\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  boeck2019/multi\_task &  boeck2019/multi\_task\_lowerci &  boeck2019/multi\_task\_upperci &  boeck2019/multi\_task\_hjdb &  boeck2019/multi\_task\_hjdb\_lowerci &  boeck2019/multi\_task\_hjdb\_upperci &  boeck2020/dar &  boeck2020/dar\_lowerci &  boeck2020/dar\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                       &                               &                               &                            &                                    &                                    &                &                        &                        &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
120.000000  &                                  1.0 &                                          1.0 &                                          1.0 &              1.003176 &                      0.912220 &                      1.094132 &                        1.0 &                                1.0 &                                1.0 &       1.002588 &               0.969832 &               1.035345 &                          1.095252 &                                  0.896807 &                                  1.293696 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.791991 &                       1.208009 &                 1.000000 &                         0.809604 &                         1.190396 &                 1.000000 &                         0.809604 &                         1.190396 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004948 &                         0.958769 &                         1.051126 \\
120.531938  &                                  1.0 &                                          1.0 &                                          1.0 &              1.001958 &                      0.912886 &                      1.091030 &                        1.0 &                                1.0 &                                1.0 &       1.002517 &               0.970439 &               1.034595 &                          1.091031 &                                  0.896698 &                                  1.285365 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.812873 &                       1.187127 &                 1.000000 &                         0.830390 &                         1.169610 &                 1.000000 &                         0.830390 &                         1.169610 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004676 &                         0.959453 &                         1.049898 \\
121.063876  &                                  1.0 &                                          1.0 &                                          1.0 &              1.000740 &                      0.913541 &                      1.087940 &                        1.0 &                                1.0 &                                1.0 &       1.002445 &               0.971041 &               1.033849 &                          1.086810 &                                  0.896562 &                                  1.277058 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.831292 &                       1.168708 &                 1.000000 &                         0.845474 &                         1.154526 &                 1.000000 &                         0.845474 &                         1.154526 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004404 &                         0.960132 &                         1.048676 \\
121.595814  &                                  1.0 &                                          1.0 &                                          1.0 &              0.999523 &                      0.914183 &                      1.084862 &                        1.0 &                                1.0 &                                1.0 &       1.002373 &               0.971640 &               1.033107 &                          1.082588 &                                  0.896398 &                                  1.268777 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.846905 &                       1.153095 &                 1.000000 &                         0.854926 &                         1.145074 &                 1.000000 &                         0.854926 &                         1.145074 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004132 &                         0.960805 &                         1.047459 \\
122.127752  &                                  1.0 &                                          1.0 &                                          1.0 &              0.998305 &                      0.914812 &                      1.081797 &                        1.0 &                                1.0 &                                1.0 &       1.002302 &               0.972233 &               1.032370 &                          1.078363 &                                  0.896203 &                                  1.260524 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.859651 &                       1.140349 &                 1.000000 &                         0.860106 &                         1.139894 &                 1.000000 &                         0.860106 &                         1.139894 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003860 &                         0.961471 &                         1.046250 \\
122.659690  &                                  1.0 &                                          1.0 &                                          1.0 &              0.997087 &                      0.915427 &                      1.078747 &                        1.0 &                                1.0 &                                1.0 &       1.002230 &               0.972821 &               1.031638 &                          1.074137 &                                  0.895975 &                                  1.252299 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.869831 &                       1.130169 &                 1.000000 &                         0.863328 &                         1.136672 &                 1.000000 &                         0.863328 &                         1.136672 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003588 &                         0.962129 &                         1.045047 \\
123.191629  &                                  1.0 &                                          1.0 &                                          1.0 &              0.995869 &                      0.916026 &                      1.075711 &                        1.0 &                                1.0 &                                1.0 &       1.002158 &               0.973404 &               1.030912 &                          1.069908 &                                  0.895711 &                                  1.244105 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.878105 &                       1.121895 &                 1.000000 &                         0.867116 &                         1.132884 &                 1.000000 &                         0.867116 &                         1.132884 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003316 &                         0.962779 &                         1.043852 \\
123.723567  &                                  1.0 &                                          1.0 &                                          1.0 &              0.994651 &                      0.916609 &                      1.072692 &                        1.0 &                                1.0 &                                1.0 &       1.002086 &               0.973981 &               1.030191 &                          1.065677 &                                  0.895409 &                                  1.235944 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.885252 &                       1.114748 &                 1.000000 &                         0.873085 &                         1.126915 &                 1.000000 &                         0.873085 &                         1.126915 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003044 &                         0.963421 &                         1.042666 \\
124.255505  &                                  1.0 &                                          1.0 &                                          1.0 &              0.993433 &                      0.917175 &                      1.069690 &                        1.0 &                                1.0 &                                1.0 &       1.002014 &               0.974551 &               1.029477 &                          1.061441 &                                  0.895066 &                                  1.227817 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.891794 &                       1.108206 &                 1.000000 &                         0.881027 &                         1.118972 &                 1.000000 &                         0.881027 &                         1.118972 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002771 &                         0.964055 &                         1.041487 \\
124.787443  &                                  1.0 &                                          1.0 &                                          1.0 &              0.992214 &                      0.917722 &                      1.066706 &                        1.0 &                                1.0 &                                1.0 &       1.001942 &               0.975114 &               1.028769 &                          1.057201 &                                  0.894678 &                                  1.219725 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.898127 &                       1.101873 &                 1.000000 &                         0.890185 &                         1.109815 &                 1.000000 &                         0.890185 &                         1.109815 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002498 &                         0.964678 &                         1.040318 \\
125.319381  &                                  1.0 &                                          1.0 &                                          1.0 &              0.990996 &                      0.918250 &                      1.063743 &                        1.0 &                                1.0 &                                1.0 &       1.001869 &               0.975671 &               1.028068 &                          1.052957 &                                  0.894242 &                                  1.211672 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.904582 &                       1.095418 &                 1.000000 &                         0.899824 &                         1.100176 &                 1.000000 &                         0.899824 &                         1.100176 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002225 &                         0.965291 &                         1.039159 \\
125.851319  &                                  1.0 &                                          1.0 &                                          1.0 &              0.989778 &                      0.918756 &                      1.060800 &                        1.0 &                                1.0 &                                1.0 &       1.001797 &               0.976220 &               1.027374 &                          1.048706 &                                  0.893754 &                                  1.203658 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.911423 &                       1.088577 &                 1.000000 &                         0.909532 &                         1.090468 &                 1.000000 &                         0.909532 &                         1.090468 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001952 &                         0.965894 &                         1.038010 \\
