\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             0.971429 &              0.971429 &                   0.971429 &       0.982857 &                          0.920000 &                0.817143 &             0.862857 &                  0.902857 &          0.902857 &           0.897143 &                   0.651429 &               0.902857 &                 0.954286 &                 0.988571 &           0.988571 &           0.954286 &                 0.977143 &         0.982857 &           0.908571 \\
0.010 &                             0.922652 &              0.958564 &                   0.958564 &       0.961326 &                          0.839779 &                0.748619 &             0.751381 &                  0.801105 &          0.806630 &           0.795580 &                   0.632597 &               0.806630 &                 0.928177 &                 0.966851 &           0.988950 &           0.964088 &                 0.966851 &         0.986188 &           0.812155 \\
0.015 &                             0.848837 &              0.965116 &                   0.965116 &       0.968992 &                          0.763566 &                0.653101 &             0.670543 &                  0.720930 &          0.724806 &           0.715116 &                   0.577519 &               0.711240 &                 0.893411 &                 0.939922 &           0.974806 &           0.959302 &                 0.961240 &         0.986434 &           0.734496 \\
0.020 &                             0.845515 &              0.966777 &                   0.966777 &       0.971761 &                          0.734219 &                0.621262 &             0.647841 &                  0.689369 &          0.691030 &           0.686047 &                   0.554817 &               0.686047 &                 0.883721 &                 0.930233 &           0.975083 &           0.955150 &                 0.953488 &         0.986711 &           0.699336 \\
0.025 &                             0.847561 &              0.969512 &                   0.967988 &       0.974085 &                          0.707317 &                0.589939 &             0.631098 &                  0.666159 &          0.663110 &           0.663110 &                   0.542683 &               0.675305 &                 0.878049 &                 0.925305 &           0.974085 &           0.948171 &                 0.949695 &         0.983232 &           0.676829 \\
0.030 &                             0.848083 &              0.967552 &                   0.966077 &       0.973451 &                          0.693215 &                0.578171 &             0.629794 &                  0.656342 &          0.651917 &           0.656342 &                   0.539823 &               0.671091 &                 0.871681 &                 0.920354 &           0.970501 &           0.946903 &                 0.949853 &         0.979351 &           0.674041 \\
0.035 &                             0.846491 &              0.967836 &                   0.966374 &       0.973684 &                          0.691520 &                0.576023 &             0.627193 &                  0.653509 &          0.649123 &           0.654971 &                   0.538012 &               0.669591 &                 0.871345 &                 0.921053 &           0.970760 &           0.947368 &                 0.948830 &         0.979532 &           0.671053 \\
0.040 &                             0.847384 &              0.968023 &                   0.966570 &       0.973837 &                          0.690407 &                0.575581 &             0.627907 &                  0.652616 &          0.648256 &           0.654070 &                   0.537791 &               0.670058 &                 0.870640 &                 0.920058 &           0.970930 &           0.947674 &                 0.949128 &         0.978198 &           0.671512 \\
0.045 &                             0.847384 &              0.968023 &                   0.966570 &       0.973837 &                          0.690407 &                0.575581 &             0.627907 &                  0.652616 &          0.648256 &           0.654070 &                   0.537791 &               0.670058 &                 0.870640 &                 0.920058 &           0.970930 &           0.947674 &                 0.949128 &         0.978198 &           0.671512 \\
0.050 &                             0.847826 &              0.968116 &                   0.966667 &       0.973913 &                          0.689855 &                0.576812 &             0.628986 &                  0.652174 &          0.647826 &           0.655072 &                   0.539130 &               0.671014 &                 0.871014 &                 0.920290 &           0.971014 &           0.947826 &                 0.949275 &         0.978261 &           0.672464 \\
0.055 &                             0.847826 &              0.968116 &                   0.966667 &       0.973913 &                          0.689855 &                0.576812 &             0.628986 &                  0.652174 &          0.647826 &           0.655072 &                   0.539130 &               0.671014 &                 0.871014 &                 0.920290 &           0.971014 &           0.947826 &                 0.949275 &         0.978261 &           0.672464 \\
0.060 &                             0.848266 &              0.968208 &                   0.966763 &       0.973988 &                          0.687861 &                0.576590 &             0.630058 &                  0.650289 &          0.645954 &           0.656069 &                   0.539017 &               0.670520 &                 0.869942 &                 0.920520 &           0.971098 &           0.947977 &                 0.949422 &         0.978324 &           0.670520 \\
0.065 &                             0.847042 &              0.968254 &                   0.966811 &       0.974026 &                          0.686869 &                0.575758 &             0.629149 &                  0.649351 &          0.645022 &           0.655123 &                   0.538240 &               0.669553 &                 0.868687 &                 0.919192 &           0.971140 &           0.948052 &                 0.948052 &         0.978355 &           0.669553 \\
0.070 &                             0.846043 &              0.966906 &                   0.965468 &       0.974101 &                          0.684892 &                0.574101 &             0.628777 &                  0.648921 &          0.644604 &           0.653237 &                   0.536691 &               0.670504 &                 0.869065 &                 0.919424 &           0.969784 &           0.946763 &                 0.946763 &         0.976978 &           0.667626 \\
0.075 &                             0.846264 &              0.966954 &                   0.965517 &       0.974138 &                          0.683908 &                0.573276 &             0.627874 &                  0.647989 &          0.645115 &           0.653736 &                   0.537356 &               0.670977 &                 0.869253 &                 0.919540 &           0.969828 &           0.946839 &                 0.946839 &         0.977011 &           0.668103 \\
0.080 &                             0.846264 &              0.966954 &                   0.965517 &       0.974138 &                          0.683908 &                0.573276 &             0.627874 &                  0.647989 &          0.645115 &           0.653736 &                   0.537356 &               0.670977 &                 0.869253 &                 0.919540 &           0.969828 &           0.946839 &                 0.946839 &         0.977011 &           0.668103 \\
