\begin{tabular}{lrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2019/multi\_task &  boeck2019/multi\_task\_hjdb &  boeck2020/dar &  davies2009/mirex\_qm\_tempotracker &  echonest/version\_3\_2\_1 &  gkiokas2012/default &  klapuri2006/percival2014 &  oliveira2010/ibt &  percival2014/stem &  scheirer1998/percival2014 &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn &  schreiber2018/ismir2018 &  sun2021/default &  zplane/auftakt\_v3 \\
Tolerance (\%) &                                      &                       &                            &                &                                   &                         &                      &                           &                   &                    &                            &                        &                          &                          &                    &                    &                          &                  &                    \\
\midrule
0.0000        &                                0.000 &                 0.000 &                      0.000 &          0.000 &                             0.000 &                   0.000 &                0.000 &                     0.000 &             0.000 &              0.000 &                      0.000 &                  0.000 &                    0.000 &                    0.000 &              0.000 &              0.000 &                    0.000 &            0.000 &              0.000 \\
0.0005        &                                0.062 &                 0.118 &                      0.085 &          0.154 &                             0.015 &                   0.165 &                0.123 &                     0.211 &             0.070 &              0.432 &                      0.043 &                  0.223 &                    0.222 &                    0.224 &              0.128 &              0.116 &                    0.129 &            0.045 &              0.196 \\
0.0010        &                                0.097 &                 0.234 &                      0.215 &          0.302 &                             0.015 &                   0.327 &                0.207 &                     0.225 &             0.110 &              0.458 &                      0.086 &                  0.425 &                    0.426 &                    0.430 &              0.204 &              0.199 &                    0.213 &            0.071 &              0.396 \\
0.0015        &                                0.160 &                 0.332 &                      0.309 &          0.419 &                             0.015 &                   0.445 &                0.322 &                     0.245 &             0.156 &              0.490 &                      0.117 &                  0.564 &                    0.573 &                    0.577 &              0.310 &              0.314 &                    0.317 &            0.128 &              0.515 \\
0.0020        &                                0.223 &                 0.415 &                      0.402 &          0.524 &                             0.022 &                   0.517 &                0.418 &                     0.282 &             0.194 &              0.534 &                      0.153 &                  0.655 &                    0.659 &                    0.666 &              0.391 &              0.398 &                    0.404 &            0.172 &              0.593 \\
0.0025        &                                0.268 &                 0.491 &                      0.475 &          0.600 &                             0.046 &                   0.561 &                0.450 &                     0.374 &             0.214 &              0.617 &                      0.183 &                  0.698 &                    0.699 &                    0.708 &              0.428 &              0.431 &                    0.442 &            0.189 &              0.637 \\
0.0030        &                                0.324 &                 0.558 &                      0.539 &          0.665 &                             0.066 &                   0.603 &                0.493 &                     0.480 &             0.231 &              0.698 &                      0.214 &                  0.733 &                    0.734 &                    0.743 &              0.476 &              0.464 &                    0.483 &            0.210 &              0.678 \\
0.0035        &                                0.379 &                 0.613 &                      0.595 &          0.728 &                             0.079 &                   0.628 &                0.556 &                     0.558 &             0.267 &              0.744 &                      0.236 &                  0.761 &                    0.759 &                    0.768 &              0.545 &              0.528 &                    0.553 &            0.247 &              0.715 \\
0.0040        &                                0.428 &                 0.669 &                      0.643 &          0.778 &                             0.090 &                   0.650 &                0.605 &                     0.611 &             0.294 &              0.769 &                      0.284 &                  0.778 &                    0.784 &                    0.793 &              0.589 &              0.577 &                    0.592 &            0.275 &              0.728 \\
0.0045        &                                0.464 &                 0.708 &                      0.687 &          0.809 &                             0.102 &                   0.673 &                0.649 &                     0.649 &             0.319 &              0.787 &                      0.320 &                  0.800 &                    0.801 &                    0.811 &              0.629 &              0.624 &                    0.630 &            0.304 &              0.743 \\
0.0050        &                                0.517 &                 0.745 &                      0.714 &          0.828 &                             0.125 &                   0.688 &                0.685 &                     0.709 &             0.346 &              0.812 &                      0.356 &                  0.814 &                    0.812 &                    0.822 &              0.655 &              0.656 &                    0.659 &            0.325 &              0.757 \\
