\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             0.970930 &              0.988372 &                   0.988372 &       1.000000 &                          0.918605 &                0.813953 &             0.860465 &                  0.901163 &          0.901163 &           0.895349 &                   0.651163 &               0.901163 &                 0.953488 &                 0.988372 &           0.988372 &           0.953488 &                 0.976744 &         0.982558 &           0.906977 \\
0.010 &                             0.920455 &              0.985795 &                   0.985795 &       0.988636 &                          0.835227 &                0.741477 &             0.744318 &                  0.795455 &          0.801136 &           0.792614 &                   0.639205 &               0.801136 &                 0.926136 &                 0.965909 &           0.988636 &           0.963068 &                 0.965909 &         0.985795 &           0.806818 \\
0.015 &                             0.845545 &              0.986139 &                   0.986139 &       0.990099 &                          0.758416 &                0.647525 &             0.663366 &                  0.714851 &          0.718812 &           0.710891 &                   0.580198 &               0.704950 &                 0.891089 &                 0.938614 &           0.974257 &           0.958416 &                 0.960396 &         0.986139 &           0.728713 \\
0.020 &                             0.842373 &              0.986441 &                   0.986441 &       0.991525 &                          0.730508 &                0.616949 &             0.642373 &                  0.684746 &          0.686441 &           0.683051 &                   0.557627 &               0.681356 &                 0.881356 &                 0.928814 &           0.974576 &           0.954237 &                 0.952542 &         0.986441 &           0.694915 \\
0.025 &                             0.844720 &              0.987578 &                   0.986025 &       0.992236 &                          0.703416 &                0.585404 &             0.625776 &                  0.661491 &          0.658385 &           0.659938 &                   0.545031 &               0.670807 &                 0.875776 &                 0.923913 &           0.973602 &           0.947205 &                 0.948758 &         0.982919 &           0.672360 \\
0.030 &                             0.845113 &              0.986466 &                   0.984962 &       0.992481 &                          0.690226 &                0.572932 &             0.624060 &                  0.652632 &          0.648120 &           0.652632 &                   0.542857 &               0.666165 &                 0.869173 &                 0.918797 &           0.969925 &           0.945865 &                 0.948872 &         0.980451 &           0.670677 \\
0.035 &                             0.843517 &              0.986587 &                   0.985097 &       0.992548 &                          0.688525 &                0.570790 &             0.621461 &                  0.649776 &          0.645306 &           0.651267 &                   0.540984 &               0.664680 &                 0.868852 &                 0.919523 &           0.970194 &           0.946349 &                 0.947839 &         0.980626 &           0.667660 \\
0.040 &                             0.844444 &              0.986667 &                   0.985185 &       0.992593 &                          0.687407 &                0.570370 &             0.622222 &                  0.648889 &          0.644444 &           0.650370 &                   0.540741 &               0.665185 &                 0.868148 &                 0.918519 &           0.970370 &           0.946667 &                 0.948148 &         0.979259 &           0.668148 \\
0.045 &                             0.844444 &              0.986667 &                   0.985185 &       0.992593 &                          0.687407 &                0.570370 &             0.622222 &                  0.648889 &          0.644444 &           0.650370 &                   0.540741 &               0.665185 &                 0.868148 &                 0.918519 &           0.970370 &           0.946667 &                 0.948148 &         0.979259 &           0.668148 \\
0.050 &                             0.844904 &              0.986706 &                   0.985229 &       0.992614 &                          0.686854 &                0.571640 &             0.623338 &                  0.648449 &          0.644018 &           0.651403 &                   0.542097 &               0.666174 &                 0.868538 &                 0.918759 &           0.970458 &           0.946824 &                 0.948301 &         0.979321 &           0.669129 \\
0.055 &                             0.844904 &              0.986706 &                   0.985229 &       0.992614 &                          0.686854 &                0.571640 &             0.623338 &                  0.648449 &          0.644018 &           0.651403 &                   0.542097 &               0.666174 &                 0.868538 &                 0.918759 &           0.970458 &           0.946824 &                 0.948301 &         0.979321 &           0.669129 \\
0.060 &                             0.845361 &              0.986745 &                   0.985272 &       0.992636 &                          0.684831 &                0.571429 &             0.624448 &                  0.646539 &          0.642121 &           0.652430 &                   0.541973 &               0.665685 &                 0.867452 &                 0.918999 &           0.970545 &           0.946981 &                 0.948454 &         0.979381 &           0.667158 \\
0.065 &                             0.844118 &              0.986765 &                   0.985294 &       0.992647 &                          0.683824 &                0.570588 &             0.623529 &                  0.645588 &          0.641176 &           0.651471 &                   0.541176 &               0.664706 &                 0.866176 &                 0.917647 &           0.970588 &           0.947059 &                 0.947059 &         0.979412 &           0.666176 \\
0.070 &                             0.843109 &              0.985337 &                   0.983871 &       0.992669 &                          0.681818 &                0.568915 &             0.623167 &                  0.645161 &          0.640762 &           0.649560 &                   0.539589 &               0.665689 &                 0.866569 &                 0.917889 &           0.969208 &           0.945748 &                 0.945748 &         0.978006 &           0.664223 \\
0.075 &                             0.843338 &              0.985359 &                   0.983895 &       0.992679 &                          0.680820 &                0.568082 &             0.622255 &                  0.644217 &          0.641288 &           0.650073 &                   0.540264 &               0.666179 &                 0.866764 &                 0.918009 &           0.969253 &           0.945827 &                 0.945827 &         0.978038 &           0.664714 \\
0.080 &                             0.843338 &              0.985359 &                   0.983895 &       0.992679 &                          0.680820 &                0.568082 &             0.622255 &                  0.644217 &          0.641288 &           0.650073 &                   0.540264 &               0.666179 &                 0.866764 &                 0.918009 &           0.969253 &           0.945827 &                 0.945827 &         0.978038 &           0.664714 \\
