\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  boeck2019/multi\_task &  boeck2019/multi\_task\_lowerci &  boeck2019/multi\_task\_upperci &  boeck2019/multi\_task\_hjdb &  boeck2019/multi\_task\_hjdb\_lowerci &  boeck2019/multi\_task\_hjdb\_upperci &  boeck2020/dar &  boeck2020/dar\_lowerci &  boeck2020/dar\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                       &                               &                               &                            &                                    &                                    &                &                        &                        &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
120.000000  &                                  1.0 &                                          1.0 &                                          1.0 &              1.005845 &                      0.907873 &                      1.103818 &                        1.0 &                                1.0 &                                1.0 &       1.002633 &               0.969287 &               1.035980 &                          1.094077 &                                  0.892450 &                                  1.295705 &                1.0 &                        1.0 &                        1.0 &               1.000071 &                       0.764928 &                       1.235215 &                 1.000000 &                         0.798431 &                         1.201569 &                 1.000000 &                         0.798431 &                         1.201569 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004869 &                         0.957860 &                         1.051878 \\
120.519495  &                                  1.0 &                                          1.0 &                                          1.0 &              1.004535 &                      0.908572 &                      1.100497 &                        1.0 &                                1.0 &                                1.0 &       1.002554 &               0.969891 &               1.035216 &                          1.090043 &                                  0.892552 &                                  1.287534 &                1.0 &                        1.0 &                        1.0 &               1.004822 &                       0.770523 &                       1.239121 &                 1.000000 &                         0.815496 &                         1.184504 &                 1.000000 &                         0.815496 &                         1.184504 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004594 &                         0.958549 &                         1.050639 \\
121.038990  &                                  1.0 &                                          1.0 &                                          1.0 &              1.003224 &                      0.909260 &                      1.097188 &                        1.0 &                                1.0 &                                1.0 &       1.002474 &               0.970492 &               1.034456 &                          1.086008 &                                  0.892629 &                                  1.279386 &                1.0 &                        1.0 &                        1.0 &               1.008943 &                       0.718667 &                       1.299219 &                 1.000000 &                         0.831461 &                         1.168539 &                 1.000000 &                         0.831461 &                         1.168539 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004319 &                         0.959233 &                         1.049405 \\
121.558485  &                                  1.0 &                                          1.0 &                                          1.0 &              1.001913 &                      0.909934 &                      1.093892 &                        1.0 &                                1.0 &                                1.0 &       1.002394 &               0.971088 &               1.033701 &                          1.081971 &                                  0.892679 &                                  1.271264 &                1.0 &                        1.0 &                        1.0 &               1.012156 &                       0.654549 &                       1.369763 &                 1.000000 &                         0.846126 &                         1.153874 &                 1.000000 &                         0.846126 &                         1.153874 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.004044 &                         0.959910 &                         1.048177 \\
122.077980  &                                  1.0 &                                          1.0 &                                          1.0 &              1.000602 &                      0.910595 &                      1.090609 &                        1.0 &                                1.0 &                                1.0 &       1.002314 &               0.971679 &               1.032950 &                          1.077933 &                                  0.892699 &                                  1.263168 &                1.0 &                        1.0 &                        1.0 &               1.014182 &                       0.604849 &                       1.423515 &                 1.000000 &                         0.859348 &                         1.140652 &                 1.000000 &                         0.859348 &                         1.140652 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003769 &                         0.960581 &                         1.046956 \\
122.597475  &                                  1.0 &                                          1.0 &                                          1.0 &              0.999291 &                      0.911242 &                      1.087341 &                        1.0 &                                1.0 &                                1.0 &       1.002234 &               0.972265 &               1.032204 &                          1.073893 &                                  0.892687 &                                  1.255099 &                1.0 &                        1.0 &                        1.0 &               1.014743 &                       0.583434 &                       1.446052 &                 1.000000 &                         0.871066 &                         1.128934 &                 1.000000 &                         0.871066 &                         1.128934 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003493 &                         0.961245 &                         1.045741 \\
123.116970  &                                  1.0 &                                          1.0 &                                          1.0 &              0.997980 &                      0.911872 &                      1.084088 &                        1.0 &                                1.0 &                                1.0 &       1.002154 &               0.972846 &               1.031463 &                          1.069850 &                                  0.892640 &                                  1.247061 &                1.0 &                        1.0 &                        1.0 &               1.013561 &                       0.599197 &                       1.427926 &                 1.000000 &                         0.881321 &                         1.118679 &                 1.000000 &                         0.881321 &                         1.118679 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.003218 &                         0.961901 &                         1.044534 \\
123.636465  &                                  1.0 &                                          1.0 &                                          1.0 &              0.996669 &                      0.912486 &                      1.080852 &                        1.0 &                                1.0 &                                1.0 &       1.002074 &               0.973421 &               1.030728 &                          1.065805 &                                  0.892556 &                                  1.239054 &                1.0 &                        1.0 &                        1.0 &               1.010634 &                       0.652562 &                       1.368706 &                 1.000000 &                         0.890240 &                         1.109760 &                 1.000000 &                         0.890240 &                         1.109760 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002942 &                         0.962549 &                         1.043335 \\
124.155960  &                                  1.0 &                                          1.0 &                                          1.0 &              0.995357 &                      0.913081 &                      1.077633 &                        1.0 &                                1.0 &                                1.0 &       1.001994 &               0.973990 &               1.029998 &                          1.061756 &                                  0.892432 &                                  1.231080 &                1.0 &                        1.0 &                        1.0 &               1.006613 &                       0.727735 &                       1.285492 &                 1.000000 &                         0.897980 &                         1.102020 &                 1.000000 &                         0.897980 &                         1.102020 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002667 &                         0.963189 &                         1.042144 \\
