\begin{tabular}{lrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  percival2014/stem &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default \\
Tolerance (\%) &                                      &                       &                            &                &                                   &                    &                        &                          &                          &                    &                    &                          &                  \\
\midrule
0.000         &                             0.063540 &              0.004539 &                   0.009077 &       0.001513 &                          0.000000 &           0.000000 &               0.000000 &                 0.000000 &                 0.000000 &           0.524962 &           0.537065 &                 0.532526 &         0.633888 \\
0.001         &                             0.154312 &              0.134644 &                   0.167927 &       0.096823 &                          0.021180 &           0.119516 &               0.432678 &                 0.459909 &                 0.476551 &           0.524962 &           0.537065 &                 0.532526 &         0.633888 \\
0.002         &                             0.170953 &              0.261725 &                   0.308623 &       0.186082 &                          0.055976 &           0.304085 &               0.440242 &                 0.468986 &                 0.485628 &           0.524962 &           0.537065 &                 0.532526 &         0.633888 \\
0.003         &                             0.210287 &              0.349470 &                   0.396369 &       0.296520 &                          0.063540 &           0.307110 &               0.452345 &                 0.475038 &                 0.491679 &           0.524962 &           0.537065 &                 0.532526 &         0.633888 \\
0.004         &                             0.458396 &              0.447806 &                   0.449319 &       0.420575 &                          0.095310 &           0.322239 &               0.461422 &                 0.485628 &                 0.502269 &           0.524962 &           0.537065 &                 0.532526 &         0.633888 \\
0.005         &                             0.518911 &              0.532526 &                   0.509834 &       0.565809 &                          0.121029 &           0.358548 &               0.482602 &                 0.499244 &                 0.517398 &           0.524962 &           0.537065 &                 0.532526 &         0.633888 \\
0.006         &                             0.609682 &              0.597579 &                   0.597579 &       0.656581 &                          0.122542 &           0.376702 &               0.549168 &                 0.577912 &                 0.596067 &           0.574887 &           0.564297 &                 0.568835 &         0.700454 \\
0.007         &                             0.632375 &              0.679274 &                   0.700454 &       0.695915 &                          0.172466 &           0.450832 &               0.661120 &                 0.647504 &                 0.665658 &           0.618759 &           0.602118 &                 0.611195 &         0.709531 \\
0.008         &                             0.647504 &              0.789713 &                   0.812405 &       0.745840 &                          0.190620 &           0.562784 &               0.821483 &                 0.869894 &                 0.886536 &           0.875946 &           0.868381 &                 0.880484 &         0.830560 \\
0.009         &                             0.714070 &              0.850227 &                   0.869894 &       0.788200 &                          0.210287 &           0.735250 &               0.891074 &                 0.916793 &                 0.925870 &           0.913767 &           0.912254 &                 0.918306 &         0.877458 \\
0.010         &                             0.723147 &              0.880484 &                   0.903177 &       0.818457 &                          0.248109 &           0.760968 &               0.894100 &                 0.919818 &                 0.928896 &           0.916793 &           0.915280 &                 0.921331 &         0.881997 \\
0.011         &                             0.762481 &              0.904690 &                   0.924357 &       0.862330 &                          0.276853 &           0.783661 &               0.897126 &                 0.922844 &                 0.930408 &           0.922844 &           0.918306 &                 0.924357 &         0.891074 \\
0.012         &                             0.806354 &              0.919818 &                   0.940998 &       0.881997 &                          0.284418 &           0.789713 &               0.912254 &                 0.936460 &                 0.944024 &           0.951589 &           0.948563 &                 0.948563 &         0.927383 \\
0.013         &                             0.821483 &              0.924357 &                   0.951589 &       0.913767 &                          0.290469 &           0.810893 &               0.916793 &                 0.939486 &                 0.947050 &           0.956127 &           0.953101 &                 0.951589 &         0.933434 \\
0.014         &                             0.826021 &              0.930408 &                   0.957640 &       0.927383 &                          0.320726 &           0.859304 &               0.925870 &                 0.944024 &                 0.951589 &           0.960666 &           0.959153 &                 0.956127 &         0.944024 \\
0.015         &                             0.866868 &              0.939486 &                   0.965204 &       0.937973 &                          0.328290 &           0.862330 &               0.942511 &                 0.965204 &                 0.974281 &           0.983359 &           0.980333 &                 0.978820 &         0.981846 \\
0.016         &                             0.916793 &              0.945537 &                   0.966717 &       0.947050 &                          0.334342 &           0.872920 &               0.944024 &                 0.965204 &                 0.974281 &           0.989410 &           0.984871 &                 0.981846 &         0.983359 \\
0.017         &                             0.918306 &              0.951589 &                   0.969743 &       0.956127 &                          0.350983 &           0.875946 &               0.944024 &                 0.965204 &                 0.974281 &           0.989410 &           0.984871 &                 0.981846 &         0.983359 \\
