\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
τ     &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.000 &                                  NaN &                   NaN &                        NaN &            NaN &                               NaN &                     NaN &                  NaN &                       NaN &               NaN &                NaN &                        NaN &                    NaN &                      NaN &                      NaN &                NaN &                NaN &                      NaN &              NaN &                NaN \\
0.005 &                             0.916667 &              0.944444 &                   0.916667 &       0.944444 &                          0.944444 &                0.888889 &             0.972222 &                  0.944444 &          0.944444 &           0.944444 &                   0.833333 &               0.916667 &                 0.944444 &                 0.972222 &           0.944444 &           0.944444 &                 0.916667 &         0.916667 &           0.805556 \\
0.010 &                             0.978125 &              0.975000 &                   0.975000 &       0.984375 &                          0.975000 &                0.953125 &             0.978125 &                  0.981250 &          0.975000 &           0.984375 &                   0.853125 &               0.975000 &                 0.981250 &                 0.987500 &           0.987500 &           0.984375 &                 0.975000 &         0.975000 &           0.943750 \\
0.015 &                             0.982340 &              0.971302 &                   0.971302 &       0.986755 &                          0.971302 &                0.942605 &             0.977925 &                  0.975717 &          0.971302 &           0.982340 &                   0.847682 &               0.973510 &                 0.980132 &                 0.984547 &           0.982340 &           0.980132 &                 0.969095 &         0.973510 &           0.940397 \\
0.020 &                             0.984014 &              0.975133 &                   0.975133 &       0.987567 &                          0.964476 &                0.941385 &             0.980462 &                  0.971581 &          0.964476 &           0.980462 &                   0.840142 &               0.973357 &                 0.978686 &                 0.984014 &           0.984014 &           0.976909 &                 0.971581 &         0.976909 &           0.943162 \\
0.025 &                             0.982866 &              0.976636 &                   0.976636 &       0.987539 &                          0.959502 &                0.934579 &             0.978193 &                  0.967290 &          0.947040 &           0.978193 &                   0.827103 &               0.970405 &                 0.973520 &                 0.982866 &           0.981308 &           0.975078 &                 0.968847 &         0.973520 &           0.934579 \\
0.030 &                             0.982857 &              0.972857 &                   0.972857 &       0.988571 &                          0.950000 &                0.924286 &             0.974286 &                  0.962857 &          0.935714 &           0.975714 &                   0.822857 &               0.967143 &                 0.972857 &                 0.984286 &           0.980000 &           0.974286 &                 0.968571 &         0.967143 &           0.937143 \\
0.035 &                             0.980053 &              0.970745 &                   0.972074 &       0.988032 &                          0.946809 &                0.918883 &             0.970745 &                  0.962766 &          0.921543 &           0.972074 &                   0.815160 &               0.961436 &                 0.969415 &                 0.981383 &           0.981383 &           0.972074 &                 0.968085 &         0.965426 &           0.934840 \\
0.040 &                             0.981273 &              0.971286 &                   0.972534 &       0.988764 &                          0.940075 &                0.916355 &             0.967541 &                  0.960050 &          0.920100 &           0.970037 &                   0.808989 &               0.962547 &                 0.968789 &                 0.980025 &           0.977528 &           0.966292 &                 0.961298 &         0.963795 &           0.935081 \\
0.045 &                             0.980952 &              0.970238 &                   0.971429 &       0.988095 &                          0.933333 &                0.905952 &             0.961905 &                  0.958333 &          0.913095 &           0.967857 &                   0.797619 &               0.959524 &                 0.964286 &                 0.977381 &           0.975000 &           0.964286 &                 0.959524 &         0.957143 &           0.927381 \\
0.050 &                             0.980324 &              0.968750 &                   0.969907 &       0.987269 &                          0.930556 &                0.905093 &             0.961806 &                  0.957176 &          0.912037 &           0.967593 &                   0.792824 &               0.959491 &                 0.964120 &                 0.978009 &           0.974537 &           0.964120 &                 0.958333 &         0.954861 &           0.928241 \\
0.055 &                             0.977401 &              0.964972 &                   0.966102 &       0.984181 &                          0.927684 &                0.900565 &             0.958192 &                  0.953672 &          0.905085 &           0.964972 &                   0.793220 &               0.957062 &                 0.960452 &                 0.976271 &           0.971751 &           0.961582 &                 0.954802 &         0.950282 &           0.920904 \\
