\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  boeck2019/multi\_task &  boeck2019/multi\_task\_lowerci &  boeck2019/multi\_task\_upperci &  boeck2019/multi\_task\_hjdb &  boeck2019/multi\_task\_hjdb\_lowerci &  boeck2019/multi\_task\_hjdb\_upperci &  boeck2020/dar &  boeck2020/dar\_lowerci &  boeck2020/dar\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                       &                               &                               &                            &                                    &                                    &                &                        &                        &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
120.000000  &                                  1.0 &                                          1.0 &                                          1.0 &              1.005812 &                      0.907777 &                      1.103847 &                        1.0 &                                1.0 &                                1.0 &       1.002635 &               0.969266 &               1.036003 &                          1.093984 &                                  0.892304 &                                  1.295663 &                1.0 &                        1.0 &                        1.0 &               1.000004 &                       0.765479 &                       1.234528 &                 1.000000 &                         0.798985 &                         1.201016 &                 1.000000 &                         0.798985 &                         1.201016 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004872 &                         0.957832 &                         1.051911 \\
120.519481  &                                  1.0 &                                          1.0 &                                          1.0 &              1.004501 &                      0.908478 &                      1.100525 &                        1.0 &                                1.0 &                                1.0 &       1.002555 &               0.969871 &               1.035239 &                          1.089974 &                                  0.892432 &                                  1.287515 &                1.0 &                        1.0 &                        1.0 &               1.000238 &                       0.763726 &                       1.236750 &                 1.000000 &                         0.816003 &                         1.183997 &                 1.000000 &                         0.816003 &                         1.183997 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004596 &                         0.958522 &                         1.050671 \\
121.038961  &                                  1.0 &                                          1.0 &                                          1.0 &              1.003191 &                      0.909167 &                      1.097215 &                        1.0 &                                1.0 &                                1.0 &       1.002475 &               0.970472 &               1.034478 &                          1.085963 &                                  0.892535 &                                  1.279391 &                1.0 &                        1.0 &                        1.0 &               1.000441 &                       0.702766 &                       1.298116 &                 1.000000 &                         0.831925 &                         1.168075 &                 1.000000 &                         0.831925 &                         1.168075 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004321 &                         0.959206 &                         1.049436 \\
121.558442  &                                  1.0 &                                          1.0 &                                          1.0 &              1.001880 &                      0.909843 &                      1.093917 &                        1.0 &                                1.0 &                                1.0 &       1.002395 &               0.971068 &               1.033722 &                          1.081950 &                                  0.892609 &                                  1.271291 &                1.0 &                        1.0 &                        1.0 &               1.000600 &                       0.631491 &                       1.369708 &                 1.000000 &                         0.846550 &                         1.153450 &                 1.000000 &                         0.846550 &                         1.153450 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004045 &                         0.959884 &                         1.048207 \\
122.077922  &                                  1.0 &                                          1.0 &                                          1.0 &              1.000569 &                      0.910505 &                      1.090633 &                        1.0 &                                1.0 &                                1.0 &       1.002315 &               0.971660 &               1.032971 &                          1.077936 &                                  0.892655 &                                  1.263218 &                1.0 &                        1.0 &                        1.0 &               1.000700 &                       0.577431 &                       1.423969 &                 1.000000 &                         0.859736 &                         1.140263 &                 1.000000 &                         0.859736 &                         1.140263 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003770 &                         0.960555 &                         1.046985 \\
122.597403  &                                  1.0 &                                          1.0 &                                          1.0 &              0.999258 &                      0.911153 &                      1.087364 &                        1.0 &                                1.0 &                                1.0 &       1.002235 &               0.972246 &               1.032224 &                          1.073920 &                                  0.892668 &                                  1.255173 &                1.0 &                        1.0 &                        1.0 &               1.000727 &                       0.554874 &                       1.446580 &                 1.000000 &                         0.871422 &                         1.128578 &                 1.000000 &                         0.871422 &                         1.128578 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003494 &                         0.961219 &                         1.045769 \\
123.116883  &                                  1.0 &                                          1.0 &                                          1.0 &              0.997947 &                      0.911785 &                      1.084110 &                        1.0 &                                1.0 &                                1.0 &       1.002155 &               0.972827 &               1.031482 &                          1.069902 &                                  0.892646 &                                  1.247157 &                1.0 &                        1.0 &                        1.0 &               1.000669 &                       0.573188 &                       1.428150 &                 1.000000 &                         0.881647 &                         1.118353 &                 1.000000 &                         0.881647 &                         1.118353 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003218 &                         0.961875 &                         1.044561 \\
123.636364  &                                  1.0 &                                          1.0 &                                          1.0 &              0.996636 &                      0.912400 &                      1.080872 &                        1.0 &                                1.0 &                                1.0 &       1.002075 &               0.973403 &               1.030747 &                          1.065880 &                                  0.892587 &                                  1.239173 &                1.0 &                        1.0 &                        1.0 &               1.000525 &                       0.632737 &                       1.368312 &                 1.000000 &                         0.890539 &                         1.109461 &                 1.000000 &                         0.890539 &                         1.109461 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002942 &                         0.962523 &                         1.043361 \\
124.155844  &                                  1.0 &                                          1.0 &                                          1.0 &              0.995324 &                      0.912997 &                      1.077652 &                        1.0 &                                1.0 &                                1.0 &       1.001994 &               0.973972 &               1.030017 &                          1.061855 &                                  0.892489 &                                  1.231222 &                1.0 &                        1.0 &                        1.0 &               1.000326 &                       0.716254 &                       1.284399 &                 1.000000 &                         0.898255 &                         1.101745 &                 1.000000 &                         0.898255 &                         1.101745 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002666 &                         0.963163 &                         1.042169 \\
124.675325  &                                  1.0 &                                          1.0 &                                          1.0 &              0.994013 &                      0.913574 &                      1.074451 &                        1.0 &                                1.0 &                                1.0 &       1.001914 &               0.974535 &               1.029293 &                          1.057826 &                                  0.892346 &                                  1.223305 &                1.0 &                        1.0 &                        1.0 &               1.000111 &                       0.799438 &                       1.200784 &                 1.000000 &                         0.904996 &                         1.095004 &                 1.000000 &                         0.904996 &                         1.095004 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002389 &                         0.963793 &                         1.040986 \\
125.194805  &                                  1.0 &                                          1.0 &                                          1.0 &              0.992701 &                      0.914132 &                      1.071270 &                        1.0 &                                1.0 &                                1.0 &       1.001833 &               0.975091 &               1.028576 &                          1.053791 &                                  0.892158 &                                  1.215425 &                1.0 &                        1.0 &                        1.0 &               0.999916 &                       0.849435 &                       1.150396 &                 1.000000 &                         0.911006 &                         1.088994 &                 1.000000 &                         0.911006 &                         1.088994 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002113 &                         0.964413 &                         1.039812 \\