124.675455  &                                  1.0 &                                          1.0 &                                          1.0 &              0.994046 &                      0.913658 &                      1.074434 &                        1.0 &                                1.0 &                                1.0 &       1.001914 &               0.974553 &               1.029275 &                          1.057702 &                                  0.892264 &                                  1.223140 &                1.0 &                        1.0 &                        1.0 &               1.002249 &                       0.802481 &                       1.202018 &                 1.000000 &                         0.904744 &                         1.095255 &                 1.000000 &                         0.904744 &                         1.095255 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002391 &                         0.963819 &                         1.040962 \\
125.194949  &                                  1.0 &                                          1.0 &                                          1.0 &              0.992734 &                      0.914214 &                      1.071254 &                        1.0 &                                1.0 &                                1.0 &       1.001834 &               0.975108 &               1.028559 &                          1.053643 &                                  0.892050 &                                  1.215237 &                1.0 &                        1.0 &                        1.0 &               0.998291 &                       0.847358 &                       1.149224 &                 1.000000 &                         0.910776 &                         1.089224 &                 1.000000 &                         0.910776 &                         1.089224 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.002114 &                         0.964439 &                         1.039790 \\
125.714444  &                                  1.0 &                                          1.0 &                                          1.0 &              0.991422 &                      0.914749 &                      1.068095 &                        1.0 &                                1.0 &                                1.0 &       1.001753 &               0.975656 &               1.027850 &                          1.049579 &                                  0.891786 &                                  1.207372 &                1.0 &                        1.0 &                        1.0 &               0.995486 &                       0.847701 &                       1.143271 &                 1.000000 &                         0.916336 &                         1.083663 &                 1.000000 &                         0.916336 &                         1.083663 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001838 &                         0.965049 &                         1.038627 \\
126.233939  &                                  1.0 &                                          1.0 &                                          1.0 &              0.990110 &                      0.915261 &                      1.064959 &                        1.0 &                                1.0 &                                1.0 &       1.001672 &               0.976196 &               1.027148 &                          1.045508 &                                  0.891469 &                                  1.199548 &                1.0 &                        1.0 &                        1.0 &               0.994572 &                       0.839208 &                       1.149937 &                 1.000000 &                         0.921664 &                         1.078335 &                 1.000000 &                         0.921664 &                         1.078335 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001561 &                         0.965647 &                         1.037475 \\
126.753434  &                                  1.0 &                                          1.0 &                                          1.0 &              0.988798 &                      0.915749 &                      1.061847 &                        1.0 &                                1.0 &                                1.0 &       1.001591 &               0.976728 &               1.026455 &                          1.041430 &                                  0.891095 &                                  1.191765 &                1.0 &                        1.0 &                        1.0 &               0.995696 &                       0.852371 &                       1.139021 &                 1.000000 &                         0.926829 &                         1.073170 &                 1.000000 &                         0.926829 &                         1.073170 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001284 &                         0.966233 &                         1.036334 \\
127.272929  &                                  1.0 &                                          1.0 &                                          1.0 &              0.987486 &                      0.916211 &                      1.058761 &                        1.0 &                                1.0 &                                1.0 &       1.001510 &               0.977251 &               1.025770 &                          1.037343 &                                  0.890660 &                                  1.184026 &                1.0 &                        1.0 &                        1.0 &               0.998128 &                       0.880219 &                       1.116038 &                 1.000000 &                         0.931667 &                         1.068333 &                 1.000000 &                         0.931667 &                         1.068333 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.001006 &                         0.966807 &                         1.035205 \\
127.792424  &                                  1.0 &                                          1.0 &                                          1.0 &              0.986174 &                      0.916647 &                      1.055701 &                        1.0 &                                1.0 &                                1.0 &       1.001429 &               0.977764 &               1.025093 &                          1.033245 &                                  0.890158 &                                  1.176333 &                1.0 &                        1.0 &                        1.0 &               1.001075 &                       0.901123 &                       1.101026 &                 1.000000 &                         0.935957 &                         1.064042 &                 1.000000 &                         0.935957 &                         1.064042 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000728 &                         0.967368 &                         1.034089 \\
128.311919  &                                  1.0 &                                          1.0 &                                          1.0 &              0.984863 &                      0.917055 &                      1.052672 &                        1.0 &                                1.0 &                                1.0 &       1.001347 &               0.978267 &               1.024426 &                          1.029136 &                                  0.889587 &                                  1.168686 &                1.0 &                        1.0 &                        1.0 &               1.003738 &                       0.898468 &                       1.109008 &                 1.000000 &                         0.939508 &                         1.060491 &                 1.000000 &                         0.939508 &                         1.060491 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000450 &                         0.967914 &                         1.032985 \\
128.831414  &                                  1.0 &                                          1.0 &                                          1.0 &              0.983553 &                      0.917434 &                      1.049672 &                        1.0 &                                1.0 &                                1.0 &       1.001264 &               0.978759 &               1.023769 &                          1.025014 &                                  0.888940 &                                  1.161088 &                1.0 &                        1.0 &                        1.0 &               1.005321 &                       0.886502 &                       1.124141 &                 1.000000 &                         0.942206 &                         1.057794 &                 1.000000 &                         0.942206 &                         1.057794 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 1.000170 &                         0.968445 &                         1.031896 \\
129.350909  &                                  1.0 &                                          1.0 &                                          1.0 &              0.982244 &                      0.917782 &                      1.046706 &                        1.0 &                                1.0 &                                1.0 &       1.001181 &               0.979241 &               1.023122 &                          1.020877 &                                  0.888215 &                                  1.153539 &                1.0 &                        1.0 &                        1.0 &               1.005069 &                       0.889541 &                       1.120598 &                 1.000000 &                         0.944037 &                         1.055962 &                 1.000000 &                         0.944037 &                         1.055962 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999891 &                         0.968961 &                         1.030821 \\
129.870404  &                                  1.0 &                                          1.0 &                                          1.0 &              0.980937 &                      0.918100 &                      1.043774 &                        1.0 &                                1.0 &                                1.0 &       1.001098 &               0.979710 &               1.022486 &                          1.016723 &                                  0.887404 &                                  1.146042 &                1.0 &                        1.0 &                        1.0 &               1.003038 &                       0.911221 &                       1.094855 &                 1.000000 &                         0.944980 &                         1.055020 &                 1.000000 &                         0.944980 &                         1.055020 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999610 &                         0.969460 &                         1.029761 \\
