\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             1.000000 &              0.982857 &                   0.982857 &       0.982857 &                          0.994286 &                0.971429 &             0.994286 &                  0.994286 &          0.988571 &           0.994286 &                   0.720000 &               0.988571 &                 0.988571 &                 0.994286 &           1.000000 &           0.994286 &                 0.994286 &         0.994286 &           0.994286 \\
0.010 &                             1.000000 &              0.972376 &                   0.972376 &       0.972376 &                          0.986188 &                0.961326 &             0.994475 &                  0.986188 &          0.977901 &           0.994475 &                   0.770718 &               0.994475 &                 0.994475 &                 0.997238 &           1.000000 &           0.994475 &                 0.997238 &         0.988950 &           0.991713 \\
0.015 &                             1.000000 &              0.978682 &                   0.978682 &       0.978682 &                          0.968992 &                0.926357 &             0.992248 &                  0.978682 &          0.959302 &           0.982558 &                   0.775194 &               0.988372 &                 0.990310 &                 0.992248 &           0.996124 &           0.994186 &                 0.996124 &         0.986434 &           0.984496 \\
0.020 &                             0.996678 &              0.978405 &                   0.978405 &       0.978405 &                          0.956811 &                0.910299 &             0.991694 &                  0.965116 &          0.945183 &           0.973422 &                   0.774086 &               0.980066 &                 0.985050 &                 0.990033 &           0.993355 &           0.991694 &                 0.991694 &         0.986711 &           0.971761 \\
0.025 &                             0.992378 &              0.977134 &                   0.977134 &       0.978659 &                          0.937500 &                0.884146 &             0.986280 &                  0.949695 &          0.923780 &           0.960366 &                   0.760671 &               0.974085 &                 0.983232 &                 0.989329 &           0.992378 &           0.989329 &                 0.989329 &         0.981707 &           0.957317 \\
0.030 &                             0.991150 &              0.976401 &                   0.976401 &       0.977876 &                          0.926254 &                0.873156 &             0.986726 &                  0.939528 &          0.910029 &           0.954277 &                   0.761062 &               0.969027 &                 0.982301 &                 0.986726 &           0.989676 &           0.989676 &                 0.989676 &         0.982301 &           0.955752 \\
0.035 &                             0.991228 &              0.976608 &                   0.976608 &       0.978070 &                          0.923977 &                0.871345 &             0.983918 &                  0.937135 &          0.907895 &           0.954678 &                   0.761696 &               0.969298 &                 0.982456 &                 0.986842 &           0.989766 &           0.989766 &                 0.989766 &         0.982456 &           0.953216 \\
0.040 &                             0.989826 &              0.976744 &                   0.976744 &       0.978198 &                          0.920058 &                0.870640 &             0.984012 &                  0.936047 &          0.906977 &           0.954942 &                   0.760174 &               0.969477 &                 0.982558 &                 0.986919 &           0.989826 &           0.989826 &                 0.989826 &         0.982558 &           0.953488 \\
0.045 &                             0.989826 &              0.976744 &                   0.976744 &       0.978198 &                          0.920058 &                0.870640 &             0.984012 &                  0.936047 &          0.906977 &           0.954942 &                   0.760174 &               0.969477 &                 0.982558 &                 0.986919 &           0.989826 &           0.989826 &                 0.989826 &         0.982558 &           0.953488 \\
0.050 &                             0.988406 &              0.975362 &                   0.975362 &       0.976812 &                          0.920290 &                0.869565 &             0.982609 &                  0.936232 &          0.905797 &           0.953623 &                   0.759420 &               0.968116 &                 0.981159 &                 0.985507 &           0.988406 &           0.988406 &                 0.988406 &         0.982609 &           0.952174 \\
0.055 &                             0.988406 &              0.975362 &                   0.975362 &       0.976812 &                          0.920290 &                0.869565 &             0.982609 &                  0.936232 &          0.905797 &           0.953623 &                   0.759420 &               0.968116 &                 0.981159 &                 0.985507 &           0.988406 &           0.988406 &                 0.988406 &         0.982609 &           0.952174 \\
0.060 &                             0.988439 &              0.975434 &                   0.975434 &       0.976879 &                          0.920520 &                0.868497 &             0.982659 &                  0.933526 &          0.903179 &           0.952312 &                   0.758671 &               0.966763 &                 0.979769 &                 0.985549 &           0.988439 &           0.988439 &                 0.988439 &         0.982659 &           0.950867 \\
0.065 &                             0.988456 &              0.975469 &                   0.975469 &       0.976912 &                          0.920635 &                0.868687 &             0.982684 &                  0.933622 &          0.903319 &           0.952381 &                   0.757576 &               0.966811 &                 0.979798 &                 0.985570 &           0.988456 &           0.988456 &                 0.988456 &         0.982684 &           0.950938 \\
0.070 &                             0.987050 &              0.975540 &                   0.975540 &       0.975540 &                          0.917986 &                0.866187 &             0.981295 &                  0.932374 &          0.902158 &           0.949640 &                   0.755396 &               0.966906 &                 0.979856 &                 0.985612 &           0.987050 &           0.987050 &                 0.987050 &         0.981295 &           0.948201 \\
0.075 &                             0.987069 &              0.975575 &                   0.975575 &       0.975575 &                          0.916667 &                0.864943 &             0.979885 &                  0.931034 &          0.902299 &           0.949713 &                   0.755747 &               0.966954 &                 0.979885 &                 0.985632 &           0.987069 &           0.987069 &                 0.987069 &         0.981322 &           0.948276 \\
0.080 &                             0.987069 &              0.975575 &                   0.975575 &       0.975575 &                          0.916667 &                0.864943 &             0.979885 &                  0.931034 &          0.902299 &           0.949713 &                   0.755747 &               0.966954 &                 0.979885 &                 0.985632 &           0.987069 &           0.987069 &                 0.987069 &         0.981322 &           0.948276 \\