125.714286  &                                  1.0 &                                          1.0 &                                          1.0 &              0.991389 &                      0.914668 &                      1.068110 &                        1.0 &                                1.0 &                                1.0 &       1.001753 &               0.975639 &               1.027866 &                          1.049751 &                                  0.891919 &                                  1.207583 &                1.0 &                        1.0 &                        1.0 &               0.999777 &                       0.849715 &                       1.149840 &                 1.000000 &                         0.916545 &                         1.083454 &                 1.000000 &                         0.916545 &                         1.083454 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001836 &                         0.965023 &                         1.038648 \\
126.233766  &                                  1.0 &                                          1.0 &                                          1.0 &              0.990077 &                      0.915181 &                      1.064972 &                        1.0 &                                1.0 &                                1.0 &       1.001672 &               0.976179 &               1.027164 &                          1.045704 &                                  0.891627 &                                  1.199781 &                1.0 &                        1.0 &                        1.0 &               0.999732 &                       0.840103 &                       1.159361 &                 1.000000 &                         0.921852 &                         1.078147 &                 1.000000 &                         0.921852 &                         1.078147 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001558 &                         0.965622 &                         1.037495 \\
126.753247  &                                  1.0 &                                          1.0 &                                          1.0 &              0.988765 &                      0.915671 &                      1.061859 &                        1.0 &                                1.0 &                                1.0 &       1.001591 &               0.976711 &               1.026470 &                          1.041650 &                                  0.891279 &                                  1.192021 &                1.0 &                        1.0 &                        1.0 &               0.999788 &                       0.852931 &                       1.146644 &                 1.000000 &                         0.926998 &                         1.073001 &                 1.000000 &                         0.926998 &                         1.073001 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001281 &                         0.966208 &                         1.036353 \\
127.272727  &                                  1.0 &                                          1.0 &                                          1.0 &              0.987453 &                      0.916135 &                      1.058771 &                        1.0 &                                1.0 &                                1.0 &       1.001509 &               0.977234 &               1.025784 &                          1.037587 &                                  0.890869 &                                  1.184305 &                1.0 &                        1.0 &                        1.0 &               0.999908 &                       0.880867 &                       1.118948 &                 1.000000 &                         0.931819 &                         1.068180 &                 1.000000 &                         0.931819 &                         1.068180 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001003 &                         0.966782 &                         1.035223 \\
127.792208  &                                  1.0 &                                          1.0 &                                          1.0 &              0.986141 &                      0.916572 &                      1.055711 &                        1.0 &                                1.0 &                                1.0 &       1.001427 &               0.977748 &               1.025107 &                          1.033514 &                                  0.890394 &                                  1.176634 &                1.0 &                        1.0 &                        1.0 &               1.000053 &                       0.900710 &                       1.099396 &                 1.000000 &                         0.936097 &                         1.063902 &                 1.000000 &                         0.936097 &                         1.063902 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000724 &                         0.967343 &                         1.034105 \\
128.311688  &                                  1.0 &                                          1.0 &                                          1.0 &              0.984830 &                      0.916981 &                      1.052679 &                        1.0 &                                1.0 &                                1.0 &       1.001345 &               0.978251 &               1.024439 &                          1.029429 &                                  0.889848 &                                  1.169009 &                1.0 &                        1.0 &                        1.0 &               1.000185 &                       0.894083 &                       1.106286 &                 1.000000 &                         0.939640 &                         1.060359 &                 1.000000 &                         0.939640 &                         1.060359 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000445 &                         0.967889 &                         1.033001 \\
128.831169  &                                  1.0 &                                          1.0 &                                          1.0 &              0.983520 &                      0.917361 &                      1.049679 &                        1.0 &                                1.0 &                                1.0 &       1.001263 &               0.978744 &               1.023781 &                          1.025330 &                                  0.889227 &                                  1.161434 &                1.0 &                        1.0 &                        1.0 &               1.000263 &                       0.878195 &                       1.122331 &                 1.000000 &                         0.942337 &                         1.057663 &                 1.000000 &                         0.942337 &                         1.057663 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000165 &                         0.968421 &                         1.031910 \\
129.350649  &                                  1.0 &                                          1.0 &                                          1.0 &              0.982211 &                      0.917711 &                      1.046711 &                        1.0 &                                1.0 &                                1.0 &       1.001180 &               0.979226 &               1.023134 &                          1.021217 &                                  0.888527 &                                  1.153908 &                1.0 &                        1.0 &                        1.0 &               1.000251 &                       0.880711 &                       1.119790 &                 1.000000 &                         0.944172 &                         1.055827 &                 1.000000 &                         0.944172 &                         1.055827 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999885 &                         0.968937 &                         1.030834 \\
129.870130  &                                  1.0 &                                          1.0 &                                          1.0 &              0.980904 &                      0.918030 &                      1.043778 &                        1.0 &                                1.0 &                                1.0 &       1.001096 &               0.979695 &               1.022497 &                          1.017088 &                                  0.887742 &                                  1.146434 &                1.0 &                        1.0 &                        1.0 &               1.000151 &                       0.905727 &                       1.094575 &                 1.000000 &                         0.945122 &                         1.054878 &                 1.000000 &                         0.945122 &                         1.054878 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999604 &                         0.969436 &                         1.029773 \\
130.389610  &                                  1.0 &                                          1.0 &                                          1.0 &              0.979599 &                      0.918317 &                      1.040882 &                        1.0 &                                1.0 &                                1.0 &       1.001012 &               0.980153 &               1.021871 &                          1.012940 &                                  0.886867 &                                  1.139012 &                1.0 &                        1.0 &                        1.0 &               1.000003 &                       0.929784 &                       1.070222 &                 1.000000 &                         0.945145 &                         1.054855 &                 1.000000 &                         0.945145 &                         1.054855 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999323 &                         0.969918 &                         1.028728 \\
130.909091  &                                  1.0 &                                          1.0 &                                          1.0 &              0.978298 &                      0.918571 &                      1.038026 &                        1.0 &                                1.0 &                                1.0 &       1.000927 &               0.980597 &               1.021257 &                          1.008770 &                                  0.885897 &                                  1.131643 &                1.0 &                        1.0 &                        1.0 &               0.999849 &                       0.916484 &                       1.083214 &                 1.000000 &                         0.944314 &                         1.055687 &                 1.000000 &                         0.944314 &                         1.055687 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999040 &                         0.970381 &                         1.027699 \\
131.428571  &                                  1.0 &                                          1.0 &                                          1.0 &              0.977002 &                      0.918792 &                      1.035213 &                        1.0 &                                1.0 &                                1.0 &       1.000841 &               0.981028 &               1.020654 &                          1.004578 &                                  0.884826 &                                  1.124329 &                1.0 &                        1.0 &                        1.0 &               0.999729 &                       0.879533 &                       1.119925 &                 1.000001 &                         0.942840 &                         1.057162 &                 1.000001 &                         0.942840 &                         1.057162 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998757 &                         0.970826 &                         1.026688 \\
131.948052  &                                  1.0 &                                          1.0 &                                          1.0 &              0.975712 &                      0.918980 &                      1.032444 &                        1.0 &                                1.0 &                                1.0 &       1.000754 &               0.981444 &               1.020064 &                          1.000359 &                                  0.883649 &                                  1.117070 &                1.0 &                        1.0 &                        1.0 &               0.999685 &                       0.851756 &                       1.147614 &                 1.000001 &                         0.941030 &                         1.058972 &                 1.000001 &                         0.941030 &                         1.058972 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998473 &                         0.971251 &                         1.025694 \\