130.389899  &                                  1.0 &                                          1.0 &                                          1.0 &              0.979632 &                      0.918385 &                      1.040880 &                        1.0 &                                1.0 &                                1.0 &       1.001014 &               0.980167 &               1.021860 &                          1.012551 &                                  0.886504 &                                  1.138598 &                1.0 &                        1.0 &                        1.0 &               1.000037 &                       0.929749 &                       1.070326 &                 1.000000 &                         0.944994 &                         1.055007 &                 1.000000 &                         0.944994 &                         1.055007 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999329 &                         0.969941 &                         1.028717 \\
130.909394  &                                  1.0 &                                          1.0 &                                          1.0 &              0.978331 &                      0.918638 &                      1.038025 &                        1.0 &                                1.0 &                                1.0 &       1.000929 &               0.980611 &               1.021247 &                          1.008358 &                                  0.885508 &                                  1.131207 &                1.0 &                        1.0 &                        1.0 &               0.996904 &                       0.913500 &                       1.080307 &                 1.000001 &                         0.944156 &                         1.055845 &                 1.000001 &                         0.944156 &                         1.055845 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.999047 &                         0.970405 &                         1.027689 \\
131.428889  &                                  1.0 &                                          1.0 &                                          1.0 &              0.977035 &                      0.918857 &                      1.035213 &                        1.0 &                                1.0 &                                1.0 &       1.000844 &               0.981042 &               1.020645 &                          1.004141 &                                  0.884412 &                                  1.123871 &                1.0 &                        1.0 &                        1.0 &               0.994475 &                       0.876705 &                       1.112244 &                 1.000001 &                         0.942681 &                         1.057321 &                 1.000001 &                         0.942681 &                         1.057321 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998764 &                         0.970849 &                         1.026679 \\
131.948384  &                                  1.0 &                                          1.0 &                                          1.0 &              0.975745 &                      0.919044 &                      1.032445 &                        1.0 &                                1.0 &                                1.0 &       1.000757 &               0.981458 &               1.020056 &                          0.999899 &                                  0.883209 &                                  1.116589 &                1.0 &                        1.0 &                        1.0 &               0.993588 &                       0.850027 &                       1.137150 &                 1.000001 &                         0.940883 &                         1.059120 &                 1.000001 &                         0.940883 &                         1.059120 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998481 &                         0.971274 &                         1.025687 \\
132.467879  &                                  1.0 &                                          1.0 &                                          1.0 &              0.974461 &                      0.919197 &                      1.029725 &                        1.0 &                                1.0 &                                1.0 &       1.000669 &               0.981859 &               1.019479 &                          0.995630 &                                  0.881897 &                                  1.109363 &                1.0 &                        1.0 &                        1.0 &               0.994971 &                       0.848290 &                       1.141652 &                 1.000002 &                         0.939085 &                         1.060919 &                 1.000002 &                         0.939085 &                         1.060919 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998196 &                         0.971679 &                         1.024713 \\
132.987374  &                                  1.0 &                                          1.0 &                                          1.0 &              0.973186 &                      0.919317 &                      1.027054 &                        1.0 &                                1.0 &                                1.0 &       1.000581 &               0.982246 &               1.018916 &                          0.991330 &                                  0.880468 &                                  1.102192 &                1.0 &                        1.0 &                        1.0 &               0.998236 &                       0.863291 &                       1.133182 &                 1.000002 &                         0.937424 &                         1.062580 &                 1.000002 &                         0.937424 &                         1.062580 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997910 &                         0.972063 &                         1.023758 \\
133.506869  &                                  1.0 &                                          1.0 &                                          1.0 &              0.971920 &                      0.919405 &                      1.024436 &                        1.0 &                                1.0 &                                1.0 &       1.000491 &               0.982616 &               1.018365 &                          0.986998 &                                  0.878920 &                                  1.095075 &                1.0 &                        1.0 &                        1.0 &               1.002349 &                       0.874102 &                       1.130596 &                 1.000003 &                         0.935939 &                         1.064066 &                 1.000003 &                         0.935939 &                         1.064066 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997624 &                         0.972426 &                         1.022822 \\
134.026364  &                                  1.0 &                                          1.0 &                                          1.0 &              0.970667 &                      0.919460 &                      1.021873 &                        1.0 &                                1.0 &                                1.0 &       1.000399 &               0.982970 &               1.017828 &                          0.982630 &                                  0.877247 &                                  1.088013 &                1.0 &                        1.0 &                        1.0 &               1.006266 &                       0.867563 &                       1.144968 &                 1.000003 &                         0.934705 &                         1.065302 &                 1.000003 &                         0.934705 &                         1.065302 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997337 &                         0.972767 &                         1.021907 \\
134.545859  &                                  1.0 &                                          1.0 &                                          1.0 &              0.969427 &                      0.919486 &                      1.019368 &                        1.0 &                                1.0 &                                1.0 &       1.000306 &               0.983308 &               1.017304 &                          0.978225 &                                  0.875447 &                                  1.081004 &                1.0 &                        1.0 &                        1.0 &               1.008944 &                       0.851602 &                       1.166286 &                 1.000004 &                         0.933851 &                         1.066156 &                 1.000004 &                         0.933851 &                         1.066156 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997048 &                         0.973086 &                         1.021011 \\
135.065354  &                                  1.0 &                                          1.0 &                                          1.0 &              0.968202 &                      0.919482 &                      1.016922 &                        1.0 &                                1.0 &                                1.0 &       1.000211 &               0.983629 &               1.016794 &                          0.973781 &                                  0.873515 &                                  1.074047 &                1.0 &                        1.0 &                        1.0 &               1.009341 &                       0.843313 &                       1.175369 &                 1.000004 &                         0.933549 &                         1.066460 &                 1.000004 &                         0.933549 &                         1.066460 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996759 &                         0.973382 &                         1.020136 \\
