\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             0.988571 &              0.977143 &                   0.977143 &       0.977143 &                          0.982857 &                0.960000 &             0.982857 &                  0.982857 &          0.977143 &           0.982857 &                   0.714286 &               0.977143 &                 0.977143 &                 0.982857 &           0.988571 &           0.982857 &                 0.982857 &         0.982857 &           0.982857 \\
0.010 &                             0.980663 &              0.958564 &                   0.955801 &       0.958564 &                          0.969613 &                0.944751 &             0.977901 &                  0.966851 &          0.961326 &           0.975138 &                   0.759669 &               0.975138 &                 0.975138 &                 0.977901 &           0.983425 &           0.977901 &                 0.980663 &         0.972376 &           0.980663 \\
0.015 &                             0.976744 &              0.959302 &                   0.955426 &       0.959302 &                          0.947674 &                0.905039 &             0.968992 &                  0.955426 &          0.939922 &           0.959302 &                   0.757752 &               0.965116 &                 0.967054 &                 0.968992 &           0.974806 &           0.974806 &                 0.976744 &         0.967054 &           0.965116 \\
0.020 &                             0.971761 &              0.956811 &                   0.953488 &       0.956811 &                          0.931894 &                0.885382 &             0.961794 &                  0.938538 &          0.920266 &           0.946844 &                   0.755814 &               0.955150 &                 0.960133 &                 0.965116 &           0.970100 &           0.970100 &                 0.970100 &         0.965116 &           0.948505 \\
0.025 &                             0.966463 &              0.954268 &                   0.951220 &       0.957317 &                          0.917683 &                0.859756 &             0.955793 &                  0.925305 &          0.899390 &           0.932927 &                   0.742378 &               0.948171 &                 0.957317 &                 0.963415 &           0.967988 &           0.967988 &                 0.966463 &         0.963415 &           0.934451 \\
0.030 &                             0.961652 &              0.951327 &                   0.948378 &       0.952802 &                          0.905605 &                0.848083 &             0.954277 &                  0.911504 &          0.884956 &           0.924779 &                   0.741888 &               0.941003 &                 0.954277 &                 0.958702 &           0.963127 &           0.966077 &                 0.966077 &         0.961652 &           0.930678 \\
0.035 &                             0.960526 &              0.950292 &                   0.947368 &       0.951754 &                          0.903509 &                0.846491 &             0.950292 &                  0.909357 &          0.883041 &           0.923977 &                   0.741228 &               0.940058 &                 0.953216 &                 0.957602 &           0.961988 &           0.964912 &                 0.964912 &         0.960526 &           0.928363 \\
0.040 &                             0.957849 &              0.950581 &                   0.947674 &       0.950581 &                          0.899709 &                0.845930 &             0.949128 &                  0.908430 &          0.882267 &           0.924419 &                   0.739826 &               0.940407 &                 0.952035 &                 0.956395 &           0.962209 &           0.965116 &                 0.963663 &         0.960756 &           0.927326 \\
0.045 &                             0.957849 &              0.950581 &                   0.947674 &       0.950581 &                          0.899709 &                0.845930 &             0.949128 &                  0.908430 &          0.882267 &           0.924419 &                   0.739826 &               0.940407 &                 0.952035 &                 0.956395 &           0.962209 &           0.965116 &                 0.963663 &         0.960756 &           0.927326 \\
0.050 &                             0.956522 &              0.949275 &                   0.946377 &       0.949275 &                          0.900000 &                0.844928 &             0.947826 &                  0.908696 &          0.881159 &           0.923188 &                   0.739130 &               0.939130 &                 0.950725 &                 0.955072 &           0.960870 &           0.963768 &                 0.962319 &         0.960870 &           0.926087 \\
0.055 &                             0.956522 &              0.949275 &                   0.946377 &       0.949275 &                          0.900000 &                0.844928 &             0.947826 &                  0.908696 &          0.881159 &           0.923188 &                   0.739130 &               0.939130 &                 0.950725 &                 0.955072 &           0.960870 &           0.963768 &                 0.962319 &         0.960870 &           0.926087 \\
0.060 &                             0.956647 &              0.949422 &                   0.946532 &       0.949422 &                          0.900289 &                0.843931 &             0.947977 &                  0.906069 &          0.878613 &           0.921965 &                   0.738439 &               0.937861 &                 0.949422 &                 0.955202 &           0.960983 &           0.963873 &                 0.962428 &         0.960983 &           0.924855 \\
0.065 &                             0.956710 &              0.949495 &                   0.946609 &       0.949495 &                          0.900433 &                0.844156 &             0.948052 &                  0.906205 &          0.878788 &           0.922078 &                   0.737374 &               0.937951 &                 0.949495 &                 0.955267 &           0.961039 &           0.963925 &                 0.962482 &         0.961039 &           0.924964 \\
0.070 &                             0.953957 &              0.949640 &                   0.946763 &       0.946763 &                          0.897842 &                0.841727 &             0.945324 &                  0.905036 &          0.877698 &           0.919424 &                   0.736691 &               0.938129 &                 0.948201 &                 0.953957 &           0.958273 &           0.961151 &                 0.959712 &         0.959712 &           0.922302 \\
0.075 &                             0.954023 &              0.949713 &                   0.946839 &       0.946839 &                          0.896552 &                0.840517 &             0.943966 &                  0.903736 &          0.877874 &           0.919540 &                   0.737069 &               0.938218 &                 0.948276 &                 0.954023 &           0.958333 &           0.961207 &                 0.959770 &         0.959770 &           0.922414 \\
0.080 &                             0.954023 &              0.949713 &                   0.946839 &       0.946839 &                          0.896552 &                0.840517 &             0.943966 &                  0.903736 &          0.877874 &           0.919540 &                   0.737069 &               0.938218 &                 0.948276 &                 0.954023 &           0.958333 &           0.961207 &                 0.959770 &         0.959770 &           0.922414 \\