132.467532  &                                  1.0 &                                          1.0 &                                          1.0 &              0.974429 &                      0.919135 &                      1.029722 &                        1.0 &                                1.0 &                                1.0 &       1.000667 &               0.981846 &               1.019487 &                          0.996113 &                                  0.882361 &                                  1.109865 &                1.0 &                        1.0 &                        1.0 &               0.999752 &                       0.848659 &                       1.150845 &                 1.000002 &                         0.939204 &                         1.060799 &                 1.000002 &                         0.939204 &                         1.060799 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998188 &                         0.971656 &                         1.024719 \\
132.987013  &                                  1.0 &                                          1.0 &                                          1.0 &              0.973153 &                      0.919256 &                      1.027051 &                        1.0 &                                1.0 &                                1.0 &       1.000578 &               0.982232 &               1.018923 &                          0.991837 &                                  0.880958 &                                  1.102716 &                1.0 &                        1.0 &                        1.0 &               0.999912 &                       0.863260 &                       1.136564 &                 1.000002 &                         0.937497 &                         1.062508 &                 1.000002 &                         0.937497 &                         1.062508 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997902 &                         0.972040 &                         1.023763 \\
133.506494  &                                  1.0 &                                          1.0 &                                          1.0 &              0.971888 &                      0.919345 &                      1.024431 &                        1.0 &                                1.0 &                                1.0 &       1.000487 &               0.982603 &               1.018372 &                          0.987528 &                                  0.879434 &                                  1.095622 &                1.0 &                        1.0 &                        1.0 &               1.000114 &                       0.875001 &                       1.125227 &                 1.000003 &                         0.935945 &                         1.064061 &                 1.000003 &                         0.935945 &                         1.064061 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997615 &                         0.972403 &                         1.022826 \\
134.025974  &                                  1.0 &                                          1.0 &                                          1.0 &              0.970635 &                      0.919402 &                      1.021868 &                        1.0 &                                1.0 &                                1.0 &       1.000396 &               0.982957 &               1.017834 &                          0.983184 &                                  0.877786 &                                  1.088581 &                1.0 &                        1.0 &                        1.0 &               1.000306 &                       0.867898 &                       1.132715 &                 1.000004 &                         0.934624 &                         1.065383 &                 1.000004 &                         0.934624 &                         1.065383 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997327 &                         0.972744 &                         1.021910 \\
134.545455  &                                  1.0 &                                          1.0 &                                          1.0 &              0.969395 &                      0.919428 &                      1.019361 &                        1.0 &                                1.0 &                                1.0 &       1.000303 &               0.983295 &               1.017310 &                          0.978802 &                                  0.876009 &                                  1.081594 &                1.0 &                        1.0 &                        1.0 &               1.000439 &                       0.848410 &                       1.152467 &                 1.000004 &                         0.933668 &                         1.066341 &                 1.000004 &                         0.933668 &                         1.066341 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997038 &                         0.973063 &                         1.021013 \\
135.064935  &                                  1.0 &                                          1.0 &                                          1.0 &              0.968170 &                      0.919426 &                      1.016915 &                        1.0 &                                1.0 &                                1.0 &       1.000208 &               0.983616 &               1.016799 &                          0.974379 &                                  0.874101 &                                  1.074658 &                1.0 &                        1.0 &                        1.0 &               1.000460 &                       0.836026 &                       1.164893 &                 1.000005 &                         0.933251 &                         1.066758 &                 1.000005 &                         0.933251 &                         1.066758 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996749 &                         0.973360 &                         1.020137 \\
135.584416  &                                  1.0 &                                          1.0 &                                          1.0 &              0.966963 &                      0.919395 &                      1.014531 &                        1.0 &                                1.0 &                                1.0 &       1.000111 &               0.983920 &               1.016302 &                          0.969914 &                                  0.872057 &                                  1.067772 &                1.0 &                        1.0 &                        1.0 &               1.000331 &                       0.843800 &                       1.156862 &                 1.000005 &                         0.933514 &                         1.066496 &                 1.000005 &                         0.933514 &                         1.066496 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996458 &                         0.973634 &                         1.019282 \\
136.103896  &                                  1.0 &                                          1.0 &                                          1.0 &              0.965775 &                      0.919340 &                      1.012210 &                        1.0 &                                1.0 &                                1.0 &       1.000012 &               0.984207 &               1.015818 &                          0.965405 &                                  0.869877 &                                  1.060932 &                1.0 &                        1.0 &                        1.0 &               1.000092 &                       0.863247 &                       1.136938 &                 1.000006 &                         0.934347 &                         1.065664 &                 1.000006 &                         0.934347 &                         1.065664 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996166 &                         0.973885 &                         1.018447 \\
136.623377  &                                  1.0 &                                          1.0 &                                          1.0 &              0.964609 &                      0.919261 &                      1.009956 &                        1.0 &                                1.0 &                                1.0 &       0.999912 &               0.984477 &               1.015347 &                          0.960848 &                                  0.867558 &                                  1.054137 &                1.0 &                        1.0 &                        1.0 &               0.999808 &                       0.875279 &                       1.124337 &                 1.000006 &                         0.935566 &                         1.064446 &                 1.000006 &                         0.935566 &                         1.064446 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995874 &                         0.974115 &                         1.017633 \\
137.142857  &                                  1.0 &                                          1.0 &                                          1.0 &              0.963466 &                      0.919163 &                      1.007769 &                        1.0 &                                1.0 &                                1.0 &       0.999809 &               0.984729 &               1.014889 &                          0.956242 &                                  0.865100 &                                  1.047384 &                1.0 &                        1.0 &                        1.0 &               0.999544 &                       0.868401 &                       1.130687 &                 1.000006 &                         0.937036 &                         1.062975 &                 1.000006 &                         0.937036 &                         1.062975 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995581 &                         0.974323 &                         1.016838 \\
137.662338  &                                  1.0 &                                          1.0 &                                          1.0 &              0.962350 &                      0.919048 &                      1.005652 &                        1.0 &                                1.0 &                                1.0 &       0.999704 &               0.984965 &               1.014443 &                          0.951585 &                                  0.862502 &                                  1.040667 &                1.0 &                        1.0 &                        1.0 &               0.999365 &                       0.853880 &                       1.144851 &                 1.000005 &                         0.938703 &                         1.061307 &                 1.000005 &                         0.938703 &                         1.061307 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995287 &                         0.974509 &                         1.016064 \\
138.181818  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961262 &                      0.918919 &                      1.003606 &                        1.0 &                                1.0 &                                1.0 &       0.999596 &               0.985183 &               1.014009 &                          0.946873 &                                  0.859764 &                                  1.033983 &                1.0 &                        1.0 &                        1.0 &               0.999338 &                       0.852632 &                       1.146044 &                 1.000004 &                         0.940586 &                         1.059422 &                 1.000004 &                         0.940586 &                         1.059422 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994992 &                         0.974674 &                         1.015309 \\