126.383257  &                                  1.0 &                                          1.0 &                                          1.0 &              0.988560 &                      0.919241 &                      1.057879 &                        1.0 &                                1.0 &                                1.0 &       1.001724 &               0.976760 &               1.026688 &                          1.044449 &                                  0.893212 &                                  1.195686 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.918800 &                       1.081200 &                 1.000000 &                         0.919319 &                         1.080681 &                 1.000000 &                         0.919319 &                         1.080681 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001678 &                         0.966485 &                         1.036872 \\
126.915195  &                                  1.0 &                                          1.0 &                                          1.0 &              0.987342 &                      0.919702 &                      1.054982 &                        1.0 &                                1.0 &                                1.0 &       1.001651 &               0.977292 &               1.026011 &                          1.040185 &                                  0.892611 &                                  1.187758 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.926388 &                       1.073612 &                 1.000000 &                         0.928897 &                         1.071103 &                 1.000000 &                         0.928897 &                         1.071103 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001404 &                         0.967063 &                         1.035745 \\
127.447133  &                                  1.0 &                                          1.0 &                                          1.0 &              0.986125 &                      0.920139 &                      1.052110 &                        1.0 &                                1.0 &                                1.0 &       1.001578 &               0.977814 &               1.025342 &                          1.035911 &                                  0.891947 &                                  1.179876 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.933259 &                       1.066741 &                 1.000000 &                         0.936973 &                         1.063027 &                 1.000000 &                         0.936973 &                         1.063027 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001130 &                         0.967629 &                         1.034631 \\
127.979071  &                                  1.0 &                                          1.0 &                                          1.0 &              0.984908 &                      0.920550 &                      1.049266 &                        1.0 &                                1.0 &                                1.0 &       1.001505 &               0.978327 &               1.024682 &                          1.031627 &                                  0.891214 &                                  1.172040 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.938486 &                       1.061514 &                 1.000000 &                         0.942232 &                         1.057768 &                 1.000000 &                         0.942232 &                         1.057768 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000855 &                         0.968180 &                         1.033530 \\
128.511009  &                                  1.0 &                                          1.0 &                                          1.0 &              0.983693 &                      0.920934 &                      1.046451 &                        1.0 &                                1.0 &                                1.0 &       1.001431 &               0.978829 &               1.024032 &                          1.027331 &                                  0.890408 &                                  1.164254 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.941556 &                       1.058444 &                 1.000000 &                         0.944376 &                         1.055624 &                 1.000000 &                         0.944376 &                         1.055624 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000579 &                         0.968717 &                         1.032442 \\
129.042947  &                                  1.0 &                                          1.0 &                                          1.0 &              0.982479 &                      0.921291 &                      1.043668 &                        1.0 &                                1.0 &                                1.0 &       1.001356 &               0.979320 &               1.023392 &                          1.023021 &                                  0.889523 &                                  1.156519 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.942675 &                       1.057326 &                 1.000000 &                         0.944562 &                         1.055438 &                 1.000000 &                         0.944562 &                         1.055438 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000303 &                         0.969238 &                         1.031369 \\
129.574886  &                                  1.0 &                                          1.0 &                                          1.0 &              0.981267 &                      0.921618 &                      1.040917 &                        1.0 &                                1.0 &                                1.0 &       1.001281 &               0.979799 &               1.022763 &                          1.018696 &                                  0.888555 &                                  1.148837 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.942607 &                       1.057393 &                 1.000000 &                         0.944437 &                         1.055563 &                 1.000000 &                         0.944437 &                         1.055563 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000027 &                         0.969742 &                         1.030311 \\
130.106824  &                                  1.0 &                                          1.0 &                                          1.0 &              0.980059 &                      0.921915 &                      1.038202 &                        1.0 &                                1.0 &                                1.0 &       1.001206 &               0.980266 &               1.022145 &                          1.014353 &                                  0.887498 &                                  1.141208 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.941790 &                       1.058210 &                 1.000000 &                         0.943942 &                         1.056058 &                 1.000000 &                         0.943942 &                         1.056058 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999749 &                         0.970229 &                         1.029269 \\
130.638762  &                                  1.0 &                                          1.0 &                                          1.0 &              0.978853 &                      0.922182 &                      1.035525 &                        1.0 &                                1.0 &                                1.0 &       1.001130 &               0.980720 &               1.021539 &                          1.009991 &                                  0.886347 &                                  1.133634 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.940151 &                       1.059850 &                 1.000000 &                         0.941732 &                         1.058268 &                 1.000000 &                         0.941732 &                         1.058268 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999471 &                         0.970698 &                         1.028243 \\
131.170700  &                                  1.0 &                                          1.0 &                                          1.0 &              0.977653 &                      0.922418 &                      1.032889 &                        1.0 &                                1.0 &                                1.0 &       1.001053 &               0.981160 &               1.020945 &                          1.005606 &                                  0.885095 &                                  1.126116 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.937733 &                       1.062267 &                 1.000000 &                         0.937452 &                         1.062548 &                 1.000000 &                         0.937452 &                         1.062548 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999192 &                         0.971148 &                         1.027235 \\
131.702638  &                                  1.0 &                                          1.0 &                                          1.0 &              0.976459 &                      0.922623 &                      1.030296 &                        1.0 &                                1.0 &                                1.0 &       1.000975 &               0.981586 &               1.020363 &                          1.001196 &                                  0.883738 &                                  1.118655 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.934889 &                       1.065112 &                 1.000000 &                         0.932252 &                         1.067747 &                 1.000000 &                         0.932252 &                         1.067747 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998912 &                         0.971578 &                         1.026245 \\
132.234576  &                                  1.0 &                                          1.0 &                                          1.0 &              0.975273 &                      0.922796 &                      1.027749 &                        1.0 &                                1.0 &                                1.0 &       1.000896 &               0.981997 &               1.019794 &                          0.996760 &                                  0.882269 &                                  1.111251 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.932210 &                       1.067790 &                 1.000000 &                         0.928060 &                         1.071939 &                 1.000000 &                         0.928060 &                         1.071939 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998630 &                         0.971988 &                         1.025273 \\
132.766514  &                                  1.0 &                                          1.0 &                                          1.0 &              0.974094 &                      0.922938 &                      1.025250 &                        1.0 &                                1.0 &                                1.0 &       1.000815 &               0.982392 &               1.019238 &                          0.992294 &                                  0.880684 &                                  1.103903 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.930266 &                       1.069734 &                 1.000000 &                         0.926439 &                         1.073561 &                 1.000000 &                         0.926439 &                         1.073561 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998348 &                         0.972376 &                         1.024320 \\
