\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
Tolerance (\%) &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.0000        &                                0.000 &                 0.000 &                      0.000 &          0.000 &                             0.000 &                   0.000 &                0.000 &                     0.000 &             0.000 &              0.000 &                      0.000 &                  0.000 &                    0.000 &                    0.000 &              0.000 &              0.000 &                    0.000 &            0.000 &              0.000 \\
0.0005        &                                0.056 &                 0.080 &                      0.066 &          0.081 &                             0.126 &                   0.067 &                0.081 &                     0.646 &             0.088 &              0.285 &                      0.028 &                  0.089 &                    0.087 &                    0.088 &              0.090 &              0.086 &                    0.086 &            0.034 &              0.087 \\
0.0010        &                                0.099 &                 0.150 &                      0.151 &          0.156 &                             0.126 &                   0.148 &                0.094 &                     0.653 &             0.095 &              0.294 &                      0.064 &                  0.182 &                    0.179 &                    0.182 &              0.099 &              0.099 &                    0.101 &            0.041 &              0.175 \\
0.0015        &                                0.137 &                 0.227 &                      0.219 &          0.230 &                             0.130 &                   0.227 &                0.186 &                     0.657 &             0.112 &              0.299 &                      0.092 &                  0.253 &                    0.257 &                    0.260 &              0.182 &              0.192 &                    0.185 &            0.083 &              0.252 \\
0.0020        &                                0.222 &                 0.313 &                      0.293 &          0.297 &                             0.133 &                   0.290 &                0.259 &                     0.658 &             0.149 &              0.301 &                      0.119 &                  0.334 &                    0.351 &                    0.356 &              0.250 &              0.257 &                    0.247 &            0.121 &              0.313 \\
0.0025        &                                0.249 &                 0.386 &                      0.364 &          0.371 &                             0.137 &                   0.349 &                0.279 &                     0.661 &             0.171 &              0.315 &                      0.162 &                  0.396 &                    0.410 &                    0.415 &              0.270 &              0.283 &                    0.266 &            0.139 &              0.378 \\
0.0030        &                                0.302 &                 0.424 &                      0.422 &          0.456 &                             0.138 &                   0.413 &                0.296 &                     0.664 &             0.183 &              0.410 &                      0.189 &                  0.467 &                    0.471 &                    0.477 &              0.291 &              0.302 &                    0.279 &            0.146 &              0.434 \\
0.0035        &                                0.368 &                 0.483 &                      0.481 &          0.538 &                             0.140 &                   0.470 &                0.399 &                     0.672 &             0.265 &              0.486 &                      0.212 &                  0.530 &                    0.529 &                    0.535 &              0.395 &              0.406 &                    0.393 &            0.219 &              0.512 \\
0.0040        &                                0.419 &                 0.540 &                      0.537 &          0.591 &                             0.144 &                   0.517 &                0.502 &                     0.680 &             0.335 &              0.550 &                      0.261 &                  0.585 &                    0.591 &                    0.598 &              0.478 &              0.502 &                    0.483 &            0.272 &              0.565 \\
0.0045        &                                0.446 &                 0.579 &                      0.602 &          0.650 &                             0.146 &                   0.586 &                0.566 &                     0.690 &             0.362 &              0.600 &                      0.301 &                  0.648 &                    0.649 &                    0.657 &              0.534 &              0.546 &                    0.524 &            0.307 &              0.620 \\
0.0050        &                                0.520 &                 0.624 &                      0.635 &          0.692 &                             0.146 &                   0.636 &                0.608 &                     0.704 &             0.381 &              0.679 &                      0.349 &                  0.706 &                    0.708 &                    0.716 &              0.578 &              0.580 &                    0.565 &            0.323 &              0.668 \\
0.0055        &                                0.541 &                 0.667 &                      0.669 &          0.735 &                             0.148 &                   0.658 &                0.644 &                     0.712 &             0.408 &              0.727 &                      0.383 &                  0.752 &                    0.746 &                    0.754 &              0.619 &              0.616 &                    0.612 &            0.359 &              0.709 \\