138.701299  &                                  1.0 &                                          1.0 &                                          1.0 &              0.960206 &                      0.918780 &                      1.001631 &                        1.0 &                                1.0 &                                1.0 &       0.999486 &               0.985386 &               1.013586 &                          0.942107 &                                  0.856886 &                                  1.027328 &                1.0 &                        1.0 &                        1.0 &               0.999498 &                       0.876459 &                       1.122538 &                 1.000002 &                         0.942683 &                         1.057322 &                 1.000002 &                         0.942683 &                         1.057322 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994696 &                         0.974819 &                         1.014573 \\
139.220779  &                                  1.0 &                                          1.0 &                                          1.0 &              0.959183 &                      0.918637 &                      0.999730 &                        1.0 &                                1.0 &                                1.0 &       0.999373 &               0.985572 &               1.013174 &                          0.937281 &                                  0.853868 &                                  1.020694 &                1.0 &                        1.0 &                        1.0 &               0.999790 &                       0.912820 &                       1.086760 &                 1.000000 &                         0.944789 &                         1.055211 &                 1.000000 &                         0.944789 &                         1.055211 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994401 &                         0.974945 &                         1.013856 \\
139.740260  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958199 &                      0.918494 &                      0.997905 &                        1.0 &                                1.0 &                                1.0 &       0.999257 &               0.985742 &               1.012772 &                          0.932395 &                                  0.850712 &                                  1.014078 &                1.0 &                        1.0 &                        1.0 &               1.000134 &                       0.927999 &                       1.072270 &                 0.999997 &                         0.946682 &                         1.053312 &                 0.999997 &                         0.946682 &                         1.053312 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994105 &                         0.975053 &                         1.013156 \\
140.259740  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957257 &                      0.918356 &                      0.996158 &                        1.0 &                                1.0 &                                1.0 &       0.999139 &               0.985898 &               1.012379 &                          0.927444 &                                  0.847417 &                                  1.007472 &                1.0 &                        1.0 &                        1.0 &               1.000455 &                       0.901397 &                       1.099514 &                 0.999994 &                         0.948229 &                         1.051758 &                 0.999994 &                         0.948229 &                         1.051758 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993809 &                         0.975143 &                         1.012474 \\
140.779221  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956360 &                      0.918229 &                      0.994490 &                        1.0 &                                1.0 &                                1.0 &       0.999017 &               0.986038 &               1.011995 &                          0.922428 &                                  0.843985 &                                  1.000871 &                1.0 &                        1.0 &                        1.0 &               1.000675 &                       0.869067 &                       1.132284 &                 0.999989 &                         0.949428 &                         1.050550 &                 0.999989 &                         0.949428 &                         1.050550 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993513 &                         0.975217 &                         1.011809 \\
141.298701  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955511 &                      0.918119 &                      0.992904 &                        1.0 &                                1.0 &                                1.0 &       0.998892 &               0.986165 &               1.011619 &                          0.917342 &                                  0.840417 &                                  0.994266 &                1.0 &                        1.0 &                        1.0 &               1.000717 &                       0.858445 &                       1.142990 &                 0.999984 &                         0.950404 &                         1.049564 &                 0.999984 &                         0.950404 &                         1.049564 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993218 &                         0.975276 &                         1.011159 \\
141.818182  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954715 &                      0.918030 &                      0.991400 &                        1.0 &                                1.0 &                                1.0 &       0.998764 &               0.986277 &               1.011251 &                          0.912185 &                                  0.836716 &                                  0.987653 &                1.0 &                        1.0 &                        1.0 &               1.000553 &                       0.877115 &                       1.123992 &                 0.999978 &                         0.951260 &                         1.048696 &                 0.999978 &                         0.951260 &                         1.048696 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992923 &                         0.975321 &                         1.010526 \\
142.337662  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953975 &                      0.917969 &                      0.989981 &                        1.0 &                                1.0 &                                1.0 &       0.998633 &               0.986377 &               1.010888 &                          0.906955 &                                  0.832883 &                                  0.981027 &                1.0 &                        1.0 &                        1.0 &               1.000254 &                       0.910783 &                       1.089724 &                 0.999973 &                         0.951934 &                         1.048011 &                 0.999973 &                         0.951934 &                         1.048011 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992630 &                         0.975354 &                         1.009907 \\
142.857143  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953294 &                      0.917940 &                      0.988648 &                        1.0 &                                1.0 &                                1.0 &       0.998498 &               0.986464 &               1.010531 &                          0.901652 &                                  0.828921 &                                  0.974383 &                1.0 &                        1.0 &                        1.0 &               0.999900 &                       0.929655 &                       1.070145 &                 0.999968 &                         0.952387 &                         1.047549 &                 0.999968 &                         0.952387 &                         1.047549 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992339 &                         0.975376 &                         1.009303 \\
143.376623  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952676 &                      0.917949 &                      0.987403 &                        1.0 &                                1.0 &                                1.0 &       0.998360 &               0.986539 &               1.010180 &                          0.896275 &                                  0.824833 &                                  0.967717 &                1.0 &                        1.0 &                        1.0 &               0.999576 &                       0.908774 &                       1.090377 &                 0.999965 &                         0.952672 &                         1.047258 &                 0.999965 &                         0.952672 &                         1.047258 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992051 &                         0.975388 &                         1.008714 \\
143.896104  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952124 &                      0.918000 &                      0.986248 &                        1.0 &                                1.0 &                                1.0 &       0.998218 &               0.986603 &               1.009833 &                          0.890823 &                                  0.820622 &                                  0.961024 &                1.0 &                        1.0 &                        1.0 &               0.999363 &                       0.877916 &                       1.120809 &                 0.999964 &                         0.952946 &                         1.046982 &                 0.999964 &                         0.952946 &                         1.046982 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991765 &                         0.975392 &                         1.008139 \\
144.415584  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951642 &                      0.918099 &                      0.985185 &                        1.0 &                                1.0 &                                1.0 &       0.998073 &               0.986656 &               1.009490 &                          0.885295 &                                  0.816289 &                                  0.954300 &                1.0 &                        1.0 &                        1.0 &               0.999341 &                       0.865704 &                       1.132977 &                 0.999967 &                         0.953418 &                         1.046516 &                 0.999967 &                         0.953418 &                         1.046516 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991484 &                         0.975389 &                         1.007578 \\
144.935065  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951232 &                      0.918249 &                      0.984214 &                        1.0 &                                1.0 &                                1.0 &       0.997924 &               0.986698 &               1.009151 &                          0.879690 &                                  0.811837 &                                  0.947542 &                1.0 &                        1.0 &                        1.0 &               0.999512 &                       0.878921 &                       1.120104 &                 0.999974 &                         0.954135 &                         1.045813 &                 0.999974 &                         0.954135 &                         1.045813 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991206 &                         0.975380 &                         1.007032 \\