0.060 &                             0.972253 &              0.960044 &                   0.962264 &       0.978912 &                          0.920089 &                0.891232 &             0.953385 &                  0.946726 &          0.897891 &           0.958935 &                   0.784684 &               0.952275 &                 0.954495 &                 0.972253 &           0.965594 &           0.954495 &                 0.950055 &         0.942286 &           0.913430 \\
0.065 &                             0.971554 &              0.957330 &                   0.959519 &       0.978118 &                          0.913567 &                0.886214 &             0.952954 &                  0.942013 &          0.893873 &           0.958425 &                   0.780088 &               0.950766 &                 0.952954 &                 0.971554 &           0.964989 &           0.951860 &                 0.948578 &         0.940919 &           0.911379 \\
0.070 &                             0.970716 &              0.955531 &                   0.957701 &       0.976139 &                          0.913232 &                0.883948 &             0.951193 &                  0.939262 &          0.892625 &           0.956616 &                   0.776573 &               0.947939 &                 0.950108 &                 0.969631 &           0.964208 &           0.950108 &                 0.947939 &         0.940347 &           0.907809 \\
0.075 &                             0.970842 &              0.955724 &                   0.957883 &       0.976242 &                          0.913607 &                0.883369 &             0.951404 &                  0.939525 &          0.892009 &           0.956803 &                   0.776458 &               0.948164 &                 0.950324 &                 0.969762 &           0.964363 &           0.950324 &                 0.947084 &         0.940605 &           0.907127 \\
0.080 &                             0.971030 &              0.956009 &                   0.958155 &       0.976395 &                          0.914163 &                0.883047 &             0.949571 &                  0.939914 &          0.891631 &           0.956009 &                   0.776824 &               0.946352 &                 0.948498 &                 0.969957 &           0.964592 &           0.950644 &                 0.946352 &         0.939914 &           0.906652 \\
0.085 &                             0.970149 &              0.956290 &                   0.958422 &       0.976546 &                          0.912580 &                0.881663 &             0.948827 &                  0.939232 &          0.890192 &           0.954158 &                   0.773987 &               0.946695 &                 0.948827 &                 0.970149 &           0.963753 &           0.949893 &                 0.945629 &         0.938166 &           0.907249 \\
0.090 &                             0.970244 &              0.956429 &                   0.958555 &       0.976621 &                          0.912859 &                0.882040 &             0.948990 &                  0.939426 &          0.890542 &           0.954304 &                   0.773645 &               0.946865 &                 0.948990 &                 0.970244 &           0.963868 &           0.950053 &                 0.945802 &         0.938363 &           0.907545 \\
0.095 &                             0.970370 &              0.956614 &                   0.958730 &       0.976720 &                          0.911111 &                0.882540 &             0.949206 &                  0.939683 &          0.888889 &           0.953439 &                   0.773545 &               0.947090 &                 0.948148 &                 0.969312 &           0.962963 &           0.950265 &                 0.944974 &         0.938624 &           0.906878 \\
0.100 &                             0.969506 &              0.955836 &                   0.957939 &       0.975815 &                          0.910620 &                0.882229 &             0.948475 &                  0.939012 &          0.885384 &           0.952681 &                   0.771819 &               0.946372 &                 0.948475 &                 0.969506 &           0.962145 &           0.949527 &                 0.943218 &         0.939012 &           0.906414 \\
0.105 &                             0.969634 &              0.956021 &                   0.958115 &       0.975916 &                          0.909948 &                0.879581 &             0.948691 &                  0.937173 &          0.883770 &           0.952880 &                   0.769634 &               0.946597 &                 0.948691 &                 0.969634 &           0.961257 &           0.948691 &                 0.942408 &         0.938220 &           0.905759 \\
0.110 &                             0.969760 &              0.956204 &                   0.958290 &       0.976017 &                          0.910323 &                0.880083 &             0.948905 &                  0.937435 &          0.884254 &           0.953076 &                   0.769552 &               0.946820 &                 0.948905 &                 0.969760 &           0.961418 &           0.948905 &                 0.942649 &         0.938478 &           0.906152 \\
0.115 &                             0.967775 &              0.955301 &                   0.958420 &       0.976091 &                          0.909563 &                0.878378 &             0.948025 &                  0.935551 &          0.883576 &           0.951143 &                   0.769231 &               0.944906 &                 0.946985 &                 0.968815 &           0.959459 &           0.949064 &                 0.940748 &         0.937630 &           0.904366 \\