0.0055        &                                0.548 &                 0.770 &                      0.753 &          0.846 &                             0.141 &                   0.702 &                0.716 &                     0.744 &             0.362 &              0.828 &                      0.384 &                  0.822 &                    0.822 &                    0.832 &              0.690 &              0.685 &                    0.684 &            0.351 &              0.771 \\
0.0060        &                                0.587 &                 0.796 &                      0.780 &          0.857 &                             0.158 &                   0.710 &                0.735 &                     0.773 &             0.401 &              0.843 &                      0.393 &                  0.834 &                    0.831 &                    0.841 &              0.713 &              0.710 &                    0.711 &            0.381 &              0.780 \\
0.0065        &                                0.640 &                 0.814 &                      0.805 &          0.870 &                             0.175 &                   0.719 &                0.765 &                     0.809 &             0.428 &              0.851 &                      0.431 &                  0.838 &                    0.839 &                    0.850 &              0.753 &              0.745 &                    0.740 &            0.416 &              0.785 \\
0.0070        &                                0.677 &                 0.832 &                      0.815 &          0.885 &                             0.193 &                   0.736 &                0.784 &                     0.824 &             0.455 &              0.859 &                      0.462 &                  0.844 &                    0.851 &                    0.862 &              0.767 &              0.759 &                    0.757 &            0.446 &              0.790 \\
0.0075        &                                0.724 &                 0.844 &                      0.826 &          0.900 &                             0.208 &                   0.741 &                0.800 &                     0.833 &             0.481 &              0.863 &                      0.485 &                  0.849 &                    0.856 &                    0.867 &              0.794 &              0.781 &                    0.772 &            0.482 &              0.800 \\
0.0080        &                                0.756 &                 0.859 &                      0.840 &          0.902 &                             0.222 &                   0.755 &                0.810 &                     0.841 &             0.510 &              0.873 &                      0.510 &                  0.856 &                    0.863 &                    0.875 &              0.802 &              0.792 &                    0.779 &            0.513 &              0.807 \\
0.0085        &                                0.784 &                 0.868 &                      0.851 &          0.906 &                             0.244 &                   0.762 &                0.828 &                     0.846 &             0.538 &              0.877 &                      0.528 &                  0.862 &                    0.870 &                    0.882 &              0.813 &              0.805 &                    0.796 &            0.531 &              0.820 \\
0.0090        &                                0.803 &                 0.877 &                      0.857 &          0.910 &                             0.272 &                   0.769 &                0.836 &                     0.853 &             0.560 &              0.879 &                      0.541 &                  0.866 &                    0.876 &                    0.888 &              0.826 &              0.813 &                    0.808 &            0.572 &              0.828 \\
0.0095        &                                0.823 &                 0.881 &                      0.865 &          0.915 &                             0.291 &                   0.773 &                0.848 &                     0.862 &             0.579 &              0.885 &                      0.561 &                  0.870 &                    0.881 &                    0.893 &              0.837 &              0.825 &                    0.813 &            0.597 &              0.832 \\
0.0100        &                                0.848 &                 0.883 &                      0.873 &          0.918 &                             0.320 &                   0.778 &                0.857 &                     0.871 &             0.610 &              0.890 &                      0.571 &                  0.878 &                    0.882 &                    0.895 &              0.844 &              0.837 &                    0.820 &            0.631 &              0.835 \\
0.0105        &                                0.856 &                 0.888 &                      0.880 &          0.922 &                             0.335 &                   0.782 &                0.864 &                     0.883 &             0.634 &              0.896 &                      0.586 &                  0.883 &                    0.890 &                    0.904 &              0.849 &              0.846 &                    0.829 &            0.657 &              0.837 \\
0.0110        &                                0.870 &                 0.892 &                      0.886 &          0.925 &                             0.347 &                   0.785 &                0.866 &                     0.887 &             0.664 &              0.898 &                      0.597 &                  0.886 &                    0.893 &                    0.907 &              0.852 &              0.849 &                    0.833 &            0.695 &              0.843 \\
0.0115        &                                0.880 &                 0.895 &                      0.896 &          0.927 &                             0.365 &                   0.789 &                0.867 &                     0.888 &             0.678 &              0.900 &                      0.611 &                  0.889 &                    0.896 &                    0.910 &              0.863 &              0.856 &                    0.845 &            0.717 &              0.846 \\