0.018         &                             0.953101 &              0.959153 &                   0.972769 &       0.965204 &                          0.402421 &           0.878971 &               0.944024 &                 0.965204 &                 0.974281 &           0.989410 &           0.986384 &                 0.986384 &         0.983359 \\
0.019         &                             0.954614 &              0.962179 &                   0.975794 &       0.971256 &                          0.422088 &           0.880484 &               0.944024 &                 0.965204 &                 0.974281 &           0.989410 &           0.986384 &                 0.986384 &         0.983359 \\
0.020         &                             0.954614 &              0.965204 &                   0.975794 &       0.972769 &                          0.428139 &           0.880484 &               0.944024 &                 0.966717 &                 0.975794 &           0.989410 &           0.986384 &                 0.986384 &         0.983359 \\
0.021         &                             0.965204 &              0.965204 &                   0.977307 &       0.972769 &                          0.431165 &           0.880484 &               0.945537 &                 0.966717 &                 0.977307 &           0.989410 &           0.986384 &                 0.986384 &         0.983359 \\
0.022         &                             0.965204 &              0.966717 &                   0.978820 &       0.972769 &                          0.441755 &           0.880484 &               0.945537 &                 0.966717 &                 0.977307 &           0.990923 &           0.986384 &                 0.986384 &         0.983359 \\
0.023         &                             0.969743 &              0.966717 &                   0.978820 &       0.972769 &                          0.444781 &           0.880484 &               0.945537 &                 0.966717 &                 0.977307 &           0.990923 &           0.986384 &                 0.986384 &         0.983359 \\
0.024         &                             0.971256 &              0.966717 &                   0.978820 &       0.977307 &                          0.447806 &           0.880484 &               0.945537 &                 0.966717 &                 0.977307 &           0.990923 &           0.989410 &                 0.987897 &         0.984871 \\
0.025         &                             0.974281 &              0.968230 &                   0.978820 &       0.977307 &                          0.458396 &           0.883510 &               0.945537 &                 0.966717 &                 0.977307 &           0.990923 &           0.989410 &                 0.987897 &         0.984871 \\
0.026         &                             0.974281 &              0.969743 &                   0.978820 &       0.977307 &                          0.485628 &           0.886536 &               0.945537 &                 0.966717 &                 0.977307 &           0.990923 &           0.989410 &                 0.987897 &         0.984871 \\
0.027         &                             0.974281 &              0.972769 &                   0.978820 &       0.978820 &                          0.488654 &           0.886536 &               0.945537 &                 0.966717 &                 0.977307 &           0.990923 &           0.989410 &                 0.987897 &         0.984871 \\
0.028         &                             0.974281 &              0.972769 &                   0.978820 &       0.980333 &                          0.505295 &           0.886536 &               0.945537 &                 0.969743 &                 0.980333 &           0.992436 &           0.990923 &                 0.989410 &         0.984871 \\
0.029         &                             0.974281 &              0.972769 &                   0.978820 &       0.980333 &                          0.505295 &           0.886536 &               0.945537 &                 0.969743 &                 0.980333 &           0.992436 &           0.990923 &                 0.989410 &         0.984871 \\
0.030         &                             0.974281 &              0.974281 &                   0.978820 &       0.980333 &                          0.506808 &           0.888048 &               0.945537 &                 0.971256 &                 0.981846 &           0.992436 &           0.990923 &                 0.989410 &         0.984871 \\
0.031         &                             0.974281 &              0.974281 &                   0.980333 &       0.980333 &                          0.512859 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.990923 &                 0.989410 &         0.984871 \\
0.032         &                             0.974281 &              0.974281 &                   0.980333 &       0.980333 &                          0.514372 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.989410 &         0.984871 \\
0.033         &                             0.974281 &              0.974281 &                   0.981846 &       0.980333 &                          0.527988 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.990923 &         0.984871 \\
0.034         &                             0.974281 &              0.974281 &                   0.981846 &       0.980333 &                          0.527988 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.990923 &         0.984871 \\
0.035         &                             0.974281 &              0.974281 &                   0.981846 &       0.980333 &                          0.529501 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.990923 &         0.984871 \\
0.036         &                             0.974281 &              0.975794 &                   0.981846 &       0.980333 &                          0.531014 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.990923 &         0.984871 \\
0.037         &                             0.974281 &              0.975794 &                   0.981846 &       0.980333 &                          0.532526 &           0.888048 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.990923 &         0.984871 \\
0.038         &                             0.974281 &              0.975794 &                   0.981846 &       0.981846 &                          0.532526 &           0.889561 &               0.948563 &                 0.971256 &                 0.981846 &           0.992436 &           0.992436 &                 0.990923 &         0.987897 \\