133.298452  &                                  1.0 &                                          1.0 &                                          1.0 &              0.972926 &                      0.923050 &                      1.022802 &                        1.0 &                                1.0 &                                1.0 &       1.000734 &               0.982772 &               1.018696 &                          0.987795 &                                  0.878978 &                                  1.096612 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.928984 &                       1.071016 &                 1.000000 &                         0.926705 &                         1.073295 &                 1.000000 &                         0.926705 &                         1.073295 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998065 &                         0.972743 &                         1.023387 \\
133.830390  &                                  1.0 &                                          1.0 &                                          1.0 &              0.971769 &                      0.923132 &                      1.020407 &                        1.0 &                                1.0 &                                1.0 &       1.000651 &               0.983135 &               1.018167 &                          0.983262 &                                  0.877147 &                                  1.089377 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.928018 &                       1.071982 &                 1.000000 &                         0.927109 &                         1.072891 &                 1.000000 &                         0.927109 &                         1.072891 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997780 &                         0.973087 &                         1.022474 \\
134.362328  &                                  1.0 &                                          1.0 &                                          1.0 &              0.970626 &                      0.923185 &                      1.018067 &                        1.0 &                                1.0 &                                1.0 &       1.000566 &               0.983481 &               1.017651 &                          0.978692 &                                  0.875187 &                                  1.082197 &                1.0 &                        1.0 &                        1.0 &               0.999999 &                       0.927256 &                       1.072743 &                 1.000000 &                         0.926632 &                         1.073369 &                 1.000000 &                         0.926632 &                         1.073369 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997495 &                         0.973409 &                         1.021581 \\
134.894266  &                                  1.0 &                                          1.0 &                                          1.0 &              0.969498 &                      0.923211 &                      1.015786 &                        1.0 &                                1.0 &                                1.0 &       1.000480 &               0.983810 &               1.017149 &                          0.974082 &                                  0.873095 &                                  1.075069 &                1.0 &                        1.0 &                        1.0 &               0.999999 &                       0.926907 &                       1.073090 &                 1.000001 &                         0.925550 &                         1.074451 &                 1.000001 &                         0.925550 &                         1.074451 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997208 &                         0.973707 &                         1.020708 \\
135.426204  &                                  1.0 &                                          1.0 &                                          1.0 &              0.968388 &                      0.923212 &                      1.013564 &                        1.0 &                                1.0 &                                1.0 &       1.000392 &               0.984122 &               1.016661 &                          0.969430 &                                  0.870867 &                                  1.067993 &                1.0 &                        1.0 &                        1.0 &               0.999998 &                       0.927422 &                       1.072575 &                 1.000001 &                         0.925231 &                         1.074771 &                 1.000001 &                         0.925231 &                         1.074771 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996919 &                         0.973983 &                         1.019855 \\
135.958143  &                                  1.0 &                                          1.0 &                                          1.0 &              0.967296 &                      0.923189 &                      1.011403 &                        1.0 &                                1.0 &                                1.0 &       1.000301 &               0.984417 &               1.016186 &                          0.964734 &                                  0.868503 &                                  1.060966 &                1.0 &                        1.0 &                        1.0 &               0.999998 &                       0.929166 &                       1.070829 &                 1.000001 &                         0.927037 &                         1.072965 &                 1.000001 &                         0.927037 &                         1.072965 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996630 &                         0.974236 &                         1.019023 \\
136.490081  &                                  1.0 &                                          1.0 &                                          1.0 &              0.966226 &                      0.923145 &                      1.009307 &                        1.0 &                                1.0 &                                1.0 &       1.000209 &               0.984694 &               1.015724 &                          0.959992 &                                  0.865999 &                                  1.053984 &                1.0 &                        1.0 &                        1.0 &               0.999997 &                       0.931700 &                       1.068295 &                 1.000002 &                         0.930313 &                         1.069690 &                 1.000002 &                         0.930313 &                         1.069690 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996339 &                         0.974466 &                         1.018211 \\
137.022019  &                                  1.0 &                                          1.0 &                                          1.0 &              0.965179 &                      0.923082 &                      1.007276 &                        1.0 &                                1.0 &                                1.0 &       1.000114 &               0.984954 &               1.015275 &                          0.955200 &                                  0.863356 &                                  1.047045 &                1.0 &                        1.0 &                        1.0 &               0.999997 &                       0.934324 &                       1.065669 &                 1.000002 &                         0.933587 &                         1.066417 &                 1.000002 &                         0.933587 &                         1.066417 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996047 &                         0.974674 &                         1.017420 \\
137.553957  &                                  1.0 &                                          1.0 &                                          1.0 &              0.964159 &                      0.923006 &                      1.005312 &                        1.0 &                                1.0 &                                1.0 &       1.000017 &               0.985196 &               1.014838 &                          0.950358 &                                  0.860572 &                                  1.040145 &                1.0 &                        1.0 &                        1.0 &               0.999996 &                       0.936596 &                       1.063397 &                 1.000002 &                         0.935954 &                         1.064049 &                 1.000002 &                         0.935954 &                         1.064049 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995754 &                         0.974860 &                         1.016647 \\
138.085895  &                                  1.0 &                                          1.0 &                                          1.0 &              0.963168 &                      0.922918 &                      1.003417 &                        1.0 &                                1.0 &                                1.0 &       0.999917 &               0.985422 &               1.014412 &                          0.945464 &                                  0.857649 &                                  1.033279 &                1.0 &                        1.0 &                        1.0 &               0.999996 &                       0.938504 &                       1.061489 &                 1.000001 &                         0.937673 &                         1.062328 &                 1.000001 &                         0.937673 &                         1.062328 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995459 &                         0.975024 &                         1.015894 \\
138.617833  &                                  1.0 &                                          1.0 &                                          1.0 &              0.962208 &                      0.922823 &                      1.001593 &                        1.0 &                                1.0 &                                1.0 &       0.999814 &               0.985631 &               1.013998 &                          0.940515 &                                  0.854588 &                                  1.026443 &                1.0 &                        1.0 &                        1.0 &               0.999997 &                       0.940439 &                       1.059555 &                 1.000000 &                         0.940000 &                         1.059999 &                 1.000000 &                         0.940000 &                         1.059999 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995163 &                         0.975168 &                         1.015159 \\
139.149771  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961283 &                      0.922726 &                      0.999839 &                        1.0 &                                1.0 &                                1.0 &       0.999709 &               0.985823 &               1.013595 &                          0.935510 &                                  0.851389 &                                  1.019632 &                1.0 &                        1.0 &                        1.0 &               0.999998 &                       0.942716 &                       1.057280 &                 0.999998 &                         0.943749 &                         1.056246 &                 0.999998 &                         0.943749 &                         1.056246 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994867 &                         0.975291 &                         1.014442 \\