0.0120        &                                0.889 &                 0.900 &                      0.899 &          0.928 &                             0.380 &                   0.792 &                0.869 &                     0.894 &             0.691 &              0.903 &                      0.618 &                  0.893 &                    0.897 &                    0.911 &              0.868 &              0.859 &                    0.849 &            0.745 &              0.848 \\
0.0125        &                                0.896 &                 0.905 &                      0.901 &          0.932 &                             0.402 &                   0.796 &                0.872 &                     0.897 &             0.709 &              0.907 &                      0.627 &                  0.896 &                    0.898 &                    0.912 &              0.878 &              0.868 &                    0.859 &            0.763 &              0.852 \\
0.0130        &                                0.904 &                 0.906 &                      0.902 &          0.933 &                             0.422 &                   0.798 &                0.873 &                     0.898 &             0.719 &              0.908 &                      0.635 &                  0.898 &                    0.902 &                    0.916 &              0.879 &              0.871 &                    0.865 &            0.768 &              0.854 \\
0.0135        &                                0.906 &                 0.913 &                      0.905 &          0.935 &                             0.434 &                   0.803 &                0.879 &                     0.899 &             0.734 &              0.908 &                      0.644 &                  0.900 &                    0.902 &                    0.916 &              0.886 &              0.876 &                    0.870 &            0.786 &              0.855 \\
0.0140        &                                0.910 &                 0.916 &                      0.908 &          0.937 &                             0.451 &                   0.808 &                0.883 &                     0.899 &             0.745 &              0.909 &                      0.651 &                  0.902 &                    0.904 &                    0.919 &              0.890 &              0.883 &                    0.876 &            0.797 &              0.856 \\
0.0145        &                                0.914 &                 0.918 &                      0.913 &          0.939 &                             0.475 &                   0.813 &                0.885 &                     0.901 &             0.754 &              0.912 &                      0.655 &                  0.904 &                    0.906 &                    0.921 &              0.894 &              0.887 &                    0.879 &            0.805 &              0.857 \\
0.0150        &                                0.916 &                 0.920 &                      0.915 &          0.939 &                             0.503 &                   0.818 &                0.886 &                     0.903 &             0.763 &              0.915 &                      0.662 &                  0.909 &                    0.911 &                    0.926 &              0.896 &              0.890 &                    0.883 &            0.816 &              0.861 \\
0.0155        &                                0.919 &                 0.923 &                      0.918 &          0.939 &                             0.521 &                   0.821 &                0.887 &                     0.905 &             0.767 &              0.916 &                      0.665 &                  0.912 &                    0.912 &                    0.927 &              0.900 &              0.893 &                    0.888 &            0.825 &              0.862 \\
0.0160        &                                0.924 &                 0.924 &                      0.919 &          0.941 &                             0.538 &                   0.825 &                0.889 &                     0.908 &             0.775 &              0.918 &                      0.668 &                  0.914 &                    0.914 &                    0.929 &              0.906 &              0.900 &                    0.891 &            0.835 &              0.864 \\
0.0165        &                                0.925 &                 0.924 &                      0.920 &          0.942 &                             0.564 &                   0.827 &                0.893 &                     0.909 &             0.785 &              0.921 &                      0.668 &                  0.914 &                    0.914 &                    0.929 &              0.909 &              0.903 &                    0.893 &            0.842 &              0.866 \\
0.0170        &                                0.928 &                 0.926 &                      0.924 &          0.942 &                             0.585 &                   0.827 &                0.898 &                     0.909 &             0.787 &              0.921 &                      0.675 &                  0.914 &                    0.915 &                    0.930 &              0.913 &              0.906 &                    0.894 &            0.848 &              0.867 \\
0.0175        &                                0.929 &                 0.927 &                      0.928 &          0.942 &                             0.599 &                   0.827 &                0.901 &                     0.912 &             0.794 &              0.923 &                      0.683 &                  0.915 &                    0.916 &                    0.930 &              0.917 &              0.911 &                    0.895 &            0.852 &              0.868 \\