145.454545  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950894 &                      0.918452 &                      0.983335 &                        1.0 &                                1.0 &                                1.0 &       0.997772 &               0.986730 &               1.008815 &                          0.874008 &                                  0.807268 &                                  0.940748 &                1.0 &                        1.0 &                        1.0 &               0.999782 &                       0.907716 &                       1.091849 &                 0.999986 &                         0.954936 &                         1.045036 &                 0.999986 &                         0.954936 &                         1.045036 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990934 &                         0.975368 &                         1.006501 \\
145.974026  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950627 &                      0.918707 &                      0.982547 &                        1.0 &                                1.0 &                                1.0 &       0.997617 &               0.986752 &               1.008481 &                          0.868249 &                                  0.802582 &                                  0.933915 &                1.0 &                        1.0 &                        1.0 &               1.000049 &                       0.935173 &                       1.064924 &                 1.000004 &                         0.955704 &                         1.044304 &                 1.000004 &                         0.955704 &                         1.044304 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990669 &                         0.975353 &                         1.005985 \\
146.493506  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950433 &                      0.919017 &                      0.981850 &                        1.0 &                                1.0 &                                1.0 &       0.997458 &               0.986764 &               1.008151 &                          0.862412 &                                  0.797781 &                                  0.927043 &                1.0 &                        1.0 &                        1.0 &               1.000210 &                       0.937065 &                       1.063356 &                 1.000030 &                         0.956439 &                         1.043621 &                 1.000030 &                         0.956439 &                         1.043621 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990411 &                         0.975337 &                         1.005486 \\
147.012987  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950311 &                      0.919380 &                      0.981242 &                        1.0 &                                1.0 &                                1.0 &       0.997295 &               0.986767 &               1.007824 &                          0.856498 &                                  0.792865 &                                  0.920130 &                1.0 &                        1.0 &                        1.0 &               1.000165 &                       0.918387 &                       1.081943 &                 1.000064 &                         0.957255 &                         1.042874 &                 1.000064 &                         0.957255 &                         1.042874 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990162 &                         0.975321 &                         1.005004 \\
147.532468  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950261 &                      0.919798 &                      0.980725 &                        1.0 &                                1.0 &                                1.0 &       0.997130 &               0.986761 &               1.007499 &                          0.850506 &                                  0.787835 &                                  0.913177 &                1.0 &                        1.0 &                        1.0 &               0.999823 &                       0.906150 &                       1.093496 &                 1.000108 &                         0.958307 &                         1.041910 &                 1.000108 &                         0.958307 &                         1.041910 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989923 &                         0.975305 &                         1.004540 \\
148.051948  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950282 &                      0.920267 &                      0.980297 &                        1.0 &                                1.0 &                                1.0 &       0.996961 &               0.986745 &               1.007178 &                          0.844435 &                                  0.782688 &                                  0.906182 &                1.0 &                        1.0 &                        1.0 &               0.999283 &                       0.908646 &                       1.089919 &                 1.000158 &                         0.959502 &                         1.040815 &                 1.000158 &                         0.959502 &                         1.040815 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989694 &                         0.975292 &                         1.004096 \\
148.571429  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950369 &                      0.920784 &                      0.979954 &                        1.0 &                                1.0 &                                1.0 &       0.996790 &               0.986720 &               1.006860 &                          0.838283 &                                  0.777420 &                                  0.899146 &                1.0 &                        1.0 &                        1.0 &               0.998791 &                       0.921636 &                       1.075946 &                 1.000208 &                         0.960584 &                         1.039832 &                 1.000208 &                         0.960584 &                         1.039832 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989479 &                         0.975283 &                         1.003674 \\
149.090909  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950519 &                      0.921343 &                      0.979695 &                        1.0 &                                1.0 &                                1.0 &       0.996616 &               0.986685 &               1.006547 &                          0.832049 &                                  0.772028 &                                  0.892070 &                1.0 &                        1.0 &                        1.0 &               0.998600 &                       0.938106 &                       1.059093 &                 1.000249 &                         0.961439 &                         1.039058 &                 1.000249 &                         0.961439 &                         1.039058 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989278 &                         0.975279 &                         1.003277 \\
149.610390  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950729 &                      0.921940 &                      0.979518 &                        1.0 &                                1.0 &                                1.0 &       0.996440 &               0.986641 &               1.006239 &                          0.825731 &                                  0.766506 &                                  0.884957 &                1.0 &                        1.0 &                        1.0 &               0.998960 &                       0.949436 &                       1.048484 &                 1.000275 &                         0.962179 &                         1.038371 &                 1.000275 &                         0.962179 &                         1.038371 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989093 &                         0.975280 &                         1.002907 \\
150.129870  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950995 &                      0.922568 &                      0.979421 &                        1.0 &                                1.0 &                                1.0 &       0.996261 &               0.986586 &               1.005937 &                          0.819328 &                                  0.760848 &                                  0.877807 &                1.0 &                        1.0 &                        1.0 &               1.000123 &                       0.951003 &                       1.049244 &                 1.000279 &                         0.963105 &                         1.037452 &                 1.000279 &                         0.963105 &                         1.037452 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988927 &                         0.975287 &                         1.002567 \\
150.649351  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951313 &                      0.923223 &                      0.979403 &                        1.0 &                                1.0 &                                1.0 &       0.996081 &               0.986520 &               1.005642 &                          0.812838 &                                  0.755050 &                                  0.870626 &                1.0 &                        1.0 &                        1.0 &               1.002268 &                       0.948421 &                       1.056114 &                 1.000254 &                         0.964532 &                         1.035976 &                 1.000254 &                         0.964532 &                         1.035976 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988781 &                         0.975302 &                         1.002259 \\
151.168831  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951681 &                      0.923896 &                      0.979465 &                        1.0 &                                1.0 &                                1.0 &       0.995900 &               0.986443 &               1.005357 &                          0.806269 &                                  0.749110 &                                  0.863427 &                1.0 &                        1.0 &                        1.0 &               1.004960 &                       0.945128 &                       1.064791 &                 1.000193 &                         0.966288 &                         1.034097 &                 1.000193 &                         0.966288 &                         1.034097 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988657 &                         0.975325 &                         1.001988 \\
151.688312  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952095 &                      0.924584 &                      0.979607 &                        1.0 &                                1.0 &                                1.0 &       0.995718 &               0.986354 &               1.005082 &                          0.799630 &                                  0.743032 &                                  0.856227 &                1.0 &                        1.0 &                        1.0 &               1.007464 &                       0.941225 &                       1.073702 &                 1.000088 &                         0.967915 &                         1.032261 &                 1.000088 &                         0.967915 &                         1.032261 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988557 &                         0.975356 &                         1.001758 \\
152.207792  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952554 &                      0.925277 &                      0.979830 &                        1.0 &                                1.0 &                                1.0 &       0.995536 &               0.986252 &               1.004821 &                          0.792932 &                                  0.736818 &                                  0.849046 &                1.0 &                        1.0 &                        1.0 &               1.009043 &                       0.938752 &                       1.079333 &                 0.999932 &                         0.969043 &                         1.030821 &                 0.999932 &                         0.969043 &                         1.030821 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988485 &                         0.975397 &                         1.001573 \\