0.0060        &                                0.556 &                 0.702 &                      0.708 &          0.777 &                             0.151 &                   0.676 &                0.664 &                     0.730 &             0.427 &              0.778 &                      0.402 &                  0.780 &                    0.782 &                    0.789 &              0.644 &              0.633 &                    0.635 &            0.377 &              0.743 \\
0.0065        &                                0.619 &                 0.737 &                      0.741 &          0.808 &                             0.155 &                   0.695 &                0.718 &                     0.742 &             0.449 &              0.807 &                      0.442 &                  0.796 &                    0.802 &                    0.809 &              0.716 &              0.686 &                    0.696 &            0.426 &              0.758 \\
0.0070        &                                0.654 &                 0.767 &                      0.763 &          0.834 &                             0.160 &                   0.718 &                0.743 &                     0.753 &             0.456 &              0.822 &                      0.461 &                  0.803 &                    0.818 &                    0.826 &              0.739 &              0.712 &                    0.726 &            0.457 &              0.772 \\
0.0075        &                                0.675 &                 0.789 &                      0.782 &          0.857 &                             0.168 &                   0.730 &                0.776 &                     0.772 &             0.486 &              0.840 &                      0.479 &                  0.816 &                    0.831 &                    0.841 &              0.760 &              0.742 &                    0.750 &            0.499 &              0.779 \\
0.0080        &                                0.710 &                 0.820 &                      0.804 &          0.870 &                             0.184 &                   0.740 &                0.789 &                     0.783 &             0.494 &              0.852 &                      0.497 &                  0.829 &                    0.839 &                    0.849 &              0.779 &              0.772 &                    0.765 &            0.511 &              0.786 \\
0.0085        &                                0.733 &                 0.833 &                      0.826 &          0.884 &                             0.200 &                   0.748 &                0.795 &                     0.787 &             0.499 &              0.856 &                      0.517 &                  0.836 &                    0.847 &                    0.857 &              0.785 &              0.777 &                    0.773 &            0.526 &              0.796 \\
0.0090        &                                0.764 &                 0.847 &                      0.842 &          0.888 &                             0.221 &                   0.755 &                0.816 &                     0.800 &             0.501 &              0.865 &                      0.533 &                  0.843 &                    0.854 &                    0.864 &              0.809 &              0.794 &                    0.793 &            0.574 &              0.804 \\
0.0095        &                                0.778 &                 0.856 &                      0.849 &          0.892 &                             0.252 &                   0.759 &                0.826 &                     0.814 &             0.509 &              0.874 &                      0.543 &                  0.850 &                    0.862 &                    0.872 &              0.826 &              0.811 &                    0.803 &            0.595 &              0.812 \\
0.0100        &                                0.804 &                 0.860 &                      0.862 &          0.899 &                             0.290 &                   0.766 &                0.830 &                     0.835 &             0.521 &              0.882 &                      0.555 &                  0.858 &                    0.867 &                    0.878 &              0.829 &              0.821 &                    0.808 &            0.609 &              0.817 \\
0.0105        &                                0.822 &                 0.871 &                      0.871 &          0.907 &                             0.309 &                   0.775 &                0.839 &                     0.845 &             0.538 &              0.886 &                      0.559 &                  0.866 &                    0.879 &                    0.890 &              0.842 &              0.834 &                    0.820 &            0.637 &              0.825 \\
0.0110        &                                0.835 &                 0.878 &                      0.878 &          0.913 &                             0.331 &                   0.782 &                0.841 &                     0.853 &             0.557 &              0.888 &                      0.562 &                  0.867 &                    0.880 &                    0.891 &              0.847 &              0.838 &                    0.829 &            0.647 &              0.836 \\
0.0115        &                                0.847 &                 0.884 &                      0.886 &          0.915 &                             0.367 &                   0.786 &                0.848 &                     0.859 &             0.564 &              0.891 &                      0.574 &                  0.871 &                    0.884 &                    0.895 &              0.854 &              0.848 &                    0.833 &            0.659 &              0.843 \\
0.0120        &                                0.863 &                 0.889 &                      0.892 &          0.920 &                             0.401 &                   0.789 &                0.862 &                     0.871 &             0.595 &              0.893 &                      0.588 &                  0.873 &                    0.885 &                    0.896 &              0.863 &              0.853 &                    0.837 &            0.686 &              0.846 \\