0.0180        &                                0.934 &                 0.929 &                      0.930 &          0.942 &                             0.623 &                   0.829 &                0.902 &                     0.913 &             0.798 &              0.923 &                      0.690 &                  0.917 &                    0.916 &                    0.931 &              0.920 &              0.914 &                    0.899 &            0.858 &              0.870 \\
0.0185        &                                0.935 &                 0.931 &                      0.931 &          0.942 &                             0.635 &                   0.832 &                0.905 &                     0.913 &             0.804 &              0.924 &                      0.693 &                  0.917 &                    0.918 &                    0.933 &              0.922 &              0.918 &                    0.902 &            0.861 &              0.871 \\
0.0190        &                                0.936 &                 0.931 &                      0.933 &          0.944 &                             0.662 &                   0.836 &                0.906 &                     0.915 &             0.808 &              0.925 &                      0.697 &                  0.918 &                    0.919 &                    0.934 &              0.922 &              0.919 &                    0.902 &            0.868 &              0.872 \\
0.0195        &                                0.937 &                 0.931 &                      0.933 &          0.945 &                             0.684 &                   0.837 &                0.906 &                     0.916 &             0.812 &              0.927 &                      0.700 &                  0.918 &                    0.920 &                    0.935 &              0.922 &              0.921 &                    0.904 &            0.872 &              0.874 \\
0.0200        &                                0.938 &                 0.932 &                      0.933 &          0.946 &                             0.700 &                   0.837 &                0.907 &                     0.916 &             0.813 &              0.927 &                      0.705 &                  0.920 &                    0.923 &                    0.938 &              0.923 &              0.922 &                    0.908 &            0.875 &              0.875 \\
0.0205        &                                0.938 &                 0.933 &                      0.934 &          0.948 &                             0.718 &                   0.839 &                0.912 &                     0.916 &             0.819 &              0.927 &                      0.708 &                  0.921 &                    0.924 &                    0.939 &              0.926 &              0.924 &                    0.911 &            0.882 &              0.875 \\
0.0210        &                                0.938 &                 0.933 &                      0.937 &          0.948 &                             0.730 &                   0.841 &                0.912 &                     0.916 &             0.821 &              0.927 &                      0.711 &                  0.922 &                    0.924 &                    0.939 &              0.927 &              0.928 &                    0.911 &            0.886 &              0.877 \\
0.0215        &                                0.941 &                 0.934 &                      0.937 &          0.948 &                             0.738 &                   0.841 &                0.912 &                     0.916 &             0.826 &              0.927 &                      0.715 &                  0.923 &                    0.924 &                    0.939 &              0.929 &              0.929 &                    0.913 &            0.889 &              0.879 \\
0.0220        &                                0.942 &                 0.935 &                      0.938 &          0.948 &                             0.751 &                   0.841 &                0.914 &                     0.916 &             0.828 &              0.928 &                      0.719 &                  0.923 &                    0.924 &                    0.939 &              0.930 &              0.930 &                    0.913 &            0.893 &              0.880 \\
0.0225        &                                0.943 &                 0.936 &                      0.939 &          0.949 &                             0.764 &                   0.843 &                0.914 &                     0.916 &             0.829 &              0.929 &                      0.726 &                  0.925 &                    0.924 &                    0.939 &              0.930 &              0.930 &                    0.913 &            0.894 &              0.880 \\
0.0230        &                                0.943 &                 0.936 &                      0.939 &          0.950 &                             0.773 &                   0.843 &                0.916 &                     0.917 &             0.831 &              0.929 &                      0.730 &                  0.925 &                    0.924 &                    0.939 &              0.930 &              0.931 &                    0.914 &            0.896 &              0.881 \\
0.0235        &                                0.943 &                 0.937 &                      0.939 &          0.950 &                             0.795 &                   0.844 &                0.917 &                     0.919 &             0.833 &              0.929 &                      0.731 &                  0.925 &                    0.924 &                    0.939 &              0.930 &              0.932 &                    0.916 &            0.898 &              0.882 \\
0.0240        &                                0.944 &                 0.939 &                      0.940 &          0.950 &                             0.804 &                   0.844 &                0.917 &                     0.919 &             0.834 &              0.930 &                      0.733 &                  0.925 &                    0.924 &                    0.939 &              0.931 &              0.935 &                    0.918 &            0.900 &              0.883 \\