0.039         &                             0.974281 &              0.975794 &                   0.981846 &       0.981846 &                          0.532526 &           0.889561 &               0.948563 &                 0.971256 &                 0.981846 &           0.993949 &           0.992436 &                 0.990923 &         0.987897 \\
0.040         &                             0.974281 &              0.977307 &                   0.981846 &       0.981846 &                          0.534039 &           0.889561 &               0.950076 &                 0.971256 &                 0.981846 &           0.993949 &           0.992436 &                 0.990923 &         0.987897 \\
0.041         &                             0.974281 &              0.977307 &                   0.981846 &       0.981846 &                          0.534039 &           0.889561 &               0.950076 &                 0.971256 &                 0.981846 &           0.993949 &           0.992436 &                 0.990923 &         0.987897 \\
0.042         &                             0.975794 &              0.977307 &                   0.983359 &       0.981846 &                          0.534039 &           0.889561 &               0.950076 &                 0.971256 &                 0.981846 &           0.993949 &           0.992436 &                 0.990923 &         0.987897 \\
0.043         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.534039 &           0.891074 &               0.950076 &                 0.972769 &                 0.983359 &           0.993949 &           0.992436 &                 0.990923 &         0.987897 \\
0.044         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.534039 &           0.891074 &               0.951589 &                 0.972769 &                 0.983359 &           0.993949 &           0.992436 &                 0.990923 &         0.987897 \\
0.045         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.535552 &           0.891074 &               0.951589 &                 0.972769 &                 0.983359 &           0.993949 &           0.992436 &                 0.992436 &         0.987897 \\
0.046         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.535552 &           0.891074 &               0.951589 &                 0.972769 &                 0.983359 &           0.993949 &           0.992436 &                 0.992436 &         0.987897 \\
0.047         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.535552 &           0.891074 &               0.951589 &                 0.972769 &                 0.983359 &           0.993949 &           0.992436 &                 0.992436 &         0.987897 \\
0.048         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.535552 &           0.891074 &               0.951589 &                 0.972769 &                 0.983359 &           0.993949 &           0.992436 &                 0.992436 &         0.987897 \\
0.049         &                             0.975794 &              0.978820 &                   0.983359 &       0.981846 &                          0.537065 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.992436 &                 0.992436 &         0.987897 \\
0.050         &                             0.975794 &              0.978820 &                   0.984871 &       0.981846 &                          0.537065 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.051         &                             0.975794 &              0.978820 &                   0.984871 &       0.981846 &                          0.538578 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.052         &                             0.975794 &              0.978820 &                   0.984871 &       0.981846 &                          0.538578 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.053         &                             0.975794 &              0.978820 &                   0.987897 &       0.981846 &                          0.538578 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.054         &                             0.975794 &              0.978820 &                   0.989410 &       0.983359 &                          0.541604 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.055         &                             0.975794 &              0.978820 &                   0.989410 &       0.983359 &                          0.543116 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.056         &                             0.975794 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.057         &                             0.975794 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.891074 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.058         &                             0.977307 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.892587 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.059         &                             0.977307 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.892587 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.060         &                             0.977307 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.892587 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.061         &                             0.977307 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.892587 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.062         &                             0.977307 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.895613 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.063         &                             0.977307 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.895613 &               0.951589 &                 0.974281 &                 0.984871 &           0.993949 &           0.993949 &                 0.992436 &         0.987897 \\