0.0125        &                                0.879 &                 0.895 &                      0.896 &          0.922 &                             0.441 &                   0.795 &                0.865 &                     0.880 &             0.643 &              0.899 &                      0.599 &                  0.879 &                    0.887 &                    0.898 &              0.871 &              0.858 &                    0.848 &            0.705 &              0.847 \\
0.0130        &                                0.881 &                 0.897 &                      0.899 &          0.924 &                             0.462 &                   0.798 &                0.866 &                     0.892 &             0.656 &              0.899 &                      0.606 &                  0.882 &                    0.891 &                    0.902 &              0.872 &              0.859 &                    0.853 &            0.708 &              0.848 \\
0.0135        &                                0.898 &                 0.903 &                      0.904 &          0.926 &                             0.471 &                   0.805 &                0.874 &                     0.898 &             0.690 &              0.900 &                      0.615 &                  0.887 &                    0.896 &                    0.907 &              0.883 &              0.866 &                    0.866 &            0.756 &              0.852 \\
0.0140        &                                0.900 &                 0.911 &                      0.907 &          0.927 &                             0.501 &                   0.808 &                0.884 &                     0.902 &             0.707 &              0.902 &                      0.626 &                  0.888 &                    0.897 &                    0.908 &              0.886 &              0.874 &                    0.871 &            0.781 &              0.855 \\
0.0145        &                                0.901 &                 0.912 &                      0.908 &          0.929 &                             0.510 &                   0.815 &                0.885 &                     0.906 &             0.720 &              0.907 &                      0.633 &                  0.890 &                    0.899 &                    0.910 &              0.889 &              0.877 &                    0.872 &            0.792 &              0.860 \\
0.0150        &                                0.906 &                 0.914 &                      0.908 &          0.931 &                             0.531 &                   0.815 &                0.886 &                     0.906 &             0.738 &              0.909 &                      0.643 &                  0.894 &                    0.903 &                    0.914 &              0.894 &              0.885 &                    0.878 &            0.801 &              0.863 \\
0.0155        &                                0.909 &                 0.917 &                      0.912 &          0.932 &                             0.539 &                   0.818 &                0.889 &                     0.908 &             0.747 &              0.910 &                      0.648 &                  0.896 &                    0.906 &                    0.918 &              0.897 &              0.889 &                    0.882 &            0.816 &              0.864 \\
0.0160        &                                0.920 &                 0.918 &                      0.914 &          0.934 &                             0.550 &                   0.820 &                0.890 &                     0.908 &             0.759 &              0.912 &                      0.657 &                  0.898 &                    0.906 &                    0.918 &              0.900 &              0.895 &                    0.887 &            0.823 &              0.866 \\
0.0165        &                                0.921 &                 0.919 &                      0.916 &          0.937 &                             0.564 &                   0.825 &                0.895 &                     0.909 &             0.766 &              0.913 &                      0.665 &                  0.899 &                    0.907 &                    0.920 &              0.902 &              0.900 &                    0.891 &            0.830 &              0.868 \\
0.0170        &                                0.922 &                 0.920 &                      0.920 &          0.938 &                             0.572 &                   0.827 &                0.898 &                     0.909 &             0.780 &              0.915 &                      0.672 &                  0.901 &                    0.910 &                    0.923 &              0.905 &              0.902 &                    0.893 &            0.834 &              0.870 \\
0.0175        &                                0.923 &                 0.920 &                      0.920 &          0.939 &                             0.584 &                   0.829 &                0.900 &                     0.909 &             0.784 &              0.916 &                      0.679 &                  0.903 &                    0.910 &                    0.924 &              0.907 &              0.903 &                    0.893 &            0.837 &              0.871 \\
0.0180        &                                0.927 &                 0.923 &                      0.921 &          0.939 &                             0.601 &                   0.832 &                0.900 &                     0.909 &             0.792 &              0.916 &                      0.683 &                  0.907 &                    0.910 &                    0.925 &              0.910 &              0.904 &                    0.897 &            0.845 &              0.872 \\
0.0185        &                                0.929 &                 0.926 &                      0.923 &          0.940 &                             0.607 &                   0.835 &                0.903 &                     0.910 &             0.793 &              0.920 &                      0.685 &                  0.909 &                    0.913 &                    0.927 &              0.912 &              0.906 &                    0.901 &            0.847 &              0.872 \\