0.120 &                             0.966805 &              0.954357 &                   0.957469 &       0.975104 &                          0.908714 &                0.877593 &             0.947095 &                  0.934647 &          0.882780 &           0.950207 &                   0.768672 &               0.943983 &                 0.946058 &                 0.967842 &           0.958506 &           0.948133 &                 0.939834 &         0.936722 &           0.904564 \\
0.125 &                             0.966839 &              0.954404 &                   0.957513 &       0.975130 &                          0.908808 &                0.877720 &             0.947150 &                  0.934715 &          0.882902 &           0.950259 &                   0.768912 &               0.944041 &                 0.946114 &                 0.967876 &           0.958549 &           0.948187 &                 0.939896 &         0.936788 &           0.904663 \\
0.130 &                             0.966839 &              0.954404 &                   0.957513 &       0.975130 &                          0.908808 &                0.877720 &             0.947150 &                  0.934715 &          0.882902 &           0.950259 &                   0.768912 &               0.944041 &                 0.946114 &                 0.967876 &           0.958549 &           0.948187 &                 0.939896 &         0.936788 &           0.904663 \\
0.135 &                             0.965839 &              0.953416 &                   0.956522 &       0.974120 &                          0.907867 &                0.877847 &             0.946170 &                  0.934783 &          0.881988 &           0.950311 &                   0.768116 &               0.943064 &                 0.945135 &                 0.966874 &           0.957557 &           0.947205 &                 0.938923 &         0.935818 &           0.903727 \\
0.140 &                             0.965979 &              0.953608 &                   0.956701 &       0.974227 &                          0.907216 &                0.876289 &             0.945361 &                  0.934021 &          0.880412 &           0.950515 &                   0.769072 &               0.943299 &                 0.945361 &                 0.967010 &           0.957732 &           0.947423 &                 0.938144 &         0.936082 &           0.903093 \\
0.145 &                             0.966014 &              0.953656 &                   0.956746 &       0.974253 &                          0.907312 &                0.876416 &             0.945417 &                  0.934089 &          0.880536 &           0.950566 &                   0.769310 &               0.943357 &                 0.945417 &                 0.967044 &           0.957775 &           0.947477 &                 0.938208 &         0.936148 &           0.903193 \\
0.150 &                             0.965092 &              0.953799 &                   0.956879 &       0.974333 &                          0.906571 &                0.874743 &             0.944559 &                  0.933265 &          0.878850 &           0.949692 &                   0.767967 &               0.942505 &                 0.944559 &                 0.966119 &           0.956879 &           0.946612 &                 0.937372 &         0.934292 &           0.901437 \\
0.155 &                             0.965164 &              0.953893 &                   0.956967 &       0.974385 &                          0.906762 &                0.875000 &             0.944672 &                  0.933402 &          0.879098 &           0.949795 &                   0.767418 &               0.942623 &                 0.944672 &                 0.966189 &           0.956967 &           0.946721 &                 0.937500 &         0.934426 &           0.901639 \\
0.160 &                             0.963303 &              0.954128 &                   0.956167 &       0.973496 &                          0.905199 &                0.873598 &             0.942915 &                  0.931702 &          0.877676 &           0.949032 &                   0.765545 &               0.940877 &                 0.943935 &                 0.965341 &           0.956167 &           0.943935 &                 0.936799 &         0.932722 &           0.900102 \\
0.165 &                             0.963303 &              0.954128 &                   0.956167 &       0.973496 &                          0.905199 &                0.873598 &             0.942915 &                  0.931702 &          0.877676 &           0.949032 &                   0.765545 &               0.940877 &                 0.943935 &                 0.965341 &           0.956167 &           0.943935 &                 0.936799 &         0.932722 &           0.900102 \\
0.170 &                             0.963340 &              0.954175 &                   0.956212 &       0.973523 &                          0.905295 &                0.873727 &             0.942974 &                  0.930754 &          0.876782 &           0.948065 &                   0.764766 &               0.939919 &                 0.943992 &                 0.965377 &           0.955193 &           0.943992 &                 0.936864 &         0.932790 &           0.899185 \\
0.175 &                             0.962360 &              0.953204 &                   0.955239 &       0.972533 &                          0.904374 &                0.872838 &             0.942014 &                  0.929807 &          0.875890 &           0.947101 &                   0.765005 &               0.938962 &                 0.943032 &                 0.964395 &           0.955239 &           0.943032 &                 0.935910 &         0.932859 &           0.898271 \\
