\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             1.000000 &              0.982857 &                   0.982857 &       0.982857 &                          1.000000 &                0.971429 &             1.000000 &                  0.994286 &          0.994286 &           0.994286 &                   0.720000 &               0.988571 &                 0.988571 &                 0.994286 &           1.000000 &           1.000000 &                 1.000000 &         1.000000 &           0.994286 \\
0.010 &                             1.000000 &              0.972376 &                   0.972376 &       0.972376 &                          0.991713 &                0.961326 &             0.997238 &                  0.986188 &          0.977901 &           0.994475 &                   0.770718 &               0.994475 &                 0.994475 &                 0.997238 &           1.000000 &           1.000000 &                 1.000000 &         1.000000 &           0.991713 \\
0.015 &                             1.000000 &              0.978682 &                   0.978682 &       0.978682 &                          0.974806 &                0.930233 &             0.994186 &                  0.978682 &          0.963178 &           0.982558 &                   0.777132 &               0.988372 &                 0.990310 &                 0.992248 &           0.998062 &           0.998062 &                 0.998062 &         0.998062 &           0.986434 \\
0.020 &                             1.000000 &              0.980066 &                   0.980066 &       0.980066 &                          0.965116 &                0.916944 &             0.993355 &                  0.965116 &          0.948505 &           0.975083 &                   0.775748 &               0.981728 &                 0.986711 &                 0.991694 &           0.996678 &           0.996678 &                 0.995017 &         0.998339 &           0.973422 \\
0.025 &                             1.000000 &              0.981707 &                   0.980183 &       0.981707 &                          0.943598 &                0.890244 &             0.989329 &                  0.949695 &          0.928354 &           0.961890 &                   0.760671 &               0.977134 &                 0.986280 &                 0.992378 &           0.996951 &           0.995427 &                 0.995427 &         0.995427 &           0.958841 \\
0.030 &                             1.000000 &              0.980826 &                   0.979351 &       0.980826 &                          0.933628 &                0.880531 &             0.988201 &                  0.939528 &          0.915929 &           0.955752 &                   0.761062 &               0.973451 &                 0.985251 &                 0.989676 &           0.994100 &           0.992625 &                 0.995575 &         0.992625 &           0.958702 \\
0.035 &                             1.000000 &              0.980994 &                   0.979532 &       0.980994 &                          0.932749 &                0.878655 &             0.983918 &                  0.937135 &          0.913743 &           0.956140 &                   0.761696 &               0.973684 &                 0.985380 &                 0.989766 &           0.994152 &           0.992690 &                 0.995614 &         0.992690 &           0.956140 \\
0.040 &                             1.000000 &              0.981105 &                   0.979651 &       0.981105 &                          0.930233 &                0.877907 &             0.982558 &                  0.936047 &          0.912791 &           0.954942 &                   0.760174 &               0.973837 &                 0.985465 &                 0.989826 &           0.994186 &           0.992733 &                 0.995640 &         0.991279 &           0.956395 \\
0.045 &                             1.000000 &              0.981105 &                   0.979651 &       0.981105 &                          0.930233 &                0.877907 &             0.982558 &                  0.936047 &          0.912791 &           0.954942 &                   0.760174 &               0.973837 &                 0.985465 &                 0.989826 &           0.994186 &           0.992733 &                 0.995640 &         0.991279 &           0.956395 \\
0.050 &                             1.000000 &              0.981159 &                   0.979710 &       0.981159 &                          0.930435 &                0.878261 &             0.982609 &                  0.936232 &          0.913043 &           0.955072 &                   0.760870 &               0.973913 &                 0.985507 &                 0.989855 &           0.994203 &           0.992754 &                 0.995652 &         0.991304 &           0.956522 \\
0.055 &                             1.000000 &              0.981159 &                   0.979710 &       0.981159 &                          0.930435 &                0.878261 &             0.982609 &                  0.936232 &          0.913043 &           0.955072 &                   0.760870 &               0.973913 &                 0.985507 &                 0.989855 &           0.994203 &           0.992754 &                 0.995652 &         0.991304 &           0.956522 \\
0.060 &                             1.000000 &              0.981214 &                   0.979769 &       0.981214 &                          0.930636 &                0.877168 &             0.982659 &                  0.933526 &          0.910405 &           0.955202 &                   0.760116 &               0.972543 &                 0.984104 &                 0.989884 &           0.994220 &           0.992775 &                 0.995665 &         0.991329 &           0.955202 \\
0.065 &                             1.000000 &              0.981241 &                   0.979798 &       0.981241 &                          0.930736 &                0.877345 &             0.982684 &                  0.933622 &          0.910534 &           0.955267 &                   0.759019 &               0.972583 &                 0.984127 &                 0.989899 &           0.994228 &           0.992785 &                 0.995671 &         0.991342 &           0.955267 \\
0.070 &                             0.998561 &              0.981295 &                   0.979856 &       0.981295 &                          0.928058 &                0.874820 &             0.981295 &                  0.932374 &          0.909353 &           0.952518 &                   0.756835 &               0.972662 &                 0.984173 &                 0.989928 &           0.992806 &           0.991367 &                 0.994245 &         0.989928 &           0.952518 \\
0.075 &                             0.998563 &              0.981322 &                   0.979885 &       0.981322 &                          0.928161 &                0.873563 &             0.979885 &                  0.931034 &          0.909483 &           0.952586 &                   0.757184 &               0.972701 &                 0.984195 &                 0.989943 &           0.992816 &           0.991379 &                 0.994253 &         0.989943 &           0.952586 \\
0.080 &                             0.998563 &              0.981322 &                   0.979885 &       0.981322 &                          0.928161 &                0.873563 &             0.979885 &                  0.931034 &          0.909483 &           0.952586 &                   0.757184 &               0.972701 &                 0.984195 &                 0.989943 &           0.992816 &           0.991379 &                 0.994253 &         0.989943 &           0.952586 \\