0.085 &                             0.987069 &              0.975575 &                   0.975575 &       0.975575 &                          0.916667 &                0.864943 &             0.979885 &                  0.931034 &          0.902299 &           0.949713 &                   0.755747 &               0.966954 &                 0.979885 &                 0.985632 &           0.987069 &           0.987069 &                 0.987069 &         0.981322 &           0.948276 \\
0.090 &                             0.987069 &              0.975575 &                   0.975575 &       0.975575 &                          0.916667 &                0.864943 &             0.979885 &                  0.931034 &          0.902299 &           0.949713 &                   0.755747 &               0.966954 &                 0.979885 &                 0.985632 &           0.987069 &           0.987069 &                 0.987069 &         0.981322 &           0.948276 \\
0.095 &                             0.987069 &              0.975575 &                   0.975575 &       0.975575 &                          0.916667 &                0.864943 &             0.979885 &                  0.931034 &          0.902299 &           0.949713 &                   0.755747 &               0.966954 &                 0.979885 &                 0.985632 &           0.987069 &           0.987069 &                 0.987069 &         0.981322 &           0.948276 \\
0.100 &                             0.987069 &              0.975575 &                   0.975575 &       0.975575 &                          0.916667 &                0.864943 &             0.979885 &                  0.931034 &          0.902299 &           0.949713 &                   0.755747 &               0.966954 &                 0.979885 &                 0.985632 &           0.987069 &           0.987069 &                 0.987069 &         0.981322 &           0.948276 \\
0.105 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.110 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.115 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.120 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.125 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.130 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.135 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.140 &                             0.987088 &              0.975610 &                   0.975610 &       0.975610 &                          0.916786 &                0.865136 &             0.979914 &                  0.929699 &          0.902439 &           0.949785 &                   0.756098 &               0.967001 &                 0.979914 &                 0.984218 &           0.987088 &           0.987088 &                 0.987088 &         0.981349 &           0.948350 \\
0.145 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.150 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.155 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.160 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.165 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.170 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.175 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.180 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.185 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.190 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.195 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.200 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.205 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.210 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.215 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.220 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.225 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.230 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.235 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.240 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.245 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.250 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.255 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.260 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.265 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.270 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.275 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.280 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.285 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.290 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.295 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.300 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.305 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.310 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.315 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.320 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.325 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.330 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.335 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.340 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.345 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.350 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.355 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.360 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.365 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.370 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.375 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.380 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.385 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.390 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.395 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.400 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.405 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.410 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.415 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.420 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.425 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.430 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.435 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.440 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.445 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.450 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.455 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.460 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.465 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.470 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.475 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.480 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.485 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.490 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.495 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
0.500 &                             0.987106 &              0.975645 &                   0.975645 &       0.975645 &                          0.916905 &                0.865330 &             0.979943 &                  0.928367 &          0.902579 &           0.949857 &                   0.756447 &               0.967049 &                 0.979943 &                 0.984241 &           0.987106 &           0.987106 &                 0.987106 &         0.981375 &           0.948424 \\
\bottomrule
\end{tabular}
