\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             0.971429 &              0.971429 &                   0.971429 &       0.982857 &                          0.914286 &                0.817143 &             0.857143 &                  0.902857 &          0.897143 &           0.897143 &                   0.651429 &               0.902857 &                 0.954286 &                 0.988571 &           0.988571 &           0.948571 &                 0.971429 &         0.977143 &           0.908571 \\
0.010 &                             0.919890 &              0.955801 &                   0.955801 &       0.958564 &                          0.831492 &                0.745856 &             0.745856 &                  0.798343 &          0.801105 &           0.792818 &                   0.629834 &               0.803867 &                 0.925414 &                 0.964088 &           0.986188 &           0.955801 &                 0.961326 &         0.972376 &           0.812155 \\
0.015 &                             0.848837 &              0.957364 &                   0.953488 &       0.957364 &                          0.763566 &                0.655039 &             0.674419 &                  0.724806 &          0.724806 &           0.718992 &                   0.581395 &               0.715116 &                 0.881783 &                 0.932171 &           0.961240 &           0.943798 &                 0.951550 &         0.963178 &           0.738372 \\
0.020 &                             0.842193 &              0.958472 &                   0.955150 &       0.960133 &                          0.730897 &                0.621262 &             0.651163 &                  0.692691 &          0.689369 &           0.689369 &                   0.556478 &               0.687708 &                 0.872093 &                 0.921927 &           0.961794 &           0.940199 &                 0.943522 &         0.965116 &           0.702658 \\
0.025 &                             0.838415 &              0.957317 &                   0.954268 &       0.960366 &                          0.704268 &                0.588415 &             0.632622 &                  0.669207 &          0.660061 &           0.666159 &                   0.544207 &               0.673780 &                 0.864329 &                 0.914634 &           0.961890 &           0.932927 &                 0.935976 &         0.960366 &           0.679878 \\
0.030 &                             0.837758 &              0.955752 &                   0.952802 &       0.960177 &                          0.690265 &                0.575221 &             0.632743 &                  0.659292 &          0.648968 &           0.659292 &                   0.541298 &               0.668142 &                 0.858407 &                 0.910029 &           0.958702 &           0.935103 &                 0.936578 &         0.960177 &           0.675516 \\
0.035 &                             0.836257 &              0.956140 &                   0.953216 &       0.960526 &                          0.687135 &                0.573099 &             0.631579 &                  0.656433 &          0.646199 &           0.657895 &                   0.539474 &               0.666667 &                 0.858187 &                 0.910819 &           0.959064 &           0.935673 &                 0.935673 &         0.960526 &           0.672515 \\
0.040 &                             0.835756 &              0.956395 &                   0.953488 &       0.960756 &                          0.684593 &                0.572674 &             0.632267 &                  0.655523 &          0.645349 &           0.658430 &                   0.539244 &               0.667151 &                 0.857558 &                 0.909884 &           0.959302 &           0.936047 &                 0.936047 &         0.960756 &           0.672965 \\
0.045 &                             0.835756 &              0.956395 &                   0.953488 &       0.960756 &                          0.684593 &                0.572674 &             0.632267 &                  0.655523 &          0.645349 &           0.658430 &                   0.539244 &               0.667151 &                 0.857558 &                 0.909884 &           0.959302 &           0.936047 &                 0.936047 &         0.960756 &           0.672965 \\
0.050 &                             0.834783 &              0.955072 &                   0.952174 &       0.959420 &                          0.684058 &                0.572464 &             0.631884 &                  0.655072 &          0.644928 &           0.657971 &                   0.539130 &               0.666667 &                 0.856522 &                 0.908696 &           0.957971 &           0.934783 &                 0.934783 &         0.960870 &           0.672464 \\
0.055 &                             0.834783 &              0.955072 &                   0.952174 &       0.959420 &                          0.684058 &                0.572464 &             0.631884 &                  0.655072 &          0.644928 &           0.657971 &                   0.539130 &               0.666667 &                 0.856522 &                 0.908696 &           0.957971 &           0.934783 &                 0.934783 &         0.960870 &           0.672464 \\
0.060 &                             0.835260 &              0.955202 &                   0.952312 &       0.959538 &                          0.682081 &                0.572254 &             0.632948 &                  0.653179 &          0.643064 &           0.657514 &                   0.539017 &               0.666185 &                 0.855491 &                 0.908960 &           0.958092 &           0.934971 &                 0.934971 &         0.960983 &           0.670520 \\
0.065 &                             0.834055 &              0.955267 &                   0.952381 &       0.959596 &                          0.681097 &                0.571429 &             0.632035 &                  0.652237 &          0.642136 &           0.656566 &                   0.538240 &               0.665224 &                 0.854257 &                 0.907648 &           0.958153 &           0.935065 &                 0.933622 &         0.961039 &           0.669553 \\
0.070 &                             0.833094 &              0.953957 &                   0.951079 &       0.958273 &                          0.679137 &                0.569784 &             0.631655 &                  0.651799 &          0.641727 &           0.654676 &                   0.536691 &               0.666187 &                 0.854676 &                 0.907914 &           0.956835 &           0.933813 &                 0.932374 &         0.959712 &           0.667626 \\
0.075 &                             0.833333 &              0.954023 &                   0.951149 &       0.958333 &                          0.678161 &                0.568966 &             0.630747 &                  0.650862 &          0.642241 &           0.655172 &                   0.537356 &               0.666667 &                 0.854885 &                 0.908046 &           0.956897 &           0.933908 &                 0.932471 &         0.959770 &           0.668103 \\
0.080 &                             0.833333 &              0.954023 &                   0.951149 &       0.958333 &                          0.678161 &                0.568966 &             0.630747 &                  0.650862 &          0.642241 &           0.655172 &                   0.537356 &               0.666667 &                 0.854885 &                 0.908046 &           0.956897 &           0.933908 &                 0.932471 &         0.959770 &           0.668103 \\