139.681709  &                                  1.0 &                                          1.0 &                                          1.0 &              0.960395 &                      0.922630 &                      0.998160 &                        1.0 &                                1.0 &                                1.0 &       0.999600 &               0.986000 &               1.013201 &                          0.930446 &                                  0.848053 &                                  1.012839 &                1.0 &                        1.0 &                        1.0 &               1.000000 &                       0.944843 &                       1.055158 &                 0.999996 &                         0.947330 &                         1.052662 &                 0.999996 &                         0.947330 &                         1.052662 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994569 &                         0.975396 &                         1.013742 \\
140.213647  &                                  1.0 &                                          1.0 &                                          1.0 &              0.959549 &                      0.922543 &                      0.996556 &                        1.0 &                                1.0 &                                1.0 &       0.999489 &               0.986161 &               1.012816 &                          0.925321 &                                  0.844582 &                                  1.006060 &                1.0 &                        1.0 &                        1.0 &               1.000003 &                       0.946219 &                       1.053787 &                 0.999995 &                         0.948675 &                         1.051315 &                 0.999995 &                         0.948675 &                         1.051315 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994271 &                         0.975483 &                         1.013059 \\
140.745585  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958749 &                      0.922469 &                      0.995029 &                        1.0 &                                1.0 &                                1.0 &       0.999373 &               0.986308 &               1.012439 &                          0.920132 &                                  0.840978 &                                  0.999287 &                1.0 &                        1.0 &                        1.0 &               1.000006 &                       0.946676 &                       1.053336 &                 0.999996 &                         0.947264 &                         1.052727 &                 0.999996 &                         0.947264 &                         1.052727 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993973 &                         0.975553 &                         1.012392 \\
141.277523  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957999 &                      0.922415 &                      0.993583 &                        1.0 &                                1.0 &                                1.0 &       0.999255 &               0.986440 &               1.012070 &                          0.914878 &                                  0.837242 &                                  0.992514 &                1.0 &                        1.0 &                        1.0 &               1.000010 &                       0.946647 &                       1.053373 &                 0.999999 &                         0.944774 &                         1.055224 &                 0.999999 &                         0.944774 &                         1.055224 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993674 &                         0.975608 &                         1.011740 \\
141.809462  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957302 &                      0.922385 &                      0.992218 &                        1.0 &                                1.0 &                                1.0 &       0.999133 &               0.986558 &               1.011707 &                          0.909555 &                                  0.833376 &                                  0.985734 &                1.0 &                        1.0 &                        1.0 &               1.000015 &                       0.946944 &                       1.053085 &                 1.000006 &                         0.943848 &                         1.056163 &                 1.000006 &                         0.943848 &                         1.056163 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993376 &                         0.975648 &                         1.011103 \\
142.341400  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956662 &                      0.922387 &                      0.990937 &                        1.0 &                                1.0 &                                1.0 &       0.999007 &               0.986663 &               1.011350 &                          0.904163 &                                  0.829383 &                                  0.978942 &                1.0 &                        1.0 &                        1.0 &               1.000020 &                       0.947974 &                       1.052065 &                 1.000015 &                         0.945723 &                         1.054307 &                 1.000015 &                         0.945723 &                         1.054307 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993078 &                         0.975676 &                         1.010479 \\
142.873338  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956082 &                      0.922425 &                      0.989740 &                        1.0 &                                1.0 &                                1.0 &       0.998877 &               0.986756 &               1.010998 &                          0.898701 &                                  0.825268 &                                  0.972134 &                1.0 &                        1.0 &                        1.0 &               1.000023 &                       0.949162 &                       1.050885 &                 1.000024 &                         0.948824 &                         1.051223 &                 1.000024 &                         0.948824 &                         1.051223 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992781 &                         0.975693 &                         1.009869 \\
143.405276  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955566 &                      0.922503 &                      0.988630 &                        1.0 &                                1.0 &                                1.0 &       0.998743 &               0.986836 &               1.010651 &                          0.893170 &                                  0.821034 &                                  0.965306 &                1.0 &                        1.0 &                        1.0 &               1.000024 &                       0.949885 &                       1.050162 &                 1.000029 &                         0.951114 &                         1.048944 &                 1.000029 &                         0.951114 &                         1.048944 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992486 &                         0.975699 &                         1.009272 \\
143.937214  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955117 &                      0.922627 &                      0.987607 &                        1.0 &                                1.0 &                                1.0 &       0.998606 &               0.986905 &               1.010307 &                          0.887571 &                                  0.816686 &                                  0.958456 &                1.0 &                        1.0 &                        1.0 &               1.000019 &                       0.949966 &                       1.050073 &                 1.000027 &                         0.951558 &                         1.048496 &                 1.000027 &                         0.951558 &                         1.048496 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992192 &                         0.975697 &                         1.008688 \\
144.469152  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954737 &                      0.922801 &                      0.986673 &                        1.0 &                                1.0 &                                1.0 &       0.998464 &               0.986963 &               1.009965 &                          0.881904 &                                  0.812227 &                                  0.951581 &                1.0 &                        1.0 &                        1.0 &               1.000009 &                       0.949795 &                       1.050223 &                 1.000014 &                         0.950892 &                         1.049137 &                 1.000014 &                         0.950892 &                         1.049137 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991902 &                         0.975688 &                         1.008116 \\
145.001090  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954430 &                      0.923030 &                      0.985830 &                        1.0 &                                1.0 &                                1.0 &       0.998318 &               0.987010 &               1.009626 &                          0.876169 &                                  0.807662 &                                  0.944676 &                1.0 &                        1.0 &                        1.0 &               0.999990 &                       0.950088 &                       1.049893 &                 0.999988 &                         0.950914 &                         1.049062 &                 0.999988 &                         0.950914 &                         1.049062 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991615 &                         0.975673 &                         1.007557 \\
145.533028  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954197 &                      0.923316 &                      0.985078 &                        1.0 &                                1.0 &                                1.0 &       0.998168 &               0.987047 &               1.009289 &                          0.870368 &                                  0.802994 &                                  0.937743 &                1.0 &                        1.0 &                        1.0 &               0.999965 &                       0.951018 &                       1.048911 &                 0.999951 &                         0.952071 &                         1.047831 &                 0.999951 &                         0.952071 &                         1.047831 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991332 &                         0.975654 &                         1.007011 \\
146.064966  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954039 &                      0.923661 &                      0.984416 &                        1.0 &                                1.0 &                                1.0 &       0.998014 &               0.987073 &               1.008954 &                          0.864505 &                                  0.798229 &                                  0.930782 &                1.0 &                        1.0 &                        1.0 &               0.999935 &                       0.952003 &                       1.047866 &                 0.999913 &                         0.952870 &                         1.046956 &                 0.999913 &                         0.952870 &                         1.046956 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991055 &                         0.975632 &                         1.006478 \\
146.596904  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953955 &                      0.924065 &                      0.983845 &                        1.0 &                                1.0 &                                1.0 &       0.997855 &               0.987091 &               1.008619 &                          0.858583 &                                  0.793371 &                                  0.923795 &                1.0 &                        1.0 &                        1.0 &               0.999904 &                       0.952610 &                       1.047199 &                 0.999886 &                         0.952251 &                         1.047521 &                 0.999886 &                         0.952251 &                         1.047521 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990784 &                         0.975609 &                         1.005959 \\