0.180 &                             0.960446 &              0.951318 &                   0.953347 &       0.971602 &                          0.904665 &                0.872211 &             0.941176 &                  0.929006 &          0.875254 &           0.946247 &                   0.764706 &               0.938134 &                 0.941176 &                 0.962475 &           0.954361 &           0.942191 &                 0.935091 &         0.932049 &           0.896552 \\
0.185 &                             0.960446 &              0.951318 &                   0.953347 &       0.971602 &                          0.904665 &                0.872211 &             0.941176 &                  0.929006 &          0.875254 &           0.946247 &                   0.764706 &               0.938134 &                 0.941176 &                 0.962475 &           0.954361 &           0.942191 &                 0.935091 &         0.932049 &           0.896552 \\
0.190 &                             0.960446 &              0.951318 &                   0.953347 &       0.971602 &                          0.904665 &                0.872211 &             0.941176 &                  0.929006 &          0.875254 &           0.946247 &                   0.764706 &               0.938134 &                 0.941176 &                 0.962475 &           0.954361 &           0.942191 &                 0.935091 &         0.932049 &           0.896552 \\
0.195 &                             0.960526 &              0.951417 &                   0.953441 &       0.970648 &                          0.903846 &                0.872470 &             0.941296 &                  0.929150 &          0.875506 &           0.946356 &                   0.764170 &               0.938259 &                 0.941296 &                 0.962551 &           0.954453 &           0.942308 &                 0.935223 &         0.932186 &           0.895749 \\
0.200 &                             0.960526 &              0.951417 &                   0.953441 &       0.970648 &                          0.903846 &                0.872470 &             0.941296 &                  0.929150 &          0.875506 &           0.946356 &                   0.764170 &               0.938259 &                 0.941296 &                 0.962551 &           0.954453 &           0.942308 &                 0.935223 &         0.932186 &           0.895749 \\
0.205 &                             0.959555 &              0.950455 &                   0.953488 &       0.969666 &                          0.902932 &                0.872599 &             0.940344 &                  0.928210 &          0.874621 &           0.945399 &                   0.763397 &               0.938322 &                 0.941355 &                 0.962588 &           0.954499 &           0.941355 &                 0.935288 &         0.931244 &           0.895854 \\
0.210 &                             0.959555 &              0.950455 &                   0.953488 &       0.969666 &                          0.902932 &                0.872599 &             0.940344 &                  0.928210 &          0.874621 &           0.945399 &                   0.763397 &               0.938322 &                 0.941355 &                 0.962588 &           0.954499 &           0.941355 &                 0.935288 &         0.931244 &           0.895854 \\
0.215 &                             0.959555 &              0.950455 &                   0.953488 &       0.969666 &                          0.902932 &                0.872599 &             0.940344 &                  0.928210 &          0.874621 &           0.945399 &                   0.763397 &               0.938322 &                 0.941355 &                 0.962588 &           0.954499 &           0.941355 &                 0.935288 &         0.931244 &           0.895854 \\
0.220 &                             0.957619 &              0.948537 &                   0.951564 &       0.968718 &                          0.902119 &                0.871847 &             0.939455 &                  0.927346 &          0.873865 &           0.943491 &                   0.762866 &               0.937437 &                 0.941473 &                 0.962664 &           0.953582 &           0.940464 &                 0.934410 &         0.930373 &           0.895055 \\
0.225 &                             0.957619 &              0.948537 &                   0.951564 &       0.968718 &                          0.902119 &                0.871847 &             0.939455 &                  0.927346 &          0.873865 &           0.943491 &                   0.762866 &               0.937437 &                 0.941473 &                 0.962664 &           0.953582 &           0.940464 &                 0.934410 &         0.930373 &           0.895055 \\
0.230 &                             0.957619 &              0.948537 &                   0.951564 &       0.968718 &                          0.902119 &                0.871847 &             0.939455 &                  0.927346 &          0.873865 &           0.943491 &                   0.762866 &               0.937437 &                 0.941473 &                 0.962664 &           0.953582 &           0.940464 &                 0.934410 &         0.930373 &           0.895055 \\
0.235 &                             0.957619 &              0.948537 &                   0.951564 &       0.968718 &                          0.902119 &                0.871847 &             0.939455 &                  0.927346 &          0.873865 &           0.943491 &                   0.762866 &               0.937437 &                 0.941473 &                 0.962664 &           0.953582 &           0.940464 &                 0.934410 &         0.930373 &           0.895055 \\