135.584848  &                                  1.0 &                                          1.0 &                                          1.0 &              0.966994 &                      0.919451 &                      1.014538 &                        1.0 &                                1.0 &                                1.0 &       1.000115 &               0.983933 &               1.016297 &                          0.969294 &                                  0.871448 &                                  1.067139 &                1.0 &                        1.0 &                        1.0 &               1.006688 &                       0.852461 &                       1.160914 &                 1.000005 &                         0.933930 &                         1.066080 &                 1.000005 &                         0.933930 &                         1.066080 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996469 &                         0.973656 &                         1.019281 \\
136.104343  &                                  1.0 &                                          1.0 &                                          1.0 &              0.965806 &                      0.919394 &                      1.012218 &                        1.0 &                                1.0 &                                1.0 &       1.000016 &               0.984219 &               1.015814 &                          0.964762 &                                  0.869246 &                                  1.060279 &                1.0 &                        1.0 &                        1.0 &               1.001777 &                       0.866580 &                       1.136974 &                 1.000005 &                         0.934873 &                         1.065137 &                 1.000005 &                         0.934873 &                         1.065137 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996178 &                         0.973908 &                         1.018447 \\
136.623838  &                                  1.0 &                                          1.0 &                                          1.0 &              0.964639 &                      0.919315 &                      1.009964 &                        1.0 &                                1.0 &                                1.0 &       0.999916 &               0.984489 &               1.015343 &                          0.960184 &                                  0.866905 &                                  1.053463 &                1.0 &                        1.0 &                        1.0 &               0.995956 &                       0.863766 &                       1.128146 &                 1.000005 &                         0.936177 &                         1.063832 &                 1.000005 &                         0.936177 &                         1.063832 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995886 &                         0.974138 &                         1.017634 \\
137.143333  &                                  1.0 &                                          1.0 &                                          1.0 &              0.963497 &                      0.919215 &                      1.007778 &                        1.0 &                                1.0 &                                1.0 &       0.999813 &               0.984741 &               1.014885 &                          0.955557 &                                  0.864426 &                                  1.046688 &                1.0 &                        1.0 &                        1.0 &               0.990571 &                       0.839924 &                       1.141218 &                 1.000005 &                         0.937696 &                         1.062313 &                 1.000005 &                         0.937696 &                         1.062313 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995593 &                         0.974346 &                         1.016840 \\
137.662828  &                                  1.0 &                                          1.0 &                                          1.0 &              0.962380 &                      0.919099 &                      1.005661 &                        1.0 &                                1.0 &                                1.0 &       0.999708 &               0.984977 &               1.014440 &                          0.950879 &                                  0.861807 &                                  1.039951 &                1.0 &                        1.0 &                        1.0 &               0.986970 &                       0.816662 &                       1.157277 &                 1.000004 &                         0.939364 &                         1.060644 &                 1.000004 &                         0.939364 &                         1.060644 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995299 &                         0.974532 &                         1.016066 \\
138.182323  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961292 &                      0.918970 &                      1.003614 &                        1.0 &                                1.0 &                                1.0 &       0.999601 &               0.985196 &               1.014006 &                          0.946148 &                                  0.859049 &                                  1.033247 &                1.0 &                        1.0 &                        1.0 &               0.986499 &                       0.818382 &                       1.154615 &                 1.000003 &                         0.941194 &                         1.058812 &                 1.000003 &                         0.941194 &                         1.058812 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995005 &                         0.974698 &                         1.015312 \\
138.701818  &                                  1.0 &                                          1.0 &                                          1.0 &              0.960235 &                      0.918831 &                      1.001639 &                        1.0 &                                1.0 &                                1.0 &       0.999491 &               0.985398 &               1.013583 &                          0.941362 &                                  0.856152 &                                  1.026571 &                1.0 &                        1.0 &                        1.0 &               0.989925 &                       0.856881 &                       1.122969 &                 1.000001 &                         0.943183 &                         1.056819 &                 1.000001 &                         0.943183 &                         1.056819 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994710 &                         0.974843 &                         1.014576 \\
139.221313  &                                  1.0 &                                          1.0 &                                          1.0 &              0.959213 &                      0.918687 &                      0.999738 &                        1.0 &                                1.0 &                                1.0 &       0.999378 &               0.985585 &               1.013171 &                          0.936518 &                                  0.853117 &                                  1.019919 &                1.0 &                        1.0 &                        1.0 &               0.996067 &                       0.912042 &                       1.080091 &                 0.999999 &                         0.945135 &                         1.054862 &                 0.999999 &                         0.945135 &                         1.054862 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994415 &                         0.974970 &                         1.013859 \\
139.740808  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958228 &                      0.918544 &                      0.997912 &                        1.0 &                                1.0 &                                1.0 &       0.999262 &               0.985755 &               1.012770 &                          0.931614 &                                  0.849944 &                                  1.013284 &                1.0 &                        1.0 &                        1.0 &               1.003335 &                       0.925859 &                       1.080811 &                 0.999996 &                         0.946836 &                         1.053156 &                 0.999996 &                         0.946836 &                         1.053156 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994119 &                         0.975078 &                         1.013160 \\
140.260303  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957286 &                      0.918407 &                      0.996165 &                        1.0 &                                1.0 &                                1.0 &       0.999144 &               0.985911 &               1.012377 &                          0.926647 &                                  0.846633 &                                  1.006660 &                1.0 &                        1.0 &                        1.0 &               1.010140 &                       0.883208 &                       1.137071 &                 0.999993 &                         0.948163 &                         1.051823 &                 0.999993 &                         0.948163 &                         1.051823 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993823 &                         0.975168 &                         1.012478 \\
