &           0.629360 &                   0.527616 &               0.642442 &                 0.835756 &                 0.888081 &           0.938953 &           0.918605 &                 0.917151 &         0.946221 &           0.646802 \\
0.045 &                             0.809593 &              0.938953 &                   0.934593 &       0.941860 &                          0.670058 &                0.553779 &             0.601744 &                  0.629360 &          0.622093 &           0.629360 &                   0.527616 &               0.642442 &                 0.835756 &                 0.888081 &           0.938953 &           0.918605 &                 0.917151 &         0.946221 &           0.646802 \\
0.050 &                             0.808696 &              0.937681 &                   0.933333 &       0.940580 &                          0.669565 &                0.553623 &             0.601449 &                  0.628986 &          0.621739 &           0.628986 &                   0.527536 &               0.642029 &                 0.834783 &                 0.886957 &           0.937681 &           0.917391 &                 0.915942 &         0.946377 &           0.646377 \\
0.055 &                             0.808696 &              0.937681 &                   0.933333 &       0.940580 &                          0.669565 &                0.553623 &             0.601449 &                  0.628986 &          0.621739 &           0.628986 &                   0.527536 &               0.642029 &                 0.834783 &                 0.886957 &           0.937681 &           0.917391 &                 0.915942 &         0.946377 &           0.646377 \\
0.060 &                             0.809249 &              0.937861 &                   0.933526 &       0.940751 &                          0.667630 &                0.553468 &             0.602601 &                  0.627168 &          0.619942 &           0.628613 &                   0.527457 &               0.641618 &                 0.833815 &                 0.887283 &           0.937861 &           0.917630 &                 0.916185 &         0.946532 &           0.644509 \\
0.065 &                             0.808081 &              0.937951 &                   0.933622 &       0.940837 &                          0.666667 &                0.552670 &             0.601732 &                  0.626263 &          0.619048 &           0.627706 &                   0.526696 &               0.640693 &                 0.832612 &                 0.886003 &           0.937951 &           0.917749 &                 0.914863 &         0.946609 &           0.643579 \\
0.070 &                             0.805755 &              0.936691 &                   0.932374 &       0.938129 &                          0.664748 &                0.551079 &             0.600000 &                  0.625899 &          0.618705 &           0.625899 &                   0.526619 &               0.641727 &                 0.831655 &                 0.884892 &           0.935252 &           0.915108 &                 0.912230 &         0.945324 &           0.641727 \\
0.075 &                             0.806034 &              0.936782 &                   0.932471 &       0.938218 &                          0.663793 &                0.550287 &             0.599138 &                  0.625000 &          0.619253 &           0.626437 &                   0.527299 &               0.642241 &                 0.831897 &                 0.885057 &           0.935345 &           0.915230 &                 0.912356 &         0.945402 &           0.642241 \\
0.080 &                             0.806034 &              0.936782 &                   0.932471 &       0.938218 &                          0.663793 &                0.550287 &             0.599138 &                  0.625000 &          0.619253 &           0.626437 &                   0.527299 &               0.642241 &                 0.831897 &                 0.885057 &           0.935345 &           0.915230 &                 0.912356 &         0.945402 &           0.642241 \\
0.085 &                             0.806034 &              0.936782 &                   0.932471 &       0.938218 &                          0.663793 &                0.550287 &             0.599138 &                  0.625000 &          0.619253 &           0.626437 &                   0.527299 &               0.642241 &                 0.831897 &                 0.885057 &           0.935345 &           0.915230 &                 0.912356 &         0.945402 &           0.642241 \\
0.090 &                             0.806034 &              0.936782 &                   0.932471 &       0.938218 &                          0.663793 &                0.550287 &             0.599138 &                  0.625000 &          0.619253 &           0.626437 &                   0.527299 &               0.642241 &                 0.831897 &                 0.885057 &           0.935345 &           0.915230 &                 0.912356 &         0.945402 &           0.642241 \\
0.095 &                             0.806034 &              0.936782 &                   0.932471 &       0.938218 &                          0.663793 &                0.550287 &             0.599138 &                  0.625000 &          0.619253 &           0.626437 &                   0.527299 &               0.642241 &                 0.831897 &                 0.885057 &           0.935345 &           0.915230 &                 0.912356 &         0.945402 &           0.642241 \\
0.100 &                             0.806034 &              0.936782 &                   0.932471 &       0.938218 &                          0.663793 &                0.550287 &             0.599138 &                  0.625000 &          0.619253 &           0.626437 &                   0.527299 &               0.642241 &                 0.831897 &                 0.885057 &           0.935345 &           0.915230 &                 0.912356 &         0.945402 &           0.642241 \\
0.105 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.110 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.115 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.120 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.125 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.130 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.135 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.140 &                             0.806313 &              0.936872 &                   0.932568 &       0.936872 &                          0.662841 &                0.550933 &             0.599713 &                  0.624103 &          0.619799 &           0.626973 &                   0.526542 &               0.642755 &                 0.832138 &                 0.883788 &           0.934003 &           0.915352 &                 0.912482 &         0.944046 &           0.641320 \\
0.145 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.150 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.155 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.160 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.165 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.170 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.175 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.180 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.185 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.190 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.195 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.200 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.205 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.210 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.215 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.220 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.225 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.230 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.235 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.240 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.245 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.250 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.255 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.260 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.265 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.270 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.275 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.280 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.285 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.290 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.295 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.300 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.305 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.310 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.315 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.320 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.325 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.330 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.335 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.340 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.345 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.350 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.355 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.360 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.365 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.370 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.375 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.380 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.385 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.390 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.395 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.400 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.405 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.410 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.415 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.420 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.425 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.430 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.435 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.440 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.445 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.450 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.455 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.460 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.465 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.470 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.475 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.480 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.485 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.490 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.495 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
0.500 &                             0.805158 &              0.936963 &                   0.932665 &       0.936963 &                          0.661891 &                0.551576 &             0.600287 &                  0.623209 &          0.620344 &           0.627507 &                   0.525788 &               0.643266 &                 0.830946 &                 0.882521 &           0.934097 &           0.915473 &                 0.912607 &         0.944126 &           0.641834 \\
\bottomrule
\end{tabular}