0.085 &                             0.843338 &              0.985359 &                   0.983895 &       0.992679 &                          0.680820 &                0.568082 &             0.622255 &                  0.644217 &          0.641288 &           0.650073 &                   0.540264 &               0.666179 &                 0.866764 &                 0.918009 &           0.969253 &           0.945827 &                 0.945827 &         0.978038 &           0.664714 \\
0.090 &                             0.843338 &              0.985359 &                   0.983895 &       0.992679 &                          0.680820 &                0.568082 &             0.622255 &                  0.644217 &          0.641288 &           0.650073 &                   0.540264 &               0.666179 &                 0.866764 &                 0.918009 &           0.969253 &           0.945827 &                 0.945827 &         0.978038 &           0.664714 \\
0.095 &                             0.843338 &              0.985359 &                   0.983895 &       0.992679 &                          0.680820 &                0.568082 &             0.622255 &                  0.644217 &          0.641288 &           0.650073 &                   0.540264 &               0.666179 &                 0.866764 &                 0.918009 &           0.969253 &           0.945827 &                 0.945827 &         0.978038 &           0.664714 \\
0.100 &                             0.843338 &              0.985359 &                   0.983895 &       0.992679 &                          0.680820 &                0.568082 &             0.622255 &                  0.644217 &          0.641288 &           0.650073 &                   0.540264 &               0.666179 &                 0.866764 &                 0.918009 &           0.969253 &           0.945827 &                 0.945827 &         0.978038 &           0.664714 \\
0.105 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.110 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.115 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.120 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.125 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.130 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.135 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.140 &                             0.843567 &              0.985380 &                   0.983918 &       0.992690 &                          0.679825 &                0.568713 &             0.622807 &                  0.643275 &          0.641813 &           0.650585 &                   0.540936 &               0.666667 &                 0.866959 &                 0.916667 &           0.969298 &           0.945906 &                 0.945906 &         0.978070 &           0.665205 \\
0.145 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.150 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.155 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.160 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.165 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.170 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.175 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.180 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.185 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.190 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.195 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.200 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.205 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.210 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.215 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.220 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.225 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.230 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.235 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.240 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.245 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.250 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.255 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.260 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.265 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.270 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.275 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.280 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.285 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.290 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.295 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.300 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.305 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.310 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.315 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.320 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.325 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.330 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.335 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.340 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.345 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.350 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.355 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.360 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.365 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.370 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.375 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.380 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.385 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.390 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.395 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.400 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.405 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.410 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.415 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.420 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.425 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.430 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.435 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.440 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.445 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.450 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.455 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.460 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.465 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.470 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.475 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.480 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.485 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.490 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.495 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
0.500 &                             0.842336 &              0.985401 &                   0.983942 &       0.992701 &                          0.678832 &                0.569343 &             0.623358 &                  0.642336 &          0.642336 &           0.651095 &                   0.540146 &               0.667153 &                 0.865693 &                 0.915328 &           0.969343 &           0.945985 &                 0.945985 &         0.978102 &           0.665693 \\
\bottomrule
\end{tabular}