152.727273  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953054 &                      0.925970 &                      0.980137 &                        1.0 &                                1.0 &                                1.0 &       0.995356 &               0.986137 &               1.004574 &                          0.786185 &                                  0.730468 &                                  0.841901 &                1.0 &                        1.0 &                        1.0 &               1.008960 &                       0.941431 &                       1.076489 &                 0.999718 &                         0.969591 &                         1.029845 &                 0.999718 &                         0.969591 &                         1.029845 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988441 &                         0.975446 &                         1.001437 \\
153.246753  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953592 &                      0.926655 &                      0.980528 &                        1.0 &                                1.0 &                                1.0 &       0.995177 &               0.986008 &               1.004345 &                          0.779399 &                                  0.723985 &                                  0.834814 &                1.0 &                        1.0 &                        1.0 &               1.006476 &                       0.952729 &                       1.060224 &                 0.999438 &                         0.969824 &                         1.029053 &                 0.999438 &                         0.969824 &                         1.029053 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988430 &                         0.975505 &                         1.001354 \\
153.766234  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954166 &                      0.927325 &                      0.981007 &                        1.0 &                                1.0 &                                1.0 &       0.995000 &               0.985864 &               1.004136 &                          0.772586 &                                  0.717368 &                                  0.827804 &                1.0 &                        1.0 &                        1.0 &               1.001159 &                       0.967207 &                       1.035112 &                 0.999103 &                         0.970151 &                         1.028055 &                 0.999103 &                         0.970151 &                         1.028055 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988452 &                         0.975573 &                         1.001331 \\
154.285714  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954778 &                      0.927975 &                      0.981580 &                        1.0 &                                1.0 &                                1.0 &       0.994827 &               0.985704 &               1.003950 &                          0.765764 &                                  0.710625 &                                  0.820903 &                1.0 &                        1.0 &                        1.0 &               0.994023 &                       0.945614 &                       1.042433 &                 0.998807 &                         0.970684 &                         1.026930 &                 0.998807 &                         0.970684 &                         1.026930 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988506 &                         0.975646 &                         1.001367 \\
154.805195  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955428 &                      0.928601 &                      0.982255 &                        1.0 &                                1.0 &                                1.0 &       0.994659 &               0.985528 &               1.003790 &                          0.758951 &                                  0.703763 &                                  0.814140 &                1.0 &                        1.0 &                        1.0 &               0.986516 &                       0.897557 &                       1.075474 &                 0.998668 &                         0.971325 &                         1.026011 &                 0.998668 &                         0.971325 &                         1.026011 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988593 &                         0.975721 &                         1.001465 \\
155.324675  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956119 &                      0.929200 &                      0.983037 &                        1.0 &                                1.0 &                                1.0 &       0.994498 &               0.985335 &               1.003660 &                          0.752168 &                                  0.696790 &                                  0.807546 &                1.0 &                        1.0 &                        1.0 &               0.980083 &                       0.853066 &                       1.107100 &                 0.998805 &                         0.971982 &                         1.025629 &                 0.998805 &                         0.971982 &                         1.025629 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988710 &                         0.975793 &                         1.001626 \\
155.844156  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956851 &                      0.929767 &                      0.983935 &                        1.0 &                                1.0 &                                1.0 &       0.994345 &               0.985126 &               1.003563 &                          0.745434 &                                  0.689716 &                                  0.801152 &                1.0 &                        1.0 &                        1.0 &               0.976172 &                       0.826165 &                       1.126180 &                 0.999338 &                         0.972697 &                         1.025980 &                 0.999338 &                         0.972697 &                         1.025980 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988856 &                         0.975860 &                         1.001851 \\
156.363636  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957626 &                      0.930299 &                      0.984953 &                        1.0 &                                1.0 &                                1.0 &       0.994202 &               0.984900 &               1.003503 &                          0.738768 &                                  0.682550 &                                  0.794986 &                1.0 &                        1.0 &                        1.0 &               0.976230 &                       0.828202 &                       1.124258 &                 1.000385 &                         0.973676 &                         1.027094 &                 1.000385 &                         0.973676 &                         1.027094 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989030 &                         0.975917 &                         1.002142 \\
156.883117  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958446 &                      0.930795 &                      0.986098 &                        1.0 &                                1.0 &                                1.0 &       0.994070 &               0.984658 &               1.003482 &                          0.732187 &                                  0.675301 &                                  0.789073 &                1.0 &                        1.0 &                        1.0 &               0.981084 &                       0.864385 &                       1.097783 &                 1.001931 &                         0.975028 &                         1.028834 &                 1.001931 &                         0.975028 &                         1.028834 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989230 &                         0.975962 &                         1.002497 \\
157.402597  &                                  1.0 &                                          1.0 &                                          1.0 &              0.959311 &                      0.931249 &                      0.987373 &                        1.0 &                                1.0 &                                1.0 &       0.993949 &               0.984398 &               1.003501 &                          0.725699 &                                  0.667970 &                                  0.783428 &                1.0 &                        1.0 &                        1.0 &               0.989820 &                       0.923207 &                       1.056434 &                 1.003584 &                         0.976294 &                         1.030874 &                 1.003584 &                         0.976294 &                         1.030874 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989453 &                         0.975988 &                         1.002918 \\
157.922078  &                                  1.0 &                                          1.0 &                                          1.0 &              0.960219 &                      0.931659 &                      0.988779 &                        1.0 &                                1.0 &                                1.0 &       0.993841 &               0.984120 &               1.003562 &                          0.719310 &                                  0.660556 &                                  0.778065 &                1.0 &                        1.0 &                        1.0 &               1.001218 &                       0.970147 &                       1.032290 &                 1.004886 &                         0.976930 &                         1.032841 &                 1.004886 &                         0.976930 &                         1.032841 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989698 &                         0.975994 &                         1.003402 \\
158.441558  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961171 &                      0.932022 &                      0.990320 &                        1.0 &                                1.0 &                                1.0 &       0.993745 &               0.983823 &               1.003666 &                          0.713028 &                                  0.653062 &                                  0.772993 &                1.0 &                        1.0 &                        1.0 &               1.014058 &                       0.940819 &                       1.087297 &                 1.005378 &                         0.976451 &                         1.034305 &                 1.005378 &                         0.976451 &                         1.034305 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989961 &                         0.975974 &                         1.003947 \\
158.961039  &                                  1.0 &                                          1.0 &                                          1.0 &              0.962166 &                      0.932337 &                      0.991994 &                        1.0 &                                1.0 &                                1.0 &       0.993661 &               0.983508 &               1.003814 &                          0.706858 &                                  0.645493 &                                  0.768222 &                1.0 &                        1.0 &                        1.0 &               1.027119 &                       0.907106 &                       1.147132 &                 1.004602 &                         0.974434 &                         1.034771 &                 1.004602 &                         0.974434 &                         1.034771 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990239 &                         0.975927 &                         1.004552 \\