0.0190        &                                0.930 &                 0.927 &                      0.924 &          0.943 &                             0.630 &                   0.836 &                0.904 &                     0.910 &             0.802 &              0.920 &                      0.692 &                  0.910 &                    0.913 &                    0.927 &              0.919 &              0.915 &                    0.908 &            0.858 &              0.872 \\
0.0195        &                                0.932 &                 0.928 &                      0.926 &          0.944 &                             0.647 &                   0.838 &                0.904 &                     0.910 &             0.805 &              0.923 &                      0.696 &                  0.911 &                    0.915 &                    0.929 &              0.920 &              0.916 &                    0.908 &            0.860 &              0.874 \\
0.0200        &                                0.936 &                 0.929 &                      0.929 &          0.945 &                             0.670 &                   0.838 &                0.905 &                     0.912 &             0.806 &              0.925 &                      0.699 &                  0.911 &                    0.916 &                    0.930 &              0.920 &              0.916 &                    0.908 &            0.864 &              0.874 \\
0.0205        &                                0.937 &                 0.930 &                      0.931 &          0.946 &                             0.687 &                   0.839 &                0.908 &                     0.912 &             0.809 &              0.928 &                      0.705 &                  0.912 &                    0.917 &                    0.931 &              0.923 &              0.918 &                    0.909 &            0.869 &              0.874 \\
0.0210        &                                0.937 &                 0.930 &                      0.932 &          0.947 &                             0.702 &                   0.841 &                0.909 &                     0.913 &             0.812 &              0.929 &                      0.709 &                  0.913 &                    0.917 &                    0.931 &              0.924 &              0.919 &                    0.910 &            0.875 &              0.876 \\
0.0215        &                                0.940 &                 0.933 &                      0.933 &          0.948 &                             0.718 &                   0.841 &                0.909 &                     0.914 &             0.815 &              0.929 &                      0.710 &                  0.914 &                    0.917 &                    0.932 &              0.925 &              0.921 &                    0.911 &            0.878 &              0.877 \\
0.0220        &                                0.941 &                 0.934 &                      0.933 &          0.948 &                             0.734 &                   0.841 &                0.912 &                     0.915 &             0.819 &              0.931 &                      0.715 &                  0.914 &                    0.918 &                    0.933 &              0.929 &              0.923 &                    0.914 &            0.881 &              0.877 \\
0.0225        &                                0.941 &                 0.935 &                      0.933 &          0.950 &                             0.744 &                   0.843 &                0.912 &                     0.916 &             0.820 &              0.931 &                      0.717 &                  0.915 &                    0.919 &                    0.935 &              0.929 &              0.924 &                    0.914 &            0.882 &              0.878 \\
0.0230        &                                0.941 &                 0.936 &                      0.935 &          0.950 &                             0.759 &                   0.844 &                0.912 &                     0.917 &             0.821 &              0.932 &                      0.718 &                  0.918 &                    0.920 &                    0.936 &              0.929 &              0.925 &                    0.914 &            0.882 &              0.879 \\
0.0235        &                                0.941 &                 0.936 &                      0.935 &          0.950 &                             0.780 &                   0.845 &                0.913 &                     0.918 &             0.828 &              0.932 &                      0.721 &                  0.918 &                    0.921 &                    0.937 &              0.929 &              0.925 &                    0.916 &            0.885 &              0.880 \\
0.0240        &                                0.941 &                 0.937 &                      0.935 &          0.950 &                             0.796 &                   0.846 &                0.913 &                     0.918 &             0.833 &              0.933 &                      0.722 &                  0.919 &                    0.921 &                    0.937 &              0.931 &              0.927 &                    0.917 &            0.888 &              0.880 \\
0.0245        &                                0.941 &                 0.937 &                      0.937 &          0.951 &                             0.813 &                   0.847 &                0.913 &                     0.918 &             0.835 &              0.933 &                      0.724 &                  0.920 &                    0.922 &                    0.938 &              0.932 &              0.927 &                    0.918 &            0.889 &              0.882 \\