0.240 &                             0.957619 &              0.948537 &                   0.951564 &       0.968718 &                          0.902119 &                0.871847 &             0.939455 &                  0.927346 &          0.873865 &           0.943491 &                   0.762866 &               0.937437 &                 0.941473 &                 0.962664 &           0.953582 &           0.940464 &                 0.934410 &         0.930373 &           0.895055 \\
0.245 &                             0.957619 &              0.948537 &                   0.951564 &       0.968718 &                          0.902119 &                0.871847 &             0.939455 &                  0.927346 &          0.873865 &           0.943491 &                   0.762866 &               0.937437 &                 0.941473 &                 0.962664 &           0.953582 &           0.940464 &                 0.934410 &         0.930373 &           0.895055 \\
0.250 &                             0.956653 &              0.947581 &                   0.950605 &       0.967742 &                          0.902218 &                0.871976 &             0.938508 &                  0.927419 &          0.873992 &           0.943548 &                   0.762097 &               0.936492 &                 0.940524 &                 0.961694 &           0.952621 &           0.939516 &                 0.933468 &         0.929435 &           0.894153 \\
0.255 &                             0.956653 &              0.947581 &                   0.950605 &       0.967742 &                          0.902218 &                0.871976 &             0.938508 &                  0.927419 &          0.873992 &           0.943548 &                   0.762097 &               0.936492 &                 0.940524 &                 0.961694 &           0.952621 &           0.939516 &                 0.933468 &         0.929435 &           0.894153 \\
0.260 &                             0.956653 &              0.947581 &                   0.950605 &       0.967742 &                          0.902218 &                0.871976 &             0.938508 &                  0.927419 &          0.873992 &           0.943548 &                   0.762097 &               0.936492 &                 0.940524 &                 0.961694 &           0.952621 &           0.939516 &                 0.933468 &         0.929435 &           0.894153 \\
0.265 &                             0.956653 &              0.947581 &                   0.950605 &       0.967742 &                          0.902218 &                0.871976 &             0.938508 &                  0.927419 &          0.873992 &           0.943548 &                   0.762097 &               0.936492 &                 0.940524 &                 0.961694 &           0.952621 &           0.939516 &                 0.933468 &         0.929435 &           0.894153 \\
0.270 &                             0.956653 &              0.947581 &                   0.950605 &       0.967742 &                          0.902218 &                0.871976 &             0.938508 &                  0.927419 &          0.873992 &           0.943548 &                   0.762097 &               0.936492 &                 0.940524 &                 0.961694 &           0.952621 &           0.939516 &                 0.933468 &         0.929435 &           0.894153 \\
0.275 &                             0.956740 &              0.947686 &                   0.950704 &       0.966801 &                          0.901408 &                0.871227 &             0.938632 &                  0.926559 &          0.872233 &           0.942656 &                   0.762575 &               0.935614 &                 0.939638 &                 0.960765 &           0.951710 &           0.938632 &                 0.933602 &         0.927565 &           0.893360 \\
0.280 &                             0.956740 &              0.947686 &                   0.950704 &       0.966801 &                          0.901408 &                0.871227 &             0.938632 &                  0.926559 &          0.872233 &           0.942656 &                   0.762575 &               0.935614 &                 0.939638 &                 0.960765 &           0.951710 &           0.938632 &                 0.933602 &         0.927565 &           0.893360 \\
0.285 &                             0.956784 &              0.947739 &                   0.950754 &       0.966834 &                          0.901508 &                0.871357 &             0.938693 &                  0.925628 &          0.871357 &           0.942714 &                   0.762814 &               0.934673 &                 0.939698 &                 0.960804 &           0.951759 &           0.938693 &                 0.933668 &         0.926633 &           0.892462 \\
0.290 &                             0.956784 &              0.947739 &                   0.950754 &       0.966834 &                          0.901508 &                0.871357 &             0.938693 &                  0.925628 &          0.871357 &           0.942714 &                   0.762814 &               0.934673 &                 0.939698 &                 0.960804 &           0.951759 &           0.938693 &                 0.933668 &         0.926633 &           0.892462 \\
0.295 &                             0.956784 &              0.947739 &                   0.950754 &       0.966834 &                          0.901508 &                0.871357 &             0.938693 &                  0.925628 &          0.871357 &           0.942714 &                   0.762814 &               0.934673 &                 0.939698 &                 0.960804 &           0.951759 &           0.938693 &                 0.933668 &         0.926633 &           0.892462 \\