0.0245        &                                0.944 &                 0.941 &                      0.941 &          0.950 &                             0.815 &                   0.844 &                0.918 &                     0.920 &             0.836 &              0.930 &                      0.737 &                  0.926 &                    0.925 &                    0.940 &              0.931 &              0.935 &                    0.919 &            0.903 &              0.884 \\
0.0250        &                                0.945 &                 0.943 &                      0.941 &          0.950 &                             0.825 &                   0.845 &                0.918 &                     0.920 &             0.838 &              0.931 &                      0.738 &                  0.926 &                    0.925 &                    0.940 &              0.932 &              0.935 &                    0.920 &            0.905 &              0.884 \\
0.0255        &                                0.945 &                 0.943 &                      0.941 &          0.950 &                             0.830 &                   0.847 &                0.918 &                     0.921 &             0.838 &              0.931 &                      0.739 &                  0.926 &                    0.925 &                    0.940 &              0.932 &              0.935 &                    0.921 &            0.908 &              0.884 \\
0.0260        &                                0.948 &                 0.943 &                      0.942 &          0.950 &                             0.840 &                   0.848 &                0.920 &                     0.921 &             0.841 &              0.931 &                      0.740 &                  0.926 &                    0.925 &                    0.940 &              0.933 &              0.939 &                    0.921 &            0.910 &              0.884 \\
0.0265        &                                0.948 &                 0.944 &                      0.942 &          0.951 &                             0.850 &                   0.849 &                0.922 &                     0.921 &             0.843 &              0.931 &                      0.742 &                  0.926 &                    0.925 &                    0.940 &              0.935 &              0.939 &                    0.923 &            0.910 &              0.884 \\
0.0270        &                                0.949 &                 0.945 &                      0.942 &          0.954 &                             0.856 &                   0.850 &                0.923 &                     0.921 &             0.844 &              0.933 &                      0.746 &                  0.926 &                    0.925 &                    0.940 &              0.935 &              0.939 &                    0.923 &            0.912 &              0.884 \\
0.0275        &                                0.950 &                 0.945 &                      0.943 &          0.955 &                             0.861 &                   0.852 &                0.923 &                     0.922 &             0.845 &              0.933 &                      0.747 &                  0.926 &                    0.925 &                    0.940 &              0.937 &              0.941 &                    0.925 &            0.913 &              0.884 \\
0.0280        &                                0.950 &                 0.945 &                      0.944 &          0.955 &                             0.865 &                   0.854 &                0.923 &                     0.923 &             0.848 &              0.935 &                      0.750 &                  0.926 &                    0.926 &                    0.941 &              0.937 &              0.942 &                    0.926 &            0.917 &              0.884 \\
0.0285        &                                0.952 &                 0.946 &                      0.945 &          0.956 &                             0.870 &                   0.854 &                0.923 &                     0.924 &             0.852 &              0.935 &                      0.750 &                  0.926 &                    0.926 &                    0.941 &              0.938 &              0.944 &                    0.927 &            0.917 &              0.886 \\
0.0290        &                                0.952 &                 0.948 &                      0.945 &          0.957 &                             0.874 &                   0.856 &                0.923 &                     0.924 &             0.853 &              0.936 &                      0.752 &                  0.926 &                    0.926 &                    0.942 &              0.938 &              0.944 &                    0.927 &            0.917 &              0.886 \\
0.0295        &                                0.953 &                 0.949 &                      0.945 &          0.958 &                             0.880 &                   0.857 &                0.923 &                     0.924 &             0.854 &              0.936 &                      0.754 &                  0.928 &                    0.926 &                    0.942 &              0.939 &              0.944 &                    0.927 &            0.919 &              0.886 \\
0.0300        &                                0.953 &                 0.949 &                      0.946 &          0.958 &                             0.880 &                   0.857 &                0.923 &                     0.924 &             0.856 &              0.938 &                      0.754 &                  0.928 &                    0.927 &                    0.943 &              0.941 &              0.944 &                    0.927 &            0.921 &              0.886 \\
0.0305        &                                0.953 &                 0.950 &                      0.946 &          0.959 &                             0.886 &                   0.858 &                0.924 &                     0.924 &             0.857 &              0.938 &                      0.756 &                  0.928 &                    0.927 &                    0.943 &              0.941 &              0.944 &                    0.927 &            0.921 &              0.886 \\