0.085 &                             0.954023 &              0.949713 &                   0.946839 &       0.946839 &                          0.896552 &                0.840517 &             0.943966 &                  0.903736 &          0.877874 &           0.919540 &                   0.737069 &               0.938218 &                 0.948276 &                 0.954023 &           0.958333 &           0.961207 &                 0.959770 &         0.959770 &           0.922414 \\
0.090 &                             0.954023 &              0.949713 &                   0.946839 &       0.946839 &                          0.896552 &                0.840517 &             0.943966 &                  0.903736 &          0.877874 &           0.919540 &                   0.737069 &               0.938218 &                 0.948276 &                 0.954023 &           0.958333 &           0.961207 &                 0.959770 &         0.959770 &           0.922414 \\
0.095 &                             0.954023 &              0.949713 &                   0.946839 &       0.946839 &                          0.896552 &                0.840517 &             0.943966 &                  0.903736 &          0.877874 &           0.919540 &                   0.737069 &               0.938218 &                 0.948276 &                 0.954023 &           0.958333 &           0.961207 &                 0.959770 &         0.959770 &           0.922414 \\
0.100 &                             0.954023 &              0.949713 &                   0.946839 &       0.946839 &                          0.896552 &                0.840517 &             0.943966 &                  0.903736 &          0.877874 &           0.919540 &                   0.737069 &               0.938218 &                 0.948276 &                 0.954023 &           0.958333 &           0.961207 &                 0.959770 &         0.959770 &           0.922414 \\
0.105 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.110 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.115 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.120 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.125 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.130 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.135 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.140 &                             0.954089 &              0.949785 &                   0.946915 &       0.945481 &                          0.896700 &                0.840746 &             0.944046 &                  0.902439 &          0.878049 &           0.919656 &                   0.736011 &               0.938307 &                 0.948350 &                 0.952654 &           0.956958 &           0.961263 &                 0.959828 &         0.958393 &           0.921090 \\
0.145 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.150 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.155 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.160 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.165 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.170 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.175 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.180 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.185 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.190 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.195 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.200 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.205 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.210 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.215 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.220 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.225 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.230 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.235 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.240 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.245 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.250 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.255 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.260 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.265 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.270 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.275 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.280 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.285 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.290 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.295 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.300 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.305 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.310 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.315 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.320 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.325 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.330 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.335 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.340 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.345 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.350 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.355 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.360 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.365 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.370 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.375 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.380 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.385 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.390 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.395 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.400 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.405 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.410 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.415 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.420 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.425 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.430 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.435 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.440 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.445 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.450 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.455 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.460 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.465 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.470 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.475 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.480 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.485 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.490 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.495 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
0.500 &                             0.954155 &              0.949857 &                   0.946991 &       0.945559 &                          0.896848 &                0.840974 &             0.944126 &                  0.901146 &          0.878223 &           0.919771 &                   0.736390 &               0.938395 &                 0.948424 &                 0.952722 &           0.957020 &           0.961318 &                 0.959885 &         0.958453 &           0.921203 \\
\bottomrule
\end{tabular}