147.128842  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953946 &                      0.924528 &                      0.983363 &                        1.0 &                                1.0 &                                1.0 &       0.997692 &               0.987098 &               1.008286 &                          0.852605 &                                  0.788423 &                                  0.916786 &                1.0 &                        1.0 &                        1.0 &               0.999877 &                       0.952916 &                       1.046839 &                 0.999880 &                         0.950717 &                         1.049043 &                 0.999880 &                         0.950717 &                         1.049043 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990520 &                         0.975585 &                         1.005455 \\
147.660780  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954010 &                      0.925051 &                      0.982970 &                        1.0 &                                1.0 &                                1.0 &       0.997525 &               0.987095 &               1.007954 &                          0.846574 &                                  0.783390 &                                  0.909757 &                1.0 &                        1.0 &                        1.0 &               0.999857 &                       0.953505 &                       1.046210 &                 0.999907 &                         0.950114 &                         1.049700 &                 0.999907 &                         0.950114 &                         1.049700 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990264 &                         0.975561 &                         1.004968 \\
148.192719  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954149 &                      0.925631 &                      0.982667 &                        1.0 &                                1.0 &                                1.0 &       0.997354 &               0.987083 &               1.007624 &                          0.840494 &                                  0.778275 &                                  0.902713 &                1.0 &                        1.0 &                        1.0 &               0.999848 &                       0.955085 &                       1.044610 &                 0.999976 &                         0.952430 &                         1.047521 &                 0.999976 &                         0.952430 &                         1.047521 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990019 &                         0.975540 &                         1.004497 \\
148.724657  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954359 &                      0.926267 &                      0.982452 &                        1.0 &                                1.0 &                                1.0 &       0.997178 &               0.987061 &               1.007295 &                          0.834368 &                                  0.773077 &                                  0.895659 &                1.0 &                        1.0 &                        1.0 &               0.999857 &                       0.957384 &                       1.042330 &                 1.000070 &                         0.957237 &                         1.042904 &                 1.000070 &                         0.957237 &                         1.042904 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989784 &                         0.975521 &                         1.004046 \\
149.256595  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954637 &                      0.926953 &                      0.982322 &                        1.0 &                                1.0 &                                1.0 &       0.996999 &               0.987029 &               1.006969 &                          0.828197 &                                  0.767795 &                                  0.888599 &                1.0 &                        1.0 &                        1.0 &               0.999897 &                       0.959296 &                       1.040499 &                 1.000155 &                         0.961734 &                         1.038575 &                 1.000155 &                         0.961734 &                         1.038575 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989562 &                         0.975506 &                         1.003618 \\
149.788533  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954979 &                      0.927682 &                      0.982276 &                        1.0 &                                1.0 &                                1.0 &       0.996816 &               0.986986 &               1.006647 &                          0.821984 &                                  0.762428 &                                  0.881540 &                1.0 &                        1.0 &                        1.0 &               0.999980 &                       0.960026 &                       1.039934 &                 1.000192 &                         0.963137 &                         1.037247 &                 1.000192 &                         0.963137 &                         1.037247 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989355 &                         0.975496 &                         1.003214 \\
150.320471  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955380 &                      0.928449 &                      0.982312 &                        1.0 &                                1.0 &                                1.0 &       0.996630 &               0.986931 &               1.006329 &                          0.815731 &                                  0.756972 &                                  0.874489 &                1.0 &                        1.0 &                        1.0 &               1.000117 &                       0.959692 &                       1.040543 &                 1.000146 &                         0.961075 &                         1.039217 &                 1.000146 &                         0.961075 &                         1.039217 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989164 &                         0.975491 &                         1.002838 \\
150.852409  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955837 &                      0.929246 &                      0.982428 &                        1.0 &                                1.0 &                                1.0 &       0.996441 &               0.986864 &               1.006017 &                          0.809440 &                                  0.751425 &                                  0.867455 &                1.0 &                        1.0 &                        1.0 &               1.000321 &                       0.959313 &                       1.041328 &                 0.999980 &                         0.958111 &                         1.041848 &                 0.999980 &                         0.958111 &                         1.041848 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988992 &                         0.975492 &                         1.002493 \\
151.384347  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956345 &                      0.930066 &                      0.982624 &                        1.0 &                                1.0 &                                1.0 &       0.996248 &               0.986784 &               1.005712 &                          0.803113 &                                  0.745780 &                                  0.860447 &                1.0 &                        1.0 &                        1.0 &               1.000596 &                       0.960103 &                       1.041089 &                 0.999667 &                         0.957196 &                         1.042138 &                 0.999667 &                         0.957196 &                         1.042138 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988841 &                         0.975499 &                         1.002183 \\
151.916285  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956901 &                      0.930902 &                      0.982899 &                        1.0 &                                1.0 &                                1.0 &       0.996053 &               0.986690 &               1.005416 &                          0.796757 &                                  0.740035 &                                  0.853479 &                1.0 &                        1.0 &                        1.0 &               1.000894 &                       0.962050 &                       1.039739 &                 0.999273 &                         0.958673 &                         1.039874 &                 0.999273 &                         0.958673 &                         1.039874 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988712 &                         0.975512 &                         1.001911 \\
152.448223  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957500 &                      0.931745 &                      0.983254 &                        1.0 &                                1.0 &                                1.0 &       0.995857 &               0.986582 &               1.005132 &                          0.790378 &                                  0.734187 &                                  0.846569 &                1.0 &                        1.0 &                        1.0 &               1.001141 &                       0.964356 &                       1.037927 &                 0.998907 &                         0.961242 &                         1.036571 &                 0.998907 &                         0.961242 &                         1.036571 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988608 &                         0.975532 &                         1.001684 \\
152.980161  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958138 &                      0.932585 &                      0.983691 &                        1.0 &                                1.0 &                                1.0 &       0.995659 &               0.986456 &               1.004861 &                          0.783984 &                                  0.728234 &                                  0.839734 &                1.0 &                        1.0 &                        1.0 &               1.001262 &                       0.966330 &                       1.036194 &                 0.998677 &                         0.963673 &                         1.033680 &                 0.998677 &                         0.963673 &                         1.033680 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988531 &                         0.975558 &                         1.001505 \\
153.512099  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958812 &                      0.933413 &                      0.984210 &                        1.0 &                                1.0 &                                1.0 &       0.995460 &               0.986314 &               1.004607 &                          0.777582 &                                  0.722170 &                                  0.832995 &                1.0 &                        1.0 &                        1.0 &               1.001182 &                       0.967764 &                       1.034599 &                 0.998693 &                         0.965654 &                         1.031732 &                 0.998693 &                         0.965654 &                         1.031732 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988485 &                         0.975590 &                         1.001380 \\