0.0310        &                                0.953 &                 0.951 &                      0.946 &          0.959 &                             0.887 &                   0.858 &                0.925 &                     0.925 &             0.857 &              0.938 &                      0.756 &                  0.929 &                    0.927 &                    0.943 &              0.941 &              0.944 &                    0.929 &            0.921 &              0.886 \\
0.0315        &                                0.954 &                 0.951 &                      0.946 &          0.960 &                             0.891 &                   0.858 &                0.925 &                     0.925 &             0.857 &              0.938 &                      0.756 &                  0.929 &                    0.927 &                    0.943 &              0.942 &              0.945 &                    0.929 &            0.921 &              0.886 \\
0.0320        &                                0.954 &                 0.951 &                      0.947 &          0.960 &                             0.891 &                   0.859 &                0.926 &                     0.925 &             0.858 &              0.938 &                      0.757 &                  0.929 &                    0.928 &                    0.944 &              0.943 &              0.945 &                    0.929 &            0.922 &              0.886 \\
0.0325        &                                0.954 &                 0.951 &                      0.948 &          0.960 &                             0.892 &                   0.859 &                0.927 &                     0.925 &             0.858 &              0.938 &                      0.760 &                  0.929 &                    0.928 &                    0.944 &              0.943 &              0.946 &                    0.929 &            0.923 &              0.887 \\
0.0330        &                                0.954 &                 0.951 &                      0.948 &          0.960 &                             0.893 &                   0.859 &                0.927 &                     0.927 &             0.858 &              0.939 &                      0.761 &                  0.930 &                    0.928 &                    0.944 &              0.943 &              0.949 &                    0.930 &            0.925 &              0.887 \\
0.0335        &                                0.954 &                 0.951 &                      0.948 &          0.962 &                             0.898 &                   0.861 &                0.929 &                     0.927 &             0.859 &              0.940 &                      0.762 &                  0.930 &                    0.930 &                    0.946 &              0.943 &              0.949 &                    0.930 &            0.927 &              0.889 \\
0.0340        &                                0.954 &                 0.951 &                      0.949 &          0.962 &                             0.900 &                   0.864 &                0.930 &                     0.927 &             0.859 &              0.940 &                      0.762 &                  0.931 &                    0.931 &                    0.947 &              0.943 &              0.950 &                    0.930 &            0.927 &              0.889 \\
0.0345        &                                0.955 &                 0.951 &                      0.949 &          0.962 &                             0.901 &                   0.864 &                0.930 &                     0.927 &             0.862 &              0.940 &                      0.763 &                  0.932 &                    0.931 &                    0.947 &              0.943 &              0.950 &                    0.930 &            0.928 &              0.889 \\
0.0350        &                                0.955 &                 0.951 &                      0.949 &          0.962 &                             0.901 &                   0.864 &                0.931 &                     0.928 &             0.863 &              0.941 &                      0.764 &                  0.933 &                    0.931 &                    0.947 &              0.946 &              0.951 &                    0.930 &            0.929 &              0.889 \\
0.0355        &                                0.955 &                 0.951 &                      0.949 &          0.962 &                             0.904 &                   0.866 &                0.931 &                     0.928 &             0.867 &              0.941 &                      0.764 &                  0.933 &                    0.933 &                    0.949 &              0.946 &              0.951 &                    0.931 &            0.929 &              0.889 \\
0.0360        &                                0.955 &                 0.951 &                      0.949 &          0.962 &                             0.906 &                   0.866 &                0.931 &                     0.928 &             0.867 &              0.941 &                      0.765 &                  0.933 &                    0.933 &                    0.949 &              0.947 &              0.953 &                    0.933 &            0.929 &              0.889 \\
0.0365        &                                0.955 &                 0.951 &                      0.949 &          0.962 &                             0.910 &                   0.868 &                0.931 &                     0.928 &             0.870 &              0.942 &                      0.765 &                  0.933 &                    0.933 &                    0.949 &              0.947 &              0.953 &                    0.933 &            0.932 &              0.889 \\
0.0370        &                                0.956 &                 0.952 &                      0.949 &          0.962 &                             0.912 &                   0.868 &                0.932 &                     0.928 &             0.870 &              0.943 &                      0.766 &                  0.934 &                    0.933 &                    0.949 &              0.948 &              0.954 &                    0.934 &            0.932 &              0.889 \\