140.779798  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956389 &                      0.918280 &                      0.994497 &                        1.0 &                                1.0 &                                1.0 &       0.999022 &               0.986051 &               1.011993 &                          0.921615 &                                  0.843187 &                                  1.000043 &                1.0 &                        1.0 &                        1.0 &               1.014892 &                       0.842643 &                       1.187140 &                 0.999989 &                         0.949129 &                         1.050848 &                 0.999989 &                         0.949129 &                         1.050848 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993528 &                         0.975243 &                         1.011813 \\
141.299293  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955541 &                      0.918171 &                      0.992911 &                        1.0 &                                1.0 &                                1.0 &       0.998898 &               0.986178 &               1.011617 &                          0.916515 &                                  0.839607 &                                  0.993424 &                1.0 &                        1.0 &                        1.0 &               1.016008 &                       0.831503 &                       1.200514 &                 0.999984 &                         0.949876 &                         1.050092 &                 0.999984 &                         0.949876 &                         1.050092 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993233 &                         0.975302 &                         1.011165 \\
141.818788  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954746 &                      0.918083 &                      0.991408 &                        1.0 &                                1.0 &                                1.0 &       0.998770 &               0.986291 &               1.011248 &                          0.911346 &                                  0.835894 &                                  0.986798 &                1.0 &                        1.0 &                        1.0 &               1.012877 &                       0.856834 &                       1.168920 &                 0.999979 &                         0.950530 &                         1.049429 &                 0.999979 &                         0.950530 &                         1.049429 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992940 &                         0.975348 &                         1.010531 \\
142.338283  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954007 &                      0.918023 &                      0.989991 &                        1.0 &                                1.0 &                                1.0 &       0.998638 &               0.986391 &               1.010886 &                          0.906106 &                                  0.832052 &                                  0.980160 &                1.0 &                        1.0 &                        1.0 &               1.006845 &                       0.901679 &                       1.112010 &                 0.999974 &                         0.951056 &                         1.048892 &                 0.999974 &                         0.951056 &                         1.048892 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992647 &                         0.975382 &                         1.009913 \\
142.857778  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953328 &                      0.917996 &                      0.988659 &                        1.0 &                                1.0 &                                1.0 &       0.998504 &               0.986478 &               1.010530 &                          0.900794 &                                  0.828082 &                                  0.973507 &                1.0 &                        1.0 &                        1.0 &               0.999497 &                       0.925810 &                       1.073185 &                 0.999971 &                         0.951439 &                         1.048502 &                 0.999971 &                         0.951439 &                         1.048502 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992357 &                         0.975404 &                         1.009310 \\
143.377273  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952712 &                      0.918007 &                      0.987417 &                        1.0 &                                1.0 &                                1.0 &       0.998366 &               0.986553 &               1.010178 &                          0.895410 &                                  0.823987 &                                  0.966833 &                1.0 &                        1.0 &                        1.0 &               0.992419 &                       0.886071 &                       1.098767 &                 0.999969 &                         0.951739 &                         1.048198 &                 0.999969 &                         0.951739 &                         1.048198 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992069 &                         0.975417 &                         1.008721 \\
143.896768  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952162 &                      0.918060 &                      0.986265 &                        1.0 &                                1.0 &                                1.0 &       0.998224 &               0.986617 &               1.009832 &                          0.889952 &                                  0.819770 &                                  0.960135 &                1.0 &                        1.0 &                        1.0 &               0.987194 &                       0.835178 &                       1.139211 &                 0.999969 &                         0.952102 &                         1.047836 &                 0.999969 &                         0.952102 &                         1.047836 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991784 &                         0.975421 &                         1.008147 \\
144.416263  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951683 &                      0.918162 &                      0.985205 &                        1.0 &                                1.0 &                                1.0 &       0.998079 &               0.986670 &               1.009489 &                          0.884421 &                                  0.815433 &                                  0.953408 &                1.0 &                        1.0 &                        1.0 &               0.985374 &                       0.814370 &                       1.156377 &                 0.999972 &                         0.952712 &                         1.047232 &                 0.999972 &                         0.952712 &                         1.047232 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991503 &                         0.975419 &                         1.007588 \\
144.935758  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951276 &                      0.918314 &                      0.984237 &                        1.0 &                                1.0 &                                1.0 &       0.997931 &               0.986712 &               1.009150 &                          0.878814 &                                  0.810979 &                                  0.946649 &                1.0 &                        1.0 &                        1.0 &               0.987255 &                       0.832154 &                       1.142356 &                 0.999979 &                         0.953592 &                         1.046367 &                 0.999979 &                         0.953592 &                         1.046367 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991227 &                         0.975411 &                         1.007042 \\
145.455253  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950941 &                      0.918519 &                      0.983362 &                        1.0 &                                1.0 &                                1.0 &       0.997779 &               0.986743 &               1.008814 &                          0.873131 &                                  0.806408 &                                  0.939855 &                1.0 &                        1.0 &                        1.0 &               0.991560 &                       0.875404 &                       1.107716 &                 0.999991 &                         0.954564 &                         1.045419 &                 0.999991 &                         0.954564 &                         1.045419 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990955 &                         0.975399 &                         1.006512 \\
145.974747  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950678 &                      0.918777 &                      0.982578 &                        1.0 &                                1.0 &                                1.0 &       0.997623 &               0.986765 &               1.008481 &                          0.867373 &                                  0.801722 &                                  0.933024 &                1.0 &                        1.0 &                        1.0 &               0.996910 &                       0.923921 &                       1.069898 &                 1.000008 &                         0.955498 &                         1.044519 &                 1.000008 &                         0.955498 &                         1.044519 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990691 &                         0.975384 &                         1.005997 \\