154.044037  &                                  1.0 &                                          1.0 &                                          1.0 &              0.959516 &                      0.934221 &                      0.984812 &                        1.0 &                                1.0 &                                1.0 &       0.995262 &               0.986152 &               1.004371 &                          0.771180 &                                  0.715991 &                                  0.826368 &                1.0 &                        1.0 &                        1.0 &               1.000825 &                       0.968973 &                       1.032677 &                 0.999064 &                         0.968067 &                         1.030061 &                 0.999064 &                         0.968067 &                         1.030061 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988471 &                         0.975628 &                         1.001313 \\
154.575976  &                                  1.0 &                                          1.0 &                                          1.0 &              0.960249 &                      0.934998 &                      0.985499 &                        1.0 &                                1.0 &                                1.0 &       0.995064 &               0.985970 &               1.004157 &                          0.764784 &                                  0.709694 &                                  0.819875 &                1.0 &                        1.0 &                        1.0 &               1.000149 &                       0.970227 &                       1.030071 &                 0.999843 &                         0.971743 &                         1.027943 &                 0.999843 &                         0.971743 &                         1.027943 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988491 &                         0.975671 &                         1.001311 \\
155.107914  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961008 &                      0.935738 &                      0.986277 &                        1.0 &                                1.0 &                                1.0 &       0.994868 &               0.985767 &               1.003968 &                          0.758407 &                                  0.703275 &                                  0.813539 &                1.0 &                        1.0 &                        1.0 &               0.999261 &                       0.970746 &                       1.027777 &                 1.000813 &                         0.974810 &                         1.026817 &                 1.000813 &                         0.974810 &                         1.026817 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988544 &                         0.975715 &                         1.001374 \\
155.639852  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961792 &                      0.936434 &                      0.987151 &                        1.0 &                                1.0 &                                1.0 &       0.994675 &               0.985543 &               1.003808 &                          0.752060 &                                  0.696734 &                                  0.807385 &                1.0 &                        1.0 &                        1.0 &               0.998316 &                       0.969620 &                       1.027011 &                 1.001676 &                         0.974659 &                         1.028694 &                 1.001676 &                         0.974659 &                         1.028694 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988630 &                         0.975756 &                         1.001505 \\
156.171790  &                                  1.0 &                                          1.0 &                                          1.0 &              0.962602 &                      0.937080 &                      0.988124 &                        1.0 &                                1.0 &                                1.0 &       0.994487 &               0.985296 &               1.003679 &                          0.745754 &                                  0.690071 &                                  0.801437 &                1.0 &                        1.0 &                        1.0 &               0.997465 &                       0.967018 &                       1.027911 &                 1.002135 &                         0.971241 &                         1.033028 &                 1.002135 &                         0.971241 &                         1.033028 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988747 &                         0.975789 &                         1.001704 \\
156.703728  &                                  1.0 &                                          1.0 &                                          1.0 &              0.963436 &                      0.937670 &                      0.989202 &                        1.0 &                                1.0 &                                1.0 &       0.994306 &               0.985027 &               1.003585 &                          0.739502 &                                  0.683286 &                                  0.795717 &                1.0 &                        1.0 &                        1.0 &               0.996862 &                       0.964304 &                       1.029419 &                 1.001890 &                         0.966899 &                         1.036882 &                 1.001890 &                         0.966899 &                         1.036882 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988893 &                         0.975811 &                         1.001974 \\
157.235666  &                                  1.0 &                                          1.0 &                                          1.0 &              0.964294 &                      0.938200 &                      0.990388 &                        1.0 &                                1.0 &                                1.0 &       0.994132 &               0.984735 &               1.003529 &                          0.733314 &                                  0.676384 &                                  0.790245 &                1.0 &                        1.0 &                        1.0 &               0.996660 &                       0.963188 &                       1.030132 &                 1.000646 &                         0.964061 &                         1.037230 &                 1.000646 &                         0.964061 &                         1.037230 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989066 &                         0.975818 &                         1.002314 \\
157.767604  &                                  1.0 &                                          1.0 &                                          1.0 &              0.965176 &                      0.938667 &                      0.991685 &                        1.0 &                                1.0 &                                1.0 &       0.993967 &               0.984420 &               1.003514 &                          0.727201 &                                  0.669365 &                                  0.785037 &                1.0 &                        1.0 &                        1.0 &               0.996997 &                       0.964564 &                       1.029430 &                 0.998425 &                         0.963942 &                         1.032907 &                 0.998425 &                         0.963942 &                         1.032907 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989266 &                         0.975808 &                         1.002725 \\
158.299542  &                                  1.0 &                                          1.0 &                                          1.0 &              0.966081 &                      0.939068 &                      0.993095 &                        1.0 &                                1.0 &                                1.0 &       0.993812 &               0.984083 &               1.003540 &                          0.721162 &                                  0.662225 &                                  0.780098 &                1.0 &                        1.0 &                        1.0 &               0.997971 &                       0.967524 &                       1.028417 &                 0.996155 &                         0.965739 &                         1.026570 &                 0.996155 &                         0.965739 &                         1.026570 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989490 &                         0.975775 &                         1.003205 \\
158.831480  &                                  1.0 &                                          1.0 &                                          1.0 &              0.967011 &                      0.939402 &                      0.994620 &                        1.0 &                                1.0 &                                1.0 &       0.993666 &               0.983723 &               1.003609 &                          0.715195 &                                  0.654959 &                                  0.775431 &                1.0 &                        1.0 &                        1.0 &               0.999669 &                       0.970703 &                       1.028634 &                 0.994923 &                         0.967834 &                         1.022012 &                 0.994923 &                         0.967834 &                         1.022012 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989734 &                         0.975717 &                         1.003751 \\
159.363418  &                                  1.0 &                                          1.0 &                                          1.0 &              0.967964 &                      0.939669 &                      0.996260 &                        1.0 &                                1.0 &                                1.0 &       0.993530 &               0.983340 &               1.003720 &                          0.709301 &                                  0.647567 &                                  0.771035 &                1.0 &                        1.0 &                        1.0 &               1.002181 &                       0.973221 &                       1.031140 &                 0.995817 &                         0.969187 &                         1.022447 &                 0.995817 &                         0.969187 &                         1.022447 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989996 &                         0.975630 &                         1.004362 \\
159.895356  &                                  1.0 &                                          1.0 &                                          1.0 &              0.968943 &                      0.939870 &                      0.998015 &                        1.0 &                                1.0 &                                1.0 &       0.993405 &               0.982935 &               1.003875 &                          0.703477 &                                  0.640049 &                                  0.766906 &                1.0 &                        1.0 &                        1.0 &               1.005595 &                       0.975325 &                       1.035866 &                 0.999923 &                         0.971294 &                         1.028551 &                 0.999923 &                         0.971294 &                         1.028551 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990273 &                         0.975513 &                         1.005033 \\