0.0375        &                                0.957 &                 0.952 &                      0.950 &          0.962 &                             0.912 &                   0.869 &                0.932 &                     0.928 &             0.871 &              0.943 &                      0.767 &                  0.935 &                    0.934 &                    0.950 &              0.948 &              0.954 &                    0.934 &            0.932 &              0.890 \\
0.0380        &                                0.957 &                 0.952 &                      0.950 &          0.963 &                             0.912 &                   0.870 &                0.934 &                     0.929 &             0.872 &              0.943 &                      0.767 &                  0.937 &                    0.935 &                    0.951 &              0.948 &              0.954 &                    0.934 &            0.934 &              0.890 \\
0.0385        &                                0.957 &                 0.952 &                      0.950 &          0.963 &                             0.914 &                   0.872 &                0.934 &                     0.929 &             0.872 &              0.943 &                      0.767 &                  0.937 &                    0.935 &                    0.951 &              0.948 &              0.954 &                    0.934 &            0.934 &              0.890 \\
0.0390        &                                0.957 &                 0.952 &                      0.950 &          0.963 &                             0.914 &                   0.872 &                0.934 &                     0.929 &             0.874 &              0.943 &                      0.769 &                  0.937 &                    0.935 &                    0.951 &              0.949 &              0.954 &                    0.934 &            0.934 &              0.890 \\
0.0395        &                                0.958 &                 0.952 &                      0.950 &          0.963 &                             0.915 &                   0.873 &                0.934 &                     0.929 &             0.874 &              0.944 &                      0.769 &                  0.937 &                    0.935 &                    0.951 &              0.949 &              0.954 &                    0.934 &            0.934 &              0.890 \\
0.0400        &                                0.958 &                 0.952 &                      0.950 &          0.963 &                             0.916 &                   0.873 &                0.934 &                     0.929 &             0.875 &              0.944 &                      0.769 &                  0.937 &                    0.935 &                    0.951 &              0.949 &              0.954 &                    0.934 &            0.935 &              0.890 \\
0.0405        &                                0.958 &                 0.952 &                      0.951 &          0.963 &                             0.918 &                   0.875 &                0.934 &                     0.930 &             0.877 &              0.944 &                      0.770 &                  0.938 &                    0.935 &                    0.951 &              0.949 &              0.954 &                    0.934 &            0.935 &              0.890 \\
0.0410        &                                0.958 &                 0.952 &                      0.951 &          0.963 &                             0.918 &                   0.877 &                0.934 &                     0.930 &             0.880 &              0.945 &                      0.770 &                  0.938 &                    0.935 &                    0.951 &              0.949 &              0.954 &                    0.936 &            0.935 &              0.890 \\
0.0415        &                                0.958 &                 0.952 &                      0.951 &          0.963 &                             0.920 &                   0.878 &                0.934 &                     0.930 &             0.880 &              0.945 &                      0.770 &                  0.938 &                    0.936 &                    0.952 &              0.949 &              0.954 &                    0.936 &            0.935 &              0.890 \\
0.0420        &                                0.958 &                 0.952 &                      0.951 &          0.963 &                             0.920 &                   0.879 &                0.935 &                     0.930 &             0.880 &              0.945 &                      0.771 &                  0.938 &                    0.936 &                    0.952 &              0.950 &              0.955 &                    0.937 &            0.935 &              0.891 \\
0.0425        &                                0.958 &                 0.952 &                      0.951 &          0.963 &                             0.922 &                   0.879 &                0.935 &                     0.930 &             0.881 &              0.946 &                      0.771 &                  0.939 &                    0.936 &                    0.952 &              0.951 &              0.955 &                    0.937 &            0.935 &              0.891 \\
0.0430        &                                0.958 &                 0.952 &                      0.951 &          0.963 &                             0.923 &                   0.879 &                0.935 &                     0.930 &             0.881 &              0.946 &                      0.771 &                  0.940 &                    0.938 &                    0.954 &              0.951 &              0.955 &                    0.937 &            0.935 &              0.891 \\