0.085 &                             0.846264 &              0.966954 &                   0.965517 &       0.974138 &                          0.683908 &                0.573276 &             0.627874 &                  0.647989 &          0.645115 &           0.653736 &                   0.537356 &               0.670977 &                 0.869253 &                 0.919540 &           0.969828 &           0.946839 &                 0.946839 &         0.977011 &           0.668103 \\
0.090 &                             0.846264 &              0.966954 &                   0.965517 &       0.974138 &                          0.683908 &                0.573276 &             0.627874 &                  0.647989 &          0.645115 &           0.653736 &                   0.537356 &               0.670977 &                 0.869253 &                 0.919540 &           0.969828 &           0.946839 &                 0.946839 &         0.977011 &           0.668103 \\
0.095 &                             0.846264 &              0.966954 &                   0.965517 &       0.974138 &                          0.683908 &                0.573276 &             0.627874 &                  0.647989 &          0.645115 &           0.653736 &                   0.537356 &               0.670977 &                 0.869253 &                 0.919540 &           0.969828 &           0.946839 &                 0.946839 &         0.977011 &           0.668103 \\
0.100 &                             0.846264 &              0.966954 &                   0.965517 &       0.974138 &                          0.683908 &                0.573276 &             0.627874 &                  0.647989 &          0.645115 &           0.653736 &                   0.537356 &               0.670977 &                 0.869253 &                 0.919540 &           0.969828 &           0.946839 &                 0.946839 &         0.977011 &           0.668103 \\
0.105 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.110 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.115 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.120 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.125 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.130 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.135 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.140 &                             0.846485 &              0.967001 &                   0.965567 &       0.974175 &                          0.682927 &                0.573888 &             0.628407 &                  0.647059 &          0.645624 &           0.654232 &                   0.538020 &               0.671449 &                 0.869440 &                 0.918221 &           0.969871 &           0.946915 &                 0.946915 &         0.977044 &           0.668580 \\
0.145 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.150 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.155 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.160 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.165 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.170 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.175 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.180 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.185 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.190 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.195 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.200 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.205 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.210 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.215 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.220 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.225 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.230 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.235 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.240 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.245 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.250 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.255 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.260 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.265 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.270 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.275 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.280 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.285 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.290 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.295 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.300 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.305 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.310 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.315 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.320 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.325 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.330 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.335 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.340 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.345 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.350 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.355 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.360 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.365 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.370 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.375 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.380 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.385 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.390 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.395 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.400 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.405 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.410 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.415 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.420 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.425 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.430 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.435 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.440 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.445 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.450 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.455 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.460 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.465 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.470 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.475 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.480 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.485 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.490 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.495 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
0.500 &                             0.845272 &              0.967049 &                   0.965616 &       0.974212 &                          0.681948 &                0.574499 &             0.628940 &                  0.646132 &          0.646132 &           0.654728 &                   0.537249 &               0.671920 &                 0.868195 &                 0.916905 &           0.969914 &           0.946991 &                 0.946991 &         0.977077 &           0.669054 \\
\bottomrule
\end{tabular}