160.427295  &                                  1.0 &                                          1.0 &                                          1.0 &              0.969946 &                      0.940008 &                      0.999883 &                        1.0 &                                1.0 &                                1.0 &       0.993291 &               0.982509 &               1.004072 &                          0.697723 &                                  0.632407 &                                  0.763040 &                1.0 &                        1.0 &                        1.0 &               1.009993 &                       0.978054 &                       1.041931 &                 1.008305 &                         0.977439 &                         1.039170 &                 1.008305 &                         0.977439 &                         1.039170 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990561 &                         0.975362 &                         1.005761 \\
160.959233  &                                  1.0 &                                          1.0 &                                          1.0 &              0.970973 &                      0.940085 &                      1.001862 &                        1.0 &                                1.0 &                                1.0 &       0.993187 &               0.982063 &               1.004311 &                          0.692035 &                                  0.624643 &                                  0.759427 &                1.0 &                        1.0 &                        1.0 &               1.014660 &                       0.981135 &                       1.048184 &                 1.020189 &                         0.987622 &                         1.052755 &                 1.020189 &                         0.987622 &                         1.052755 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990860 &                         0.975178 &                         1.006542 \\
161.491171  &                                  1.0 &                                          1.0 &                                          1.0 &              0.972022 &                      0.940099 &                      1.003945 &                        1.0 &                                1.0 &                                1.0 &       0.993093 &               0.981597 &               1.004590 &                          0.686403 &                                  0.616755 &                                  0.756051 &                1.0 &                        1.0 &                        1.0 &               1.017522 &                       0.982001 &                       1.053044 &                 1.031635 &                         0.996663 &                         1.066607 &                 1.031635 &                         0.996663 &                         1.066607 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991167 &                         0.974960 &                         1.007374 \\
162.023109  &                                  1.0 &                                          1.0 &                                          1.0 &              0.973090 &                      0.940054 &                      1.006126 &                        1.0 &                                1.0 &                                1.0 &       0.993008 &               0.981111 &               1.004906 &                          0.680818 &                                  0.608741 &                                  0.752895 &                1.0 &                        1.0 &                        1.0 &               1.016370 &                       0.978238 &                       1.054501 &                 1.038391 &                         0.999800 &                         1.076981 &                 1.038391 &                         0.999800 &                         1.076981 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991481 &                         0.974708 &                         1.008254 \\
162.555047  &                                  1.0 &                                          1.0 &                                          1.0 &              0.974175 &                      0.939950 &                      1.008399 &                        1.0 &                                1.0 &                                1.0 &       0.992931 &               0.980605 &               1.005256 &                          0.675270 &                                  0.600600 &                                  0.749941 &                1.0 &                        1.0 &                        1.0 &               1.008993 &                       0.968063 &                       1.049923 &                 1.036203 &                         0.993724 &                         1.078682 &                 1.036203 &                         0.993724 &                         1.078682 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991801 &                         0.974425 &                         1.009178 \\
163.086985  &                                  1.0 &                                          1.0 &                                          1.0 &              0.975273 &                      0.939788 &                      1.010757 &                        1.0 &                                1.0 &                                1.0 &       0.992860 &               0.980081 &               1.005639 &                          0.669750 &                                  0.592332 &                                  0.747169 &                1.0 &                        1.0 &                        1.0 &               0.993182 &                       0.950059 &                       1.036305 &                 1.020819 &                         0.975852 &                         1.065786 &                 1.020819 &                         0.975852 &                         1.065786 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992127 &                         0.974111 &                         1.010142 \\
163.618923  &                                  1.0 &                                          1.0 &                                          1.0 &              0.976381 &                      0.939571 &                      1.013192 &                        1.0 &                                1.0 &                                1.0 &       0.992795 &               0.979538 &               1.006051 &                          0.664248 &                                  0.583937 &                                  0.744559 &                1.0 &                        1.0 &                        1.0 &               0.966823 &                       0.922782 &                       1.010864 &                 0.988192 &                         0.943498 &                         1.032887 &                 0.988192 &                         0.943498 &                         1.032887 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992456 &                         0.973767 &                         1.011145 \\
164.150861  &                                  1.0 &                                          1.0 &                                          1.0 &              0.977499 &                      0.939301 &                      1.015697 &                        1.0 &                                1.0 &                                1.0 &       0.992734 &               0.978977 &               1.006490 &                          0.658758 &                                  0.575419 &                                  0.742097 &                1.0 &                        1.0 &                        1.0 &               0.930347 &                       0.886190 &                       0.974505 &                 0.939744 &                         0.897139 &                         0.982350 &                 0.939744 &                         0.897139 &                         0.982350 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992788 &                         0.973395 &                         1.012181 \\
164.682799  &                                  1.0 &                                          1.0 &                                          1.0 &              0.978625 &                      0.938982 &                      1.018268 &                        1.0 &                                1.0 &                                1.0 &       0.992677 &               0.978400 &               1.006954 &                          0.653278 &                                  0.566786 &                                  0.739769 &                1.0 &                        1.0 &                        1.0 &               0.886933 &                       0.842065 &                       0.931802 &                 0.882801 &                         0.841080 &                         0.924521 &                 0.882801 &                         0.841080 &                         0.924521 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993123 &                         0.972996 &                         1.013250 \\
165.214737  &                                  1.0 &                                          1.0 &                                          1.0 &              0.979757 &                      0.938616 &                      1.020898 &                        1.0 &                                1.0 &                                1.0 &       0.992624 &               0.977807 &               1.007440 &                          0.647804 &                                  0.558044 &                                  0.737565 &                1.0 &                        1.0 &                        1.0 &               0.839896 &                       0.792754 &                       0.887039 &                 0.824981 &                         0.780826 &                         0.869136 &                 0.824981 &                         0.780826 &                         0.869136 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993459 &                         0.972572 &                         1.014347 \\
165.746675  &                                  1.0 &                                          1.0 &                                          1.0 &              0.980894 &                      0.938205 &                      1.023582 &                        1.0 &                                1.0 &                                1.0 &       0.992573 &               0.977200 &               1.007947 &                          0.642336 &                                  0.549201 &                                  0.735472 &                1.0 &                        1.0 &                        1.0 &               0.792552 &                       0.741563 &                       0.843541 &                 0.773905 &                         0.724475 &                         0.823334 &                 0.773905 &                         0.724475 &                         0.823334 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993798 &                         0.972125 &                         1.015471 \\
166.278613  &                                  1.0 &                                          1.0 &                                          1.0 &              0.982034 &                      0.937754 &                      1.026314 &                        1.0 &                                1.0 &                                1.0 &       0.992525 &               0.976579 &               1.008472 &                          0.636871 &                                  0.540263 &                                  0.733479 &                1.0 &                        1.0 &                        1.0 &               0.748215 &                       0.692563 &                       0.803868 &                 0.737191 &                         0.681787 &                         0.792595 &                 0.737191 &                         0.681787 &                         0.792595 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994138 &                         0.971656 &                         1.016619 \\