0.064         &                             0.978820 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.895613 &               0.951589 &                 0.974281 &                 0.984871 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.065         &                             0.978820 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.895613 &               0.951589 &                 0.974281 &                 0.984871 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.066         &                             0.978820 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.067         &                             0.980333 &              0.980333 &                   0.989410 &       0.983359 &                          0.544629 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.068         &                             0.980333 &              0.980333 &                   0.989410 &       0.983359 &                          0.547655 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.069         &                             0.980333 &              0.980333 &                   0.990923 &       0.983359 &                          0.547655 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.070         &                             0.980333 &              0.980333 &                   0.990923 &       0.983359 &                          0.547655 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.071         &                             0.980333 &              0.980333 &                   0.990923 &       0.983359 &                          0.547655 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.072         &                             0.981846 &              0.981846 &                   0.990923 &       0.983359 &                          0.549168 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.073         &                             0.981846 &              0.981846 &                   0.990923 &       0.983359 &                          0.549168 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.074         &                             0.981846 &              0.981846 &                   0.992436 &       0.983359 &                          0.549168 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.075         &                             0.981846 &              0.981846 &                   0.992436 &       0.983359 &                          0.549168 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.076         &                             0.981846 &              0.983359 &                   0.992436 &       0.983359 &                          0.549168 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.077         &                             0.981846 &              0.983359 &                   0.992436 &       0.983359 &                          0.550681 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.078         &                             0.981846 &              0.983359 &                   0.992436 &       0.983359 &                          0.550681 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.079         &                             0.981846 &              0.983359 &                   0.992436 &       0.983359 &                          0.550681 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.080         &                             0.981846 &              0.983359 &                   0.992436 &       0.983359 &                          0.550681 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.081         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.552194 &           0.895613 &               0.953101 &                 0.975794 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.082         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.552194 &           0.895613 &               0.953101 &                 0.977307 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.083         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.552194 &           0.895613 &               0.953101 &                 0.977307 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.084         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.553707 &           0.895613 &               0.953101 &                 0.977307 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.085         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.553707 &           0.895613 &               0.953101 &                 0.977307 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.086         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.553707 &           0.895613 &               0.953101 &                 0.977307 &                 0.987897 &           0.995461 &           0.993949 &                 0.992436 &         0.987897 \\
0.087         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.553707 &           0.895613 &               0.953101 &                 0.977307 &                 0.987897 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.088         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.553707 &           0.895613 &               0.954614 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.089         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.553707 &           0.895613 &               0.956127 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.090         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.555219 &           0.895613 &               0.956127 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.091         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.555219 &           0.895613 &               0.956127 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.092         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.555219 &           0.895613 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.093         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.555219 &           0.895613 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.094         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.555219 &           0.895613 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.095         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.555219 &           0.895613 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.096         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.556732 &           0.897126 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.097         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.556732 &           0.897126 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.098         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.556732 &           0.897126 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.099         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.556732 &           0.897126 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.993949 &         0.987897 \\
0.100         &                             0.981846 &              0.983359 &                   0.992436 &       0.984871 &                          0.556732 &           0.897126 &               0.957640 &                 0.978820 &                 0.989410 &           0.995461 &           0.993949 &                 0.995461 &         0.987897 \\
\bottomrule
\end{tabular}