146.494242  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950487 &                      0.919089 &                      0.981884 &                        1.0 &                                1.0 &                                1.0 &       0.997464 &               0.986777 &               1.008151 &                          0.861539 &                                  0.796922 &                                  0.926155 &                1.0 &                        1.0 &                        1.0 &               1.001925 &                       0.940560 &                       1.063290 &                 1.000032 &                         0.956383 &                         1.043680 &                 1.000032 &                         0.956383 &                         1.043680 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990433 &                         0.975368 &                         1.005499 \\
147.013737  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950367 &                      0.919454 &                      0.981280 &                        1.0 &                                1.0 &                                1.0 &       0.997302 &               0.986780 &               1.007824 &                          0.855628 &                                  0.792009 &                                  0.919247 &                1.0 &                        1.0 &                        1.0 &               1.005227 &                       0.918679 &                       1.091775 &                 1.000062 &                         0.957326 &                         1.042799 &                 1.000062 &                         0.957326 &                         1.042799 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990185 &                         0.975352 &                         1.005017 \\
147.533232  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950320 &                      0.919874 &                      0.980766 &                        1.0 &                                1.0 &                                1.0 &       0.997136 &               0.986773 &               1.007499 &                          0.849640 &                                  0.786982 &                                  0.912298 &                1.0 &                        1.0 &                        1.0 &               1.005539 &                       0.900519 &                       1.110559 &                 1.000100 &                         0.958474 &                         1.041726 &                 1.000100 &                         0.958474 &                         1.041726 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989945 &                         0.975337 &                         1.004554 \\
148.052727  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950343 &                      0.920345 &                      0.980340 &                        1.0 &                                1.0 &                                1.0 &       0.996967 &               0.986757 &               1.007178 &                          0.843574 &                                  0.781839 &                                  0.905310 &                1.0 &                        1.0 &                        1.0 &               1.003183 &                       0.899147 &                       1.107219 &                 1.000142 &                         0.959731 &                         1.040554 &                 1.000142 &                         0.959731 &                         1.040554 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989717 &                         0.975324 &                         1.004111 \\
148.572222  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950431 &                      0.920863 &                      0.980000 &                        1.0 &                                1.0 &                                1.0 &       0.996796 &               0.986731 &               1.006860 &                          0.837429 &                                  0.776577 &                                  0.898281 &                1.0 &                        1.0 &                        1.0 &               0.999754 &                       0.910877 &                       1.088631 &                 1.000182 &                         0.960837 &                         1.039528 &                 1.000182 &                         0.960837 &                         1.039528 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989502 &                         0.975314 &                         1.003689 \\
149.091717  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950583 &                      0.921422 &                      0.979743 &                        1.0 &                                1.0 &                                1.0 &       0.996621 &               0.986696 &               1.006547 &                          0.831203 &                                  0.771191 &                                  0.891215 &                1.0 &                        1.0 &                        1.0 &               0.996879 &                       0.928986 &                       1.064772 &                 1.000214 &                         0.961682 &                         1.038746 &                 1.000214 &                         0.961682 &                         1.038746 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989301 &                         0.975309 &                         1.003292 \\
149.611212  &                                  1.0 &                                          1.0 &                                          1.0 &              0.950793 &                      0.922019 &                      0.979567 &                        1.0 &                                1.0 &                                1.0 &       0.996445 &               0.986651 &               1.006238 &                          0.824895 &                                  0.765677 &                                  0.884112 &                1.0 &                        1.0 &                        1.0 &               0.996187 &                       0.944533 &                       1.047841 &                 1.000231 &                         0.962385 &                         1.038078 &                 1.000231 &                         0.962385 &                         1.038078 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989116 &                         0.975310 &                         1.002922 \\
150.130707  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951059 &                      0.922646 &                      0.979471 &                        1.0 &                                1.0 &                                1.0 &       0.996266 &               0.986595 &               1.005937 &                          0.818503 &                                  0.760030 &                                  0.876975 &                1.0 &                        1.0 &                        1.0 &               0.999306 &                       0.950445 &                       1.048167 &                 1.000228 &                         0.963262 &                         1.037194 &                 1.000228 &                         0.963262 &                         1.037194 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988949 &                         0.975316 &                         1.002582 \\
150.650202  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951376 &                      0.923299 &                      0.979453 &                        1.0 &                                1.0 &                                1.0 &       0.996085 &               0.986529 &               1.005642 &                          0.812026 &                                  0.754244 &                                  0.869809 &                1.0 &                        1.0 &                        1.0 &               1.007487 &                       0.951680 &                       1.063295 &                 1.000197 &                         0.964636 &                         1.035757 &                 1.000197 &                         0.964636 &                         1.035757 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988802 &                         0.975330 &                         1.002274 \\
151.169697  &                                  1.0 &                                          1.0 &                                          1.0 &              0.951743 &                      0.923971 &                      0.979515 &                        1.0 &                                1.0 &                                1.0 &       0.995904 &               0.986451 &               1.005356 &                          0.805473 &                                  0.748319 &                                  0.862627 &                1.0 &                        1.0 &                        1.0 &               1.018849 &                       0.951396 &                       1.086302 &                 1.000133 &                         0.966342 &                         1.033924 &                 1.000133 &                         0.966342 &                         1.033924 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988678 &                         0.975352 &                         1.002003 \\
151.689192  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952155 &                      0.924655 &                      0.979656 &                        1.0 &                                1.0 &                                1.0 &       0.995721 &               0.986361 &               1.005081 &                          0.798854 &                                  0.742258 &                                  0.855449 &                1.0 &                        1.0 &                        1.0 &               1.029961 &                       0.949443 &                       1.110479 &                 1.000032 &                         0.967916 &                         1.032148 &                 1.000032 &                         0.967916 &                         1.032148 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988577 &                         0.975382 &                         1.001772 \\