0.0250        &                                0.941 &                 0.938 &                      0.938 &          0.951 &                             0.821 &                   0.848 &                0.914 &                     0.918 &             0.842 &              0.934 &                      0.728 &                  0.920 &                    0.922 &                    0.938 &              0.935 &              0.930 &                    0.919 &            0.898 &              0.882 \\
0.0255        &                                0.941 &                 0.940 &                      0.938 &          0.952 &                             0.825 &                   0.849 &                0.915 &                     0.918 &             0.843 &              0.934 &                      0.728 &                  0.923 &                    0.922 &                    0.938 &              0.935 &              0.932 &                    0.920 &            0.898 &              0.882 \\
0.0260        &                                0.942 &                 0.940 &                      0.940 &          0.952 &                             0.837 &                   0.849 &                0.916 &                     0.919 &             0.844 &              0.936 &                      0.731 &                  0.923 &                    0.923 &                    0.939 &              0.937 &              0.934 &                    0.922 &            0.899 &              0.883 \\
0.0265        &                                0.942 &                 0.941 &                      0.942 &          0.953 &                             0.846 &                   0.849 &                0.918 &                     0.919 &             0.846 &              0.937 &                      0.741 &                  0.924 &                    0.924 &                    0.940 &              0.939 &              0.935 &                    0.923 &            0.905 &              0.883 \\
0.0270        &                                0.942 &                 0.942 &                      0.942 &          0.953 &                             0.848 &                   0.849 &                0.918 &                     0.921 &             0.851 &              0.937 &                      0.741 &                  0.924 &                    0.924 &                    0.940 &              0.939 &              0.936 &                    0.923 &            0.907 &              0.883 \\
0.0275        &                                0.943 &                 0.943 &                      0.943 &          0.954 &                             0.854 &                   0.850 &                0.918 &                     0.921 &             0.851 &              0.937 &                      0.743 &                  0.924 &                    0.924 &                    0.940 &              0.939 &              0.936 &                    0.923 &            0.909 &              0.885 \\
0.0280        &                                0.945 &                 0.943 &                      0.943 &          0.954 &                             0.857 &                   0.851 &                0.918 &                     0.921 &             0.852 &              0.938 &                      0.750 &                  0.924 &                    0.924 &                    0.940 &              0.939 &              0.936 &                    0.923 &            0.909 &              0.885 \\
0.0285        &                                0.946 &                 0.946 &                      0.943 &          0.956 &                             0.858 &                   0.852 &                0.919 &                     0.923 &             0.852 &              0.940 &                      0.752 &                  0.925 &                    0.924 &                    0.940 &              0.939 &              0.937 &                    0.924 &            0.909 &              0.886 \\
0.0290        &                                0.947 &                 0.947 &                      0.944 &          0.958 &                             0.863 &                   0.855 &                0.919 &                     0.923 &             0.853 &              0.940 &                      0.753 &                  0.925 &                    0.924 &                    0.940 &              0.941 &              0.939 &                    0.927 &            0.909 &              0.886 \\
0.0295        &                                0.948 &                 0.948 &                      0.945 &          0.959 &                             0.873 &                   0.858 &                0.919 &                     0.923 &             0.856 &              0.941 &                      0.756 &                  0.925 &                    0.924 &                    0.940 &              0.942 &              0.939 &                    0.928 &            0.910 &              0.886 \\
0.0300        &                                0.949 &                 0.948 &                      0.945 &          0.959 &                             0.874 &                   0.859 &                0.920 &                     0.924 &             0.856 &              0.942 &                      0.756 &                  0.925 &                    0.924 &                    0.940 &              0.942 &              0.939 &                    0.928 &            0.910 &              0.886 \\
0.0305        &                                0.949 &                 0.950 &                      0.945 &          0.960 &                             0.883 &                   0.860 &                0.921 &                     0.925 &             0.857 &              0.942 &                      0.756 &                  0.925 &                    0.924 &                    0.940 &              0.942 &              0.939 &                    0.928 &            0.913 &              0.887 \\
0.0310        &                                0.949 &                 0.950 &                      0.945 &          0.960 &                             0.883 &                   0.860 &                0.922 &                     0.925 &             0.860 &              0.942 &                      0.756 &                  0.926 &                    0.924 &                    0.940 &              0.942 &              0.941 &                    0.929 &            0.914 &              0.887 \\