0.085 &                             0.998563 &              0.981322 &                   0.979885 &       0.981322 &                          0.928161 &                0.873563 &             0.979885 &                  0.931034 &          0.909483 &           0.952586 &                   0.757184 &               0.972701 &                 0.984195 &                 0.989943 &           0.992816 &           0.991379 &                 0.994253 &         0.989943 &           0.952586 \\
0.090 &                             0.998563 &              0.981322 &                   0.979885 &       0.981322 &                          0.928161 &                0.873563 &             0.979885 &                  0.931034 &          0.909483 &           0.952586 &                   0.757184 &               0.972701 &                 0.984195 &                 0.989943 &           0.992816 &           0.991379 &                 0.994253 &         0.989943 &           0.952586 \\
0.095 &                             0.998563 &              0.981322 &                   0.979885 &       0.981322 &                          0.928161 &                0.873563 &             0.979885 &                  0.931034 &          0.909483 &           0.952586 &                   0.757184 &               0.972701 &                 0.984195 &                 0.989943 &           0.992816 &           0.991379 &                 0.994253 &         0.989943 &           0.952586 \\
0.100 &                             0.998563 &              0.981322 &                   0.979885 &       0.981322 &                          0.928161 &                0.873563 &             0.979885 &                  0.931034 &          0.909483 &           0.952586 &                   0.757184 &               0.972701 &                 0.984195 &                 0.989943 &           0.992816 &           0.991379 &                 0.994253 &         0.989943 &           0.952586 \\
0.105 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.110 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.115 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.120 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.125 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.130 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.135 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.140 &                             0.998565 &              0.981349 &                   0.979914 &       0.981349 &                          0.928264 &                0.873745 &             0.979914 &                  0.929699 &          0.909613 &           0.952654 &                   0.757532 &               0.972740 &                 0.984218 &                 0.988522 &           0.992826 &           0.991392 &                 0.994261 &         0.989957 &           0.952654 \\
0.145 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.150 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.155 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.160 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.165 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.170 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.175 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.180 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.185 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.190 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.195 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.200 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.205 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.210 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.215 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.220 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.225 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.230 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.235 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.240 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.245 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.250 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.255 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.260 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.265 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.270 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.275 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.280 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.285 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.290 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.295 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.300 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.305 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.310 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.315 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.320 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.325 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.330 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.335 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.340 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.345 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.350 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.355 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.360 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.365 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.370 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.375 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.380 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.385 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.390 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.395 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.400 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.405 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.410 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.415 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.420 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.425 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.430 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.435 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.440 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.445 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.450 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.455 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.460 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.465 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.470 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.475 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.480 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.485 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.490 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.495 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
0.500 &                             0.998567 &              0.981375 &                   0.979943 &       0.981375 &                          0.928367 &                0.873926 &             0.979943 &                  0.928367 &          0.909742 &           0.952722 &                   0.757880 &               0.972779 &                 0.984241 &                 0.988539 &           0.992837 &           0.991404 &                 0.994269 &         0.989971 &           0.952722 \\
\bottomrule
\end{tabular}