152.208687  &                                  1.0 &                                          1.0 &                                          1.0 &              0.952612 &                      0.925345 &                      0.979878 &                        1.0 &                                1.0 &                                1.0 &       0.995539 &               0.986258 &               1.004820 &                          0.792179 &                                  0.736065 &                                  0.848293 &                1.0 &                        1.0 &                        1.0 &               1.037382 &                       0.948191 &                       1.126574 &                 0.999889 &                         0.968992 &                         1.030785 &                 0.999889 &                         0.968992 &                         1.030785 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988503 &                         0.975420 &                         1.001586 \\
152.728182  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953109 &                      0.926034 &                      0.980183 &                        1.0 &                                1.0 &                                1.0 &       0.995358 &               0.986142 &               1.004573 &                          0.785460 &                                  0.729741 &                                  0.841179 &                1.0 &                        1.0 &                        1.0 &               1.037670 &                       0.951157 &                       1.124183 &                 0.999698 &                         0.969497 &                         1.029899 &                 0.999698 &                         0.969497 &                         1.029899 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988459 &                         0.975468 &                         1.001450 \\
153.247677  &                                  1.0 &                                          1.0 &                                          1.0 &              0.953644 &                      0.926715 &                      0.980574 &                        1.0 &                                1.0 &                                1.0 &       0.995178 &               0.986012 &               1.004344 &                          0.778708 &                                  0.723287 &                                  0.834129 &                1.0 &                        1.0 &                        1.0 &               1.027385 &                       0.961201 &                       1.093568 &                 0.999456 &                         0.969709 &                         1.029203 &                 0.999456 &                         0.969709 &                         1.029203 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988446 &                         0.975525 &                         1.001367 \\
153.767172  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954215 &                      0.927379 &                      0.981051 &                        1.0 &                                1.0 &                                1.0 &       0.995000 &               0.985866 &               1.004134 &                          0.771934 &                                  0.716706 &                                  0.827163 &                1.0 &                        1.0 &                        1.0 &               1.004466 &                       0.969850 &                       1.039082 &                 0.999172 &                         0.970054 &                         1.028291 &                 0.999172 &                         0.970054 &                         1.028291 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988467 &                         0.975590 &                         1.001343 \\
154.286667  &                                  1.0 &                                          1.0 &                                          1.0 &              0.954823 &                      0.928023 &                      0.981623 &                        1.0 &                                1.0 &                                1.0 &       0.994826 &               0.985705 &               1.003948 &                          0.765158 &                                  0.710003 &                                  0.820312 &                1.0 &                        1.0 &                        1.0 &               0.973449 &                       0.911102 &                       1.035797 &                 0.998932 &                         0.970644 &                         1.027220 &                 0.998932 &                         0.970644 &                         1.027220 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988520 &                         0.975661 &                         1.001379 \\
154.806162  &                                  1.0 &                                          1.0 &                                          1.0 &              0.955470 &                      0.928643 &                      0.982297 &                        1.0 &                                1.0 &                                1.0 &       0.994658 &               0.985527 &               1.003789 &                          0.758398 &                                  0.703189 &                                  0.813608 &                1.0 &                        1.0 &                        1.0 &               0.940837 &                       0.817429 &                       1.064244 &                 0.998843 &                         0.971374 &                         1.026311 &                 0.998843 &                         0.971374 &                         1.026311 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988605 &                         0.975733 &                         1.001477 \\
155.325657  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956156 &                      0.929234 &                      0.983078 &                        1.0 &                                1.0 &                                1.0 &       0.994496 &               0.985332 &               1.003659 &                          0.751675 &                                  0.696270 &                                  0.807080 &                1.0 &                        1.0 &                        1.0 &               0.913131 &                       0.735174 &                       1.091088 &                 0.999011 &                         0.972130 &                         1.025892 &                 0.999011 &                         0.972130 &                         1.025892 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988720 &                         0.975803 &                         1.001638 \\
155.845152  &                                  1.0 &                                          1.0 &                                          1.0 &              0.956884 &                      0.929794 &                      0.983975 &                        1.0 &                                1.0 &                                1.0 &       0.994342 &               0.985121 &               1.003563 &                          0.745009 &                                  0.689257 &                                  0.800761 &                1.0 &                        1.0 &                        1.0 &               0.896834 &                       0.686605 &                       1.107062 &                 0.999544 &                         0.972913 &                         1.026175 &                 0.999544 &                         0.972913 &                         1.026175 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.988865 &                         0.975866 &                         1.001863 \\
156.364646  &                                  1.0 &                                          1.0 &                                          1.0 &              0.957655 &                      0.930318 &                      0.984992 &                        1.0 &                                1.0 &                                1.0 &       0.994198 &               0.984894 &               1.003503 &                          0.738419 &                                  0.682160 &                                  0.794679 &                1.0 &                        1.0 &                        1.0 &               0.898443 &                       0.691787 &                       1.105099 &                 1.000549 &                         0.973891 &                         1.027207 &                 1.000549 &                         0.973891 &                         1.027207 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989037 &                         0.975920 &                         1.002153 \\
156.884141  &                                  1.0 &                                          1.0 &                                          1.0 &              0.958471 &                      0.930805 &                      0.986136 &                        1.0 &                                1.0 &                                1.0 &       0.994065 &               0.984649 &               1.003482 &                          0.731923 &                                  0.674988 &                                  0.788858 &                1.0 &                        1.0 &                        1.0 &               0.921233 &                       0.760259 &                       1.082206 &                 1.002002 &                         0.975150 &                         1.028853 &                 1.002002 &                         0.975150 &                         1.028853 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989235 &                         0.975960 &                         1.002509 \\
157.403636  &                                  1.0 &                                          1.0 &                                          1.0 &              0.959330 &                      0.931251 &                      0.987409 &                        1.0 &                                1.0 &                                1.0 &       0.993944 &               0.984387 &               1.003501 &                          0.725526 &                                  0.667739 &                                  0.783313 &                1.0 &                        1.0 &                        1.0 &               0.959374 &                       0.872201 &                       1.046547 &                 1.003507 &                         0.976247 &                         1.030768 &                 1.003507 &                         0.976247 &                         1.030768 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989457 &                         0.975984 &                         1.002930 \\