0.300 &                             0.956784 &              0.947739 &                   0.950754 &       0.966834 &                          0.901508 &                0.871357 &             0.938693 &                  0.925628 &          0.871357 &           0.942714 &                   0.762814 &               0.934673 &                 0.939698 &                 0.960804 &           0.951759 &           0.938693 &                 0.933668 &         0.926633 &           0.892462 \\
0.305 &                             0.956784 &              0.947739 &                   0.950754 &       0.966834 &                          0.901508 &                0.871357 &             0.938693 &                  0.925628 &          0.871357 &           0.942714 &                   0.762814 &               0.934673 &                 0.939698 &                 0.960804 &           0.951759 &           0.938693 &                 0.933668 &         0.926633 &           0.892462 \\
0.310 &                             0.956784 &              0.947739 &                   0.950754 &       0.966834 &                          0.901508 &                0.871357 &             0.938693 &                  0.925628 &          0.871357 &           0.942714 &                   0.762814 &               0.934673 &                 0.939698 &                 0.960804 &           0.951759 &           0.938693 &                 0.933668 &         0.926633 &           0.892462 \\
0.315 &                             0.956827 &              0.947791 &                   0.950803 &       0.966867 &                          0.901606 &                0.871486 &             0.938755 &                  0.925703 &          0.871486 &           0.942771 &                   0.763052 &               0.934739 &                 0.939759 &                 0.960843 &           0.951807 &           0.938755 &                 0.933735 &         0.926707 &           0.892570 \\
0.320 &                             0.956827 &              0.947791 &                   0.950803 &       0.966867 &                          0.901606 &                0.871486 &             0.938755 &                  0.925703 &          0.871486 &           0.942771 &                   0.763052 &               0.934739 &                 0.939759 &                 0.960843 &           0.951807 &           0.938755 &                 0.933735 &         0.926707 &           0.892570 \\
0.325 &                             0.955868 &              0.946841 &                   0.949850 &       0.965898 &                          0.900702 &                0.870612 &             0.937813 &                  0.924774 &          0.870612 &           0.941825 &                   0.762287 &               0.933801 &                 0.938816 &                 0.959880 &           0.950853 &           0.937813 &                 0.932798 &         0.925777 &           0.891675 \\
0.330 &                             0.955868 &              0.946841 &                   0.949850 &       0.965898 &                          0.900702 &                0.870612 &             0.937813 &                  0.924774 &          0.870612 &           0.941825 &                   0.762287 &               0.933801 &                 0.938816 &                 0.959880 &           0.950853 &           0.937813 &                 0.932798 &         0.925777 &           0.891675 \\
0.335 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.340 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.345 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.350 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.355 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.360 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.365 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.370 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.375 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.380 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.385 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.390 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.395 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.400 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.405 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.410 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.415 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.420 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.425 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.430 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.435 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.440 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.445 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.450 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.455 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.460 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.465 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.470 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.475 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.480 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.485 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.490 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.495 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
0.500 &                             0.955912 &              0.946894 &                   0.949900 &       0.965932 &                          0.900802 &                0.870741 &             0.937876 &                  0.924850 &          0.870741 &           0.941884 &                   0.762525 &               0.933868 &                 0.938878 &                 0.959920 &           0.950902 &           0.937876 &                 0.932866 &         0.925852 &           0.891784 \\
\bottomrule
\end{tabular}