159.480519  &                                  1.0 &                                          1.0 &                                          1.0 &              0.963203 &                      0.932603 &                      0.993803 &                        1.0 &                                1.0 &                                1.0 &       0.993591 &               0.983175 &               1.004006 &                          0.700807 &                                  0.637856 &                                  0.763758 &                1.0 &                        1.0 &                        1.0 &               1.039173 &                       0.893910 &                       1.184436 &                 1.002102 &                         0.970471 &                         1.033733 &                 1.002102 &                         0.970471 &                         1.033733 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990531 &                         0.975848 &                         1.005213 \\
160.000000  &                                  1.0 &                                          1.0 &                                          1.0 &              0.964281 &                      0.932820 &                      0.995743 &                        1.0 &                                1.0 &                                1.0 &       0.993533 &               0.982825 &               1.004242 &                          0.694875 &                                  0.630152 &                                  0.759599 &                1.0 &                        1.0 &                        1.0 &               1.048352 &                       0.904569 &                       1.192135 &                 0.997492 &                         0.964117 &                         1.030868 &                 0.997492 &                         0.964117 &                         1.030868 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990833 &                         0.975737 &                         1.005929 \\
160.519481  &                                  1.0 &                                          1.0 &                                          1.0 &              0.965397 &                      0.932984 &                      0.997810 &                        1.0 &                                1.0 &                                1.0 &       0.993488 &               0.982455 &               1.004520 &                          0.689052 &                                  0.622372 &                                  0.755732 &                1.0 &                        1.0 &                        1.0 &               1.051686 &                       0.928313 &                       1.175058 &                 0.990516 &                         0.955020 &                         1.026012 &                 0.990516 &                         0.955020 &                         1.026012 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991144 &                         0.975592 &                         1.006697 \\
161.038961  &                                  1.0 &                                          1.0 &                                          1.0 &              0.966546 &                      0.933095 &                      0.999997 &                        1.0 &                                1.0 &                                1.0 &       0.993453 &               0.982067 &               1.004839 &                          0.683325 &                                  0.614508 &                                  0.752141 &                1.0 &                        1.0 &                        1.0 &               1.046094 &                       0.952243 &                       1.139944 &                 0.980928 &                         0.943054 &                         1.018802 &                 0.980928 &                         0.943054 &                         1.018802 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991464 &                         0.975414 &                         1.007515 \\
161.558442  &                                  1.0 &                                          1.0 &                                          1.0 &              0.967723 &                      0.933150 &                      1.002297 &                        1.0 &                                1.0 &                                1.0 &       0.993428 &               0.981660 &               1.005196 &                          0.677681 &                                  0.606556 &                                  0.748807 &                1.0 &                        1.0 &                        1.0 &               1.028496 &                       0.961724 &                       1.095268 &                 0.968483 &                         0.928277 &                         1.008689 &                 0.968483 &                         0.928277 &                         1.008689 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991792 &                         0.975202 &                         1.008381 \\
162.077922  &                                  1.0 &                                          1.0 &                                          1.0 &              0.968926 &                      0.933148 &                      1.004703 &                        1.0 &                                1.0 &                                1.0 &       0.993412 &               0.981234 &               1.005590 &                          0.672110 &                                  0.598508 &                                  0.745712 &                1.0 &                        1.0 &                        1.0 &               0.995813 &                       0.940900 &                       1.050725 &                 0.952936 &                         0.910827 &                         0.995044 &                 0.952936 &                         0.910827 &                         0.995044 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992125 &                         0.974958 &                         1.009292 \\
162.597403  &                                  1.0 &                                          1.0 &                                          1.0 &              0.970150 &                      0.933091 &                      1.007208 &                        1.0 &                                1.0 &                                1.0 &       0.993404 &               0.980790 &               1.006017 &                          0.666598 &                                  0.590361 &                                  0.742836 &                1.0 &                        1.0 &                        1.0 &               0.945200 &                       0.885105 &                       1.005294 &                 0.934072 &                         0.890813 &                         0.977332 &                 0.934072 &                         0.890813 &                         0.977332 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992464 &                         0.974682 &                         1.010245 \\
163.116883  &                                  1.0 &                                          1.0 &                                          1.0 &              0.971391 &                      0.932979 &                      1.009804 &                        1.0 &                                1.0 &                                1.0 &       0.993402 &               0.980327 &               1.006476 &                          0.661136 &                                  0.582112 &                                  0.740159 &                1.0 &                        1.0 &                        1.0 &               0.880047 &                       0.804782 &                       0.955312 &                 0.912524 &                         0.868785 &                         0.956262 &                 0.912524 &                         0.868785 &                         0.956262 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992807 &                         0.974375 &                         1.011238 \\
163.636364  &                                  1.0 &                                          1.0 &                                          1.0 &              0.972648 &                      0.932812 &                      1.012484 &                        1.0 &                                1.0 &                                1.0 &       0.993405 &               0.979846 &               1.006965 &                          0.655712 &                                  0.573761 &                                  0.737664 &                1.0 &                        1.0 &                        1.0 &               0.810478 &                       0.713547 &                       0.907410 &                 0.889830 &                         0.845849 &                         0.933811 &                 0.889830 &                         0.845849 &                         0.933811 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993153 &                         0.974039 &                         1.012268 \\
164.155844  &                                  1.0 &                                          1.0 &                                          1.0 &              0.973919 &                      0.932595 &                      1.015243 &                        1.0 &                                1.0 &                                1.0 &       0.993414 &               0.979349 &               1.007480 &                          0.650318 &                                  0.565305 &                                  0.735331 &                1.0 &                        1.0 &                        1.0 &               0.746952 &                       0.628068 &                       0.865836 &                 0.867577 &                         0.823213 &                         0.911940 &                 0.867577 &                         0.823213 &                         0.911940 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993503 &                         0.973674 &                         1.013331 \\
164.675325  &                                  1.0 &                                          1.0 &                                          1.0 &              0.975201 &                      0.932328 &                      1.018074 &                        1.0 &                                1.0 &                                1.0 &       0.993428 &               0.978835 &               1.008021 &                          0.644944 &                                  0.556745 &                                  0.733143 &                1.0 &                        1.0 &                        1.0 &               0.699926 &                       0.566870 &                       0.832982 &                 0.847351 &                         0.802265 &                         0.892437 &                 0.847351 &                         0.802265 &                         0.892437 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993855 &                         0.973284 &                         1.014427 \\
165.194805  &                                  1.0 &                                          1.0 &                                          1.0 &              0.976491 &                      0.932014 &                      1.020969 &                        1.0 &                                1.0 &                                1.0 &       0.993445 &               0.978306 &               1.008584 &                          0.639581 &                                  0.548080 &                                  0.731081 &                1.0 &                        1.0 &                        1.0 &               0.679859 &                       0.548555 &                       0.811162 &                 0.830737 &                         0.784602 &                         0.876872 &                 0.830737 &                         0.784602 &                         0.876872 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994209 &                         0.972868 &                         1.015551 \\