0.0315        &                                0.949 &                 0.950 &                      0.947 &          0.960 &                             0.893 &                   0.860 &                0.923 &                     0.925 &             0.860 &              0.943 &                      0.759 &                  0.928 &                    0.926 &                    0.942 &              0.943 &              0.941 &                    0.929 &            0.916 &              0.889 \\
0.0320        &                                0.949 &                 0.952 &                      0.949 &          0.961 &                             0.893 &                   0.860 &                0.923 &                     0.926 &             0.861 &              0.943 &                      0.759 &                  0.928 &                    0.927 &                    0.943 &              0.943 &              0.941 &                    0.930 &            0.916 &              0.889 \\
0.0325        &                                0.949 &                 0.952 &                      0.950 &          0.961 &                             0.897 &                   0.861 &                0.925 &                     0.926 &             0.861 &              0.943 &                      0.762 &                  0.928 &                    0.927 &                    0.943 &              0.943 &              0.943 &                    0.930 &            0.917 &              0.889 \\
0.0330        &                                0.951 &                 0.952 &                      0.950 &          0.961 &                             0.902 &                   0.861 &                0.926 &                     0.926 &             0.863 &              0.943 &                      0.762 &                  0.929 &                    0.928 &                    0.944 &              0.943 &              0.945 &                    0.930 &            0.919 &              0.890 \\
0.0335        &                                0.951 &                 0.952 &                      0.950 &          0.961 &                             0.906 &                   0.861 &                0.929 &                     0.926 &             0.864 &              0.943 &                      0.763 &                  0.929 &                    0.930 &                    0.946 &              0.943 &              0.946 &                    0.930 &            0.921 &              0.891 \\
0.0340        &                                0.951 &                 0.952 &                      0.950 &          0.961 &                             0.907 &                   0.864 &                0.931 &                     0.926 &             0.864 &              0.943 &                      0.763 &                  0.929 &                    0.930 &                    0.946 &              0.943 &              0.946 &                    0.930 &            0.922 &              0.891 \\
0.0345        &                                0.951 &                 0.952 &                      0.950 &          0.961 &                             0.908 &                   0.864 &                0.932 &                     0.926 &             0.864 &              0.944 &                      0.763 &                  0.931 &                    0.931 &                    0.947 &              0.943 &              0.946 &                    0.931 &            0.924 &              0.891 \\
0.0350        &                                0.951 &                 0.952 &                      0.950 &          0.962 &                             0.910 &                   0.865 &                0.933 &                     0.926 &             0.866 &              0.944 &                      0.763 &                  0.932 &                    0.932 &                    0.948 &              0.946 &              0.947 &                    0.931 &            0.926 &              0.891 \\
0.0355        &                                0.951 &                 0.952 &                      0.950 &          0.962 &                             0.910 &                   0.867 &                0.933 &                     0.926 &             0.866 &              0.945 &                      0.765 &                  0.932 &                    0.932 &                    0.948 &              0.946 &              0.947 &                    0.931 &            0.926 &              0.891 \\
0.0360        &                                0.953 &                 0.953 &                      0.950 &          0.962 &                             0.914 &                   0.869 &                0.933 &                     0.927 &             0.866 &              0.945 &                      0.768 &                  0.932 &                    0.932 &                    0.948 &              0.946 &              0.947 &                    0.931 &            0.928 &              0.891 \\
0.0365        &                                0.954 &                 0.953 &                      0.951 &          0.962 &                             0.915 &                   0.870 &                0.933 &                     0.927 &             0.870 &              0.945 &                      0.769 &                  0.932 &                    0.932 &                    0.948 &              0.947 &              0.947 &                    0.931 &            0.930 &              0.891 \\
0.0370        &                                0.954 &                 0.953 &                      0.951 &          0.962 &                             0.917 &                   0.871 &                0.933 &                     0.927 &             0.871 &              0.945 &                      0.769 &                  0.934 &                    0.933 &                    0.949 &              0.947 &              0.948 &                    0.931 &            0.930 &              0.891 \\
0.0375        &                                0.955 &                 0.953 &                      0.951 &          0.962 &                             0.918 &                   0.871 &                0.935 &                     0.928 &             0.872 &              0.945 &                      0.769 &                  0.934 &                    0.933 &                    0.949 &              0.948 &              0.949 &                    0.932 &            0.930 &              0.891 \\