166.810552  &                                  1.0 &                                          1.0 &                                          1.0 &              0.983177 &                      0.937265 &                      1.029089 &                        1.0 &                                1.0 &                                1.0 &       0.992479 &               0.975944 &               1.009013 &                          0.631406 &                                  0.531236 &                                  0.731575 &                1.0 &                        1.0 &                        1.0 &               0.710073 &                       0.649791 &                       0.770354 &                 0.721897 &                         0.661421 &                         0.782374 &                 0.721897 &                         0.661421 &                         0.782374 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994478 &                         0.971168 &                         1.017788 \\
167.342490  &                                  1.0 &                                          1.0 &                                          1.0 &              0.984322 &                      0.936740 &                      1.031904 &                        1.0 &                                1.0 &                                1.0 &       0.992434 &               0.975298 &               1.009570 &                          0.625941 &                                  0.522129 &                                  0.729754 &                1.0 &                        1.0 &                        1.0 &               0.679697 &                       0.614898 &                       0.744496 &                 0.728062 &                         0.662716 &                         0.793407 &                 0.728062 &                         0.662716 &                         0.793407 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994819 &                         0.970662 &                         1.018977 \\
167.874428  &                                  1.0 &                                          1.0 &                                          1.0 &              0.985468 &                      0.936182 &                      1.034753 &                        1.0 &                                1.0 &                                1.0 &       0.992390 &               0.974641 &               1.010139 &                          0.620479 &                                  0.512951 &                                  0.728008 &                1.0 &                        1.0 &                        1.0 &               0.657563 &                       0.588023 &                       0.727103 &                 0.750950 &                         0.679684 &                         0.822216 &                 0.750950 &                         0.679684 &                         0.822216 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995161 &                         0.970138 &                         1.020183 \\
168.406366  &                                  1.0 &                                          1.0 &                                          1.0 &              0.986615 &                      0.935595 &                      1.037635 &                        1.0 &                                1.0 &                                1.0 &       0.992347 &               0.973973 &               1.010721 &                          0.615021 &                                  0.503708 &                                  0.726335 &                1.0 &                        1.0 &                        1.0 &               0.644125 &                       0.569449 &                       0.718800 &                 0.785737 &                         0.707522 &                         0.863952 &                 0.785737 &                         0.707522 &                         0.863952 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995503 &                         0.969600 &                         1.021406 \\
168.938304  &                                  1.0 &                                          1.0 &                                          1.0 &              0.987763 &                      0.934981 &                      1.040546 &                        1.0 &                                1.0 &                                1.0 &       0.992305 &               0.973296 &               1.011314 &                          0.609569 &                                  0.494410 &                                  0.724728 &                1.0 &                        1.0 &                        1.0 &               0.639837 &                       0.559624 &                       0.720051 &                 0.827597 &                         0.742563 &                         0.912632 &                 0.827597 &                         0.742563 &                         0.912632 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995845 &                         0.969047 &                         1.022643 \\
169.470242  &                                  1.0 &                                          1.0 &                                          1.0 &              0.988912 &                      0.934341 &                      1.043483 &                        1.0 &                                1.0 &                                1.0 &       0.992264 &               0.972611 &               1.011917 &                          0.604124 &                                  0.485064 &                                  0.723184 &                1.0 &                        1.0 &                        1.0 &               0.645155 &                       0.558962 &                       0.731348 &                 0.871706 &                         0.781427 &                         0.961985 &                 0.871706 &                         0.781427 &                         0.961985 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996188 &                         0.968482 &                         1.023894 \\
170.002180  &                                  1.0 &                                          1.0 &                                          1.0 &              0.990061 &                      0.933679 &                      1.046443 &                        1.0 &                                1.0 &                                1.0 &       0.992223 &               0.971918 &               1.012528 &                          0.598688 &                                  0.475676 &                                  0.721700 &                1.0 &                        1.0 &                        1.0 &               0.660374 &                       0.567340 &                       0.753409 &                 0.913664 &                         0.820237 &                         1.007091 &                 0.913664 &                         0.820237 &                         1.007091 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996531 &                         0.967905 &                         1.025156 \\
170.534118  &                                  1.0 &                                          1.0 &                                          1.0 &              0.991211 &                      0.932997 &                      1.049425 &                        1.0 &                                1.0 &                                1.0 &       0.992182 &               0.971217 &               1.013147 &                          0.593260 &                                  0.466251 &                                  0.720269 &                1.0 &                        1.0 &                        1.0 &               0.684709 &                       0.582753 &                       0.786664 &                 0.951992 &                         0.855227 &                         1.048758 &                 0.951992 &                         0.855227 &                         1.048758 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996873 &                         0.967318 &                         1.026429 \\
171.066056  &                                  1.0 &                                          1.0 &                                          1.0 &              0.992361 &                      0.932295 &                      1.052426 &                        1.0 &                                1.0 &                                1.0 &       0.992142 &               0.970510 &               1.013773 &                          0.587839 &                                  0.456791 &                                  0.718886 &                1.0 &                        1.0 &                        1.0 &               0.716917 &                       0.602734 &                       0.831101 &                 0.986437 &                         0.882339 &                         1.090535 &                 0.986437 &                         0.882339 &                         1.090535 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997216 &                         0.966721 &                         1.027712 \\
171.597994  &                                  1.0 &                                          1.0 &                                          1.0 &              0.993510 &                      0.931577 &                      1.055444 &                        1.0 &                                1.0 &                                1.0 &       0.992102 &               0.969797 &               1.014406 &                          0.582424 &                                  0.447300 &                                  0.717547 &                1.0 &                        1.0 &                        1.0 &               0.755759 &                       0.625413 &                       0.886104 &                 1.016749 &                         0.898156 &                         1.135342 &                 1.016749 &                         0.898156 &                         1.135342 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997559 &                         0.966115 &                         1.029003 \\
172.129932  &                                  1.0 &                                          1.0 &                                          1.0 &              0.994660 &                      0.930843 &                      1.058478 &                        1.0 &                                1.0 &                                1.0 &       0.992062 &               0.969079 &               1.015044 &                          0.577013 &                                  0.437779 &                                  0.716247 &                1.0 &                        1.0 &                        1.0 &               0.799990 &                       0.649584 &                       0.950396 &                 1.042678 &                         0.901365 &                         1.183991 &                 1.042678 &                         0.901365 &                         1.183991 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997902 &                         0.965502 &                         1.030303 \\
172.661871  &                                  1.0 &                                          1.0 &                                          1.0 &              0.995811 &                      0.930095 &                      1.061526 &                        1.0 &                                1.0 &                                1.0 &       0.992022 &               0.968355 &               1.015688 &                          0.571606 &                                  0.428231 &                                  0.714981 &                1.0 &                        1.0 &                        1.0 &               0.848370 &                       0.674505 &                       1.022235 &                 1.063975 &                         0.892590 &                         1.235361 &                 1.063975 &                         0.892590 &                         1.235361 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998245 &                         0.964881 &                         1.031609 \\
\bottomrule
\end{tabular}