165.714286  &                                  1.0 &                                          1.0 &                                          1.0 &              0.977789 &                      0.931655 &                      1.023923 &                        1.0 &                                1.0 &                                1.0 &       0.993465 &               0.977763 &               1.009168 &                          0.634218 &                                  0.539310 &                                  0.729126 &                1.0 &                        1.0 &                        1.0 &               0.695662 &                       0.588077 &                       0.803247 &                 0.819235 &                         0.771883 &                         0.866587 &                 0.819235 &                         0.771883 &                         0.866587 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994565 &                         0.972429 &                         1.016702 \\
166.233766  &                                  1.0 &                                          1.0 &                                          1.0 &              0.979092 &                      0.931254 &                      1.026930 &                        1.0 &                                1.0 &                                1.0 &       0.993488 &               0.977205 &               1.009771 &                          0.628851 &                                  0.530438 &                                  0.727264 &                1.0 &                        1.0 &                        1.0 &               0.736928 &                       0.665361 &                       0.808495 &                 0.813250 &                         0.764564 &                         0.861936 &                 0.813250 &                         0.764564 &                         0.861936 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994923 &                         0.971969 &                         1.017876 \\
166.753247  &                                  1.0 &                                          1.0 &                                          1.0 &              0.980400 &                      0.930814 &                      1.029985 &                        1.0 &                                1.0 &                                1.0 &       0.993513 &               0.976635 &               1.010390 &                          0.623478 &                                  0.521470 &                                  0.725486 &                1.0 &                        1.0 &                        1.0 &               0.780119 &                       0.718847 &                       0.841391 &                 0.812446 &                         0.762193 &                         0.862700 &                 0.812446 &                         0.762193 &                         0.862700 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995281 &                         0.971488 &                         1.019073 \\
167.272727  &                                  1.0 &                                          1.0 &                                          1.0 &              0.981711 &                      0.930338 &                      1.033084 &                        1.0 &                                1.0 &                                1.0 &       0.993539 &               0.976053 &               1.011025 &                          0.618096 &                                  0.512410 &                                  0.723781 &                1.0 &                        1.0 &                        1.0 &               0.801444 &                       0.704107 &                       0.898781 &                 0.816473 &                         0.764229 &                         0.868717 &                 0.816473 &                         0.764229 &                         0.868717 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995640 &                         0.970990 &                         1.020290 \\
167.792208  &                                  1.0 &                                          1.0 &                                          1.0 &              0.983025 &                      0.929828 &                      1.036222 &                        1.0 &                                1.0 &                                1.0 &       0.993567 &               0.975460 &               1.011674 &                          0.612703 &                                  0.503265 &                                  0.722141 &                1.0 &                        1.0 &                        1.0 &               0.777114 &                       0.637332 &                       0.916896 &                 0.824979 &                         0.770069 &                         0.879888 &                 0.824979 &                         0.770069 &                         0.879888 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995999 &                         0.970474 &                         1.021525 \\
168.311688  &                                  1.0 &                                          1.0 &                                          1.0 &              0.984341 &                      0.929287 &                      1.039396 &                        1.0 &                                1.0 &                                1.0 &       0.993596 &               0.974857 &               1.012335 &                          0.607297 &                                  0.494038 &                                  0.720556 &                1.0 &                        1.0 &                        1.0 &               0.683338 &                       0.514605 &                       0.852071 &                 0.837614 &                         0.779057 &                         0.896171 &                 0.837614 &                         0.779057 &                         0.896171 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996360 &                         0.969943 &                         1.022776 \\
168.831169  &                                  1.0 &                                          1.0 &                                          1.0 &              0.985659 &                      0.928717 &                      1.042600 &                        1.0 &                                1.0 &                                1.0 &       0.993626 &               0.974244 &               1.013007 &                          0.601876 &                                  0.484734 &                                  0.719017 &                1.0 &                        1.0 &                        1.0 &               0.506615 &                       0.324485 &                       0.688746 &                 0.854008 &                         0.790453 &                         0.917562 &                 0.854008 &                         0.790453 &                         0.917562 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996720 &                         0.969398 &                         1.024042 \\
169.350649  &                                  1.0 &                                          1.0 &                                          1.0 &              0.986977 &                      0.928121 &                      1.045833 &                        1.0 &                                1.0 &                                1.0 &       0.993656 &               0.973623 &               1.013689 &                          0.596440 &                                  0.475360 &                                  0.717520 &                1.0 &                        1.0 &                        1.0 &               0.303995 &                       0.111343 &                       0.496648 &                 0.873652 &                         0.803338 &                         0.943965 &                 0.873652 &                         0.803338 &                         0.943965 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997080 &                         0.968840 &                         1.025321 \\
169.870130  &                                  1.0 &                                          1.0 &                                          1.0 &              0.988296 &                      0.927500 &                      1.049091 &                        1.0 &                                1.0 &                                1.0 &       0.993687 &               0.972994 &               1.014380 &                          0.590993 &                                  0.465923 &                                  0.716062 &                1.0 &                        1.0 &                        1.0 &               0.162119 &                      -0.039875 &                       0.364113 &                 0.895980 &                         0.816916 &                         0.975043 &                 0.895980 &                         0.816916 &                         0.975043 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997441 &                         0.968270 &                         1.026612 \\
170.389610  &                                  1.0 &                                          1.0 &                                          1.0 &              0.989615 &                      0.926858 &                      1.052372 &                        1.0 &                                1.0 &                                1.0 &       0.993718 &               0.972358 &               1.015079 &                          0.585536 &                                  0.456431 &                                  0.714641 &                1.0 &                        1.0 &                        1.0 &               0.167729 &                      -0.027456 &                       0.362913 &                 0.920426 &                         0.830654 &                         1.010197 &                 0.920426 &                         0.830654 &                         1.010197 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997802 &                         0.967689 &                         1.027914 \\
170.909091  &                                  1.0 &                                          1.0 &                                          1.0 &              0.990935 &                      0.926196 &                      1.055674 &                        1.0 &                                1.0 &                                1.0 &       0.993750 &               0.971714 &               1.015785 &                          0.580071 &                                  0.446888 &                                  0.713253 &                1.0 &                        1.0 &                        1.0 &               0.407567 &                       0.250087 &                       0.565047 &                 0.946424 &                         0.844209 &                         1.048639 &                 0.946424 &                         0.844209 &                         1.048639 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998163 &                         0.967099 &                         1.029226 \\
171.428571  &                                  1.0 &                                          1.0 &                                          1.0 &              0.992255 &                      0.925516 &                      1.058994 &                        1.0 &                                1.0 &                                1.0 &       0.993782 &               0.971065 &               1.016498 &                          0.574600 &                                  0.437302 &                                  0.711898 &                1.0 &                        1.0 &                        1.0 &               0.968376 &                       0.833908 &                       1.102845 &                 0.973408 &                         0.857342 &                         1.089474 &                 0.973408 &                         0.857342 &                         1.089474 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998524 &                         0.966500 &                         1.030547 \\
\bottomrule
\end{tabular}