0.0380        &                                0.956 &                 0.953 &                      0.951 &          0.962 &                             0.918 &                   0.871 &                0.935 &                     0.928 &             0.874 &              0.945 &                      0.769 &                  0.935 &                    0.935 &                    0.951 &              0.948 &              0.949 &                    0.933 &            0.930 &              0.891 \\
0.0385        &                                0.956 &                 0.953 &                      0.951 &          0.962 &                             0.919 &                   0.873 &                0.935 &                     0.928 &             0.874 &              0.945 &                      0.769 &                  0.935 &                    0.935 &                    0.951 &              0.948 &              0.949 &                    0.933 &            0.930 &              0.891 \\
0.0390        &                                0.956 &                 0.953 &                      0.951 &          0.962 &                             0.919 &                   0.874 &                0.935 &                     0.928 &             0.878 &              0.945 &                      0.770 &                  0.936 &                    0.935 &                    0.951 &              0.950 &              0.951 &                    0.935 &            0.931 &              0.891 \\
0.0395        &                                0.956 &                 0.953 &                      0.952 &          0.962 &                             0.920 &                   0.875 &                0.935 &                     0.928 &             0.879 &              0.945 &                      0.770 &                  0.936 &                    0.936 &                    0.952 &              0.950 &              0.951 &                    0.935 &            0.931 &              0.892 \\
0.0400        &                                0.956 &                 0.953 &                      0.952 &          0.962 &                             0.922 &                   0.876 &                0.936 &                     0.928 &             0.879 &              0.945 &                      0.770 &                  0.936 &                    0.936 &                    0.952 &              0.950 &              0.952 &                    0.935 &            0.931 &              0.892 \\
0.0405        &                                0.957 &                 0.953 &                      0.952 &          0.962 &                             0.922 &                   0.876 &                0.936 &                     0.928 &             0.879 &              0.945 &                      0.773 &                  0.936 &                    0.936 &                    0.952 &              0.951 &              0.953 &                    0.936 &            0.931 &              0.892 \\
0.0410        &                                0.957 &                 0.953 &                      0.952 &          0.962 &                             0.922 &                   0.877 &                0.936 &                     0.929 &             0.881 &              0.945 &                      0.773 &                  0.936 &                    0.936 &                    0.952 &              0.951 &              0.953 &                    0.938 &            0.932 &              0.892 \\
0.0415        &                                0.957 &                 0.953 &                      0.952 &          0.962 &                             0.922 &                   0.877 &                0.936 &                     0.930 &             0.882 &              0.945 &                      0.774 &                  0.937 &                    0.938 &                    0.954 &              0.952 &              0.953 &                    0.938 &            0.933 &              0.893 \\
0.0420        &                                0.957 &                 0.953 &                      0.952 &          0.962 &                             0.922 &                   0.878 &                0.936 &                     0.930 &             0.882 &              0.945 &                      0.774 &                  0.938 &                    0.938 &                    0.954 &              0.952 &              0.953 &                    0.939 &            0.934 &              0.893 \\
0.0425        &                                0.959 &                 0.953 &                      0.952 &          0.963 &                             0.923 &                   0.879 &                0.936 &                     0.930 &             0.883 &              0.945 &                      0.774 &                  0.938 &                    0.940 &                    0.956 &              0.953 &              0.954 &                    0.939 &            0.936 &              0.893 \\
0.0430        &                                0.959 &                 0.953 &                      0.952 &          0.963 &                             0.925 &                   0.879 &                0.936 &                     0.931 &             0.885 &              0.945 &                      0.774 &                  0.938 &                    0.940 &                    0.956 &              0.953 &              0.954 &                    0.939 &            0.936 &              0.893 \\
0.0435        &                                0.959 &                 0.953 &                      0.952 &          0.964 &                             0.925 &                   0.879 &                0.936 &                     0.931 &             0.886 &              0.947 &                      0.774 &                  0.938 &                    0.940 &                    0.956 &              0.953 &              0.954 &                    0.939 &            0.936 &              0.893 \\