0.0435        &                                0.958 &                 0.952 &                      0.951 &          0.964 &                             0.924 &                   0.879 &                0.935 &                     0.930 &             0.883 &              0.946 &                      0.771 &                  0.940 &                    0.938 &                    0.954 &              0.951 &              0.955 &                    0.938 &            0.936 &              0.891 \\
0.0440        &                                0.958 &                 0.952 &                      0.951 &          0.964 &                             0.926 &                   0.879 &                0.935 &                     0.931 &             0.883 &              0.946 &                      0.771 &                  0.940 &                    0.938 &                    0.954 &              0.951 &              0.955 &                    0.939 &            0.936 &              0.891 \\
0.0445        &                                0.958 &                 0.952 &                      0.951 &          0.964 &                             0.927 &                   0.879 &                0.935 &                     0.931 &             0.884 &              0.946 &                      0.772 &                  0.940 &                    0.938 &                    0.954 &              0.952 &              0.955 &                    0.939 &            0.936 &              0.891 \\
0.0450        &                                0.958 &                 0.953 &                      0.951 &          0.964 &                             0.927 &                   0.879 &                0.936 &                     0.931 &             0.884 &              0.946 &                      0.773 &                  0.940 &                    0.938 &                    0.954 &              0.952 &              0.955 &                    0.939 &            0.936 &              0.891 \\
0.0455        &                                0.959 &                 0.953 &                      0.951 &          0.964 &                             0.929 &                   0.879 &                0.937 &                     0.931 &             0.885 &              0.947 &                      0.773 &                  0.941 &                    0.938 &                    0.954 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0460        &                                0.959 &                 0.953 &                      0.951 &          0.964 &                             0.929 &                   0.880 &                0.937 &                     0.931 &             0.887 &              0.947 &                      0.773 &                  0.941 &                    0.939 &                    0.955 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0465        &                                0.959 &                 0.953 &                      0.951 &          0.964 &                             0.931 &                   0.880 &                0.938 &                     0.932 &             0.887 &              0.947 &                      0.774 &                  0.942 &                    0.940 &                    0.956 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0470        &                                0.959 &                 0.953 &                      0.951 &          0.964 &                             0.931 &                   0.881 &                0.938 &                     0.932 &             0.887 &              0.948 &                      0.774 &                  0.942 &                    0.941 &                    0.957 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0475        &                                0.959 &                 0.953 &                      0.951 &          0.964 &                             0.931 &                   0.881 &                0.938 &                     0.932 &             0.888 &              0.948 &                      0.775 &                  0.942 &                    0.941 &                    0.957 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0480        &                                0.959 &                 0.954 &                      0.951 &          0.964 &                             0.931 &                   0.881 &                0.938 &                     0.932 &             0.888 &              0.949 &                      0.775 &                  0.942 &                    0.941 &                    0.958 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0485        &                                0.959 &                 0.954 &                      0.952 &          0.965 &                             0.931 &                   0.881 &                0.938 &                     0.932 &             0.889 &              0.949 &                      0.775 &                  0.942 &                    0.941 &                    0.958 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0490        &                                0.959 &                 0.954 &                      0.953 &          0.965 &                             0.931 &                   0.882 &                0.939 &                     0.933 &             0.889 &              0.949 &                      0.776 &                  0.943 &                    0.941 &                    0.958 &              0.952 &              0.955 &                    0.939 &            0.937 &              0.891 \\
0.0495        &                                0.961 &                 0.954 &                      0.953 &          0.965 &                             0.932 &                   0.882 &                0.940 &                     0.933 &             0.889 &              0.949 &                      0.777 &                  0.943 &                    0.942 &                    0.959 &              0.952 &              0.956 &                    0.939 &            0.937 &              0.891 \\
0.0500        &                                0.961 &                 0.954 &                      0.954 &          0.965 &                             0.933 &                   0.882 &                0.940 &                     0.934 &             0.892 &              0.949 &                      0.777 &                  0.943 &                    0.942 &                    0.959 &              0.952 &              0.956 &                    0.939 &            0.937 &              0.891 \\
\bottomrule
\end{tabular}