0.085 &                             0.833333 &              0.954023 &                   0.951149 &       0.958333 &                          0.678161 &                0.568966 &             0.630747 &                  0.650862 &          0.642241 &           0.655172 &                   0.537356 &               0.666667 &                 0.854885 &                 0.908046 &           0.956897 &           0.933908 &                 0.932471 &         0.959770 &           0.668103 \\
0.090 &                             0.833333 &              0.954023 &                   0.951149 &       0.958333 &                          0.678161 &                0.568966 &             0.630747 &                  0.650862 &          0.642241 &           0.655172 &                   0.537356 &               0.666667 &                 0.854885 &                 0.908046 &           0.956897 &           0.933908 &                 0.932471 &         0.959770 &           0.668103 \\
0.095 &                             0.833333 &              0.954023 &                   0.951149 &       0.958333 &                          0.678161 &                0.568966 &             0.630747 &                  0.650862 &          0.642241 &           0.655172 &                   0.537356 &               0.666667 &                 0.854885 &                 0.908046 &           0.956897 &           0.933908 &                 0.932471 &         0.959770 &           0.668103 \\
0.100 &                             0.833333 &              0.954023 &                   0.951149 &       0.958333 &                          0.678161 &                0.568966 &             0.630747 &                  0.650862 &          0.642241 &           0.655172 &                   0.537356 &               0.666667 &                 0.854885 &                 0.908046 &           0.956897 &           0.933908 &                 0.932471 &         0.959770 &           0.668103 \\
0.105 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.110 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.115 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.120 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.125 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.130 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.135 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.140 &                             0.833572 &              0.954089 &                   0.951220 &       0.958393 &                          0.677188 &                0.569584 &             0.631277 &                  0.649928 &          0.642755 &           0.655667 &                   0.538020 &               0.667145 &                 0.855093 &                 0.906743 &           0.956958 &           0.934003 &                 0.932568 &         0.959828 &           0.668580 \\
0.145 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.150 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.155 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.160 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.165 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.170 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.175 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.180 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.185 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.190 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.195 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.200 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.205 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.210 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.215 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.220 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.225 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.230 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.235 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.240 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.245 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.250 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.255 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.260 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.265 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.270 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.275 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.280 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.285 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.290 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.295 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.300 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.305 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.310 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.315 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.320 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.325 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.330 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.335 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.340 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.345 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.350 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.355 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.360 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.365 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.370 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.375 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.380 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.385 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.390 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.395 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.400 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.405 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.410 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.415 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.420 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.425 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.430 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.435 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.440 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.445 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.450 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.455 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.460 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.465 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.470 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.475 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.480 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.485 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.490 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.495 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
0.500 &                             0.832378 &              0.954155 &                   0.951289 &       0.958453 &                          0.676218 &                0.570201 &             0.631805 &                  0.648997 &          0.643266 &           0.656160 &                   0.537249 &               0.667622 &                 0.853868 &                 0.905444 &           0.957020 &           0.934097 &                 0.932665 &         0.959885 &           0.669054 \\
\bottomrule
\end{tabular}