0.0440        &                                0.959 &                 0.953 &                      0.952 &          0.964 &                             0.926 &                   0.879 &                0.936 &                     0.931 &             0.886 &              0.947 &                      0.774 &                  0.939 &                    0.941 &                    0.957 &              0.953 &              0.954 &                    0.939 &            0.936 &              0.893 \\
0.0445        &                                0.959 &                 0.953 &                      0.952 &          0.964 &                             0.927 &                   0.879 &                0.936 &                     0.931 &             0.886 &              0.947 &                      0.774 &                  0.939 &                    0.941 &                    0.957 &              0.953 &              0.954 &                    0.939 &            0.936 &              0.893 \\
0.0450        &                                0.959 &                 0.953 &                      0.952 &          0.964 &                             0.928 &                   0.879 &                0.936 &                     0.932 &             0.887 &              0.947 &                      0.774 &                  0.939 &                    0.941 &                    0.957 &              0.953 &              0.954 &                    0.939 &            0.936 &              0.893 \\
0.0455        &                                0.959 &                 0.954 &                      0.953 &          0.964 &                             0.929 &                   0.879 &                0.936 &                     0.932 &             0.887 &              0.947 &                      0.774 &                  0.939 &                    0.941 &                    0.957 &              0.953 &              0.954 &                    0.940 &            0.936 &              0.893 \\
0.0460        &                                0.959 &                 0.954 &                      0.953 &          0.964 &                             0.929 &                   0.880 &                0.938 &                     0.932 &             0.887 &              0.947 &                      0.774 &                  0.939 &                    0.942 &                    0.958 &              0.954 &              0.954 &                    0.940 &            0.936 &              0.893 \\
0.0465        &                                0.959 &                 0.954 &                      0.953 &          0.965 &                             0.929 &                   0.880 &                0.939 &                     0.932 &             0.887 &              0.947 &                      0.774 &                  0.939 &                    0.942 &                    0.958 &              0.954 &              0.954 &                    0.940 &            0.936 &              0.893 \\
0.0470        &                                0.959 &                 0.954 &                      0.953 &          0.965 &                             0.930 &                   0.880 &                0.939 &                     0.932 &             0.887 &              0.948 &                      0.774 &                  0.939 &                    0.942 &                    0.958 &              0.954 &              0.954 &                    0.940 &            0.936 &              0.893 \\
0.0475        &                                0.959 &                 0.954 &                      0.953 &          0.965 &                             0.930 &                   0.880 &                0.939 &                     0.932 &             0.887 &              0.948 &                      0.774 &                  0.939 &                    0.943 &                    0.959 &              0.954 &              0.954 &                    0.940 &            0.936 &              0.893 \\
0.0480        &                                0.960 &                 0.954 &                      0.953 &          0.965 &                             0.930 &                   0.880 &                0.939 &                     0.932 &             0.887 &              0.949 &                      0.774 &                  0.940 &                    0.943 &                    0.960 &              0.954 &              0.954 &                    0.940 &            0.936 &              0.893 \\
0.0485        &                                0.960 &                 0.954 &                      0.953 &          0.966 &                             0.932 &                   0.880 &                0.940 &                     0.932 &             0.887 &              0.949 &                      0.775 &                  0.941 &                    0.944 &                    0.961 &              0.954 &              0.956 &                    0.940 &            0.936 &              0.893 \\
0.0490        &                                0.960 &                 0.954 &                      0.953 &          0.966 &                             0.932 &                   0.881 &                0.940 &                     0.934 &             0.888 &              0.949 &                      0.775 &                  0.941 &                    0.944 &                    0.961 &              0.954 &              0.956 &                    0.940 &            0.937 &              0.893 \\
0.0495        &                                0.960 &                 0.954 &                      0.953 &          0.966 &                             0.932 &                   0.881 &                0.941 &                     0.934 &             0.888 &              0.949 &                      0.777 &                  0.942 &                    0.944 &                    0.961 &              0.954 &              0.956 &                    0.940 &            0.938 &              0.893 \\
0.0500        &                                0.960 &                 0.954 &                      0.954 &          0.966 &                             0.933 &                   0.882 &                0.941 &                     0.934 &             0.889 &              0.949 &                      0.777 &                  0.942 &                    0.944 &                    0.961 &              0.954 &              0.956 &                    0.940 &            0.938 &              0.893 \\
\bottomrule
\end{tabular}