157.923131  &                                  1.0 &                                          1.0 &                                          1.0 &              0.960233 &                      0.931651 &                      0.988815 &                        1.0 &                                1.0 &                                1.0 &       0.993834 &               0.984106 &               1.003563 &                          0.719235 &                                  0.660414 &                                  0.778056 &                1.0 &                        1.0 &                        1.0 &               1.005444 &                       0.973551 &                       1.037337 &                 1.004607 &                         0.976652 &                         1.032563 &                 1.004607 &                         0.976652 &                         1.032563 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989699 &                         0.975985 &                         1.003413 \\
158.442626  &                                  1.0 &                                          1.0 &                                          1.0 &              0.961180 &                      0.932005 &                      0.990354 &                        1.0 &                                1.0 &                                1.0 &       0.993737 &               0.983807 &               1.003667 &                          0.713054 &                                  0.653013 &                                  0.773095 &                1.0 &                        1.0 &                        1.0 &               1.052020 &                       0.949829 &                       1.154210 &                 1.004842 &                         0.975888 &                         1.033796 &                 1.004842 &                         0.975888 &                         1.033796 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.989960 &                         0.975962 &                         1.003959 \\
158.962121  &                                  1.0 &                                          1.0 &                                          1.0 &              0.962169 &                      0.932310 &                      0.992027 &                        1.0 &                                1.0 &                                1.0 &       0.993653 &               0.983490 &               1.003816 &                          0.706989 &                                  0.645540 &                                  0.768438 &                1.0 &                        1.0 &                        1.0 &               1.091678 &                       0.920655 &                       1.262701 &                 1.003752 &                         0.973525 &                         1.033979 &                 1.003752 &                         0.973525 &                         1.033979 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990237 &                         0.975910 &                         1.004563 \\
159.481616  &                                  1.0 &                                          1.0 &                                          1.0 &              0.963200 &                      0.932567 &                      0.993834 &                        1.0 &                                1.0 &                                1.0 &       0.993581 &               0.983155 &               1.004008 &                          0.701045 &                                  0.638001 &                                  0.764090 &                1.0 &                        1.0 &                        1.0 &               1.117034 &                       0.909300 &                       1.324769 &                 1.000880 &                         0.969141 &                         1.032619 &                 1.000880 &                         0.969141 &                         1.032619 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990526 &                         0.975827 &                         1.005225 \\
160.001111  &                                  1.0 &                                          1.0 &                                          1.0 &              0.964273 &                      0.932773 &                      0.995773 &                        1.0 &                                1.0 &                                1.0 &       0.993523 &               0.982802 &               1.004244 &                          0.695221 &                                  0.630395 &                                  0.760048 &                1.0 &                        1.0 &                        1.0 &               1.123848 &                       0.918386 &                       1.329310 &                 0.995860 &                         0.962305 &                         1.029415 &                 0.995860 &                         0.962305 &                         1.029415 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.990826 &                         0.975712 &                         1.005940 \\
160.520606  &                                  1.0 &                                          1.0 &                                          1.0 &              0.965382 &                      0.932927 &                      0.997837 &                        1.0 &                                1.0 &                                1.0 &       0.993476 &               0.982430 &               1.004523 &                          0.689505 &                                  0.622713 &                                  0.756298 &                1.0 &                        1.0 &                        1.0 &               1.113289 &                       0.938546 &                       1.288033 &                 0.988484 &                         0.952732 &                         1.024237 &                 0.988484 &                         0.952732 &                         1.024237 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991135 &                         0.975563 &                         1.006708 \\
161.040101  &                                  1.0 &                                          1.0 &                                          1.0 &              0.966525 &                      0.933028 &                      1.000022 &                        1.0 &                                1.0 &                                1.0 &       0.993441 &               0.982039 &               1.004842 &                          0.683885 &                                  0.614948 &                                  0.752822 &                1.0 &                        1.0 &                        1.0 &               1.087066 &                       0.958621 &                       1.215511 &                 0.978561 &                         0.940366 &                         1.016756 &                 0.978561 &                         0.940366 &                         1.016756 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991453 &                         0.975381 &                         1.007526 \\
161.559596  &                                  1.0 &                                          1.0 &                                          1.0 &              0.967696 &                      0.933073 &                      1.002320 &                        1.0 &                                1.0 &                                1.0 &       0.993415 &               0.981630 &               1.005199 &                          0.678348 &                                  0.607092 &                                  0.749603 &                1.0 &                        1.0 &                        1.0 &               1.046884 &                       0.965312 &                       1.128456 &                 0.965900 &                         0.925331 &                         1.006468 &                 0.965900 &                         0.925331 &                         1.006468 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.991779 &                         0.975166 &                         1.008392 \\
162.079091  &                                  1.0 &                                          1.0 &                                          1.0 &              0.968892 &                      0.933061 &                      1.004723 &                        1.0 &                                1.0 &                                1.0 &       0.993397 &               0.981202 &               1.005593 &                          0.672880 &                                  0.599140 &                                  0.746620 &                1.0 &                        1.0 &                        1.0 &               0.994449 &                       0.938614 &                       1.050283 &                 0.950308 &                         0.907819 &                         0.992796 &                 0.950308 &                         0.907819 &                         0.992796 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992110 &                         0.974918 &                         1.009302 \\
162.598586  &                                  1.0 &                                          1.0 &                                          1.0 &              0.970110 &                      0.932994 &                      1.007225 &                        1.0 &                                1.0 &                                1.0 &       0.993388 &               0.980755 &               1.006021 &                          0.667469 &                                  0.591085 &                                  0.743853 &                1.0 &                        1.0 &                        1.0 &               0.931575 &                       0.868810 &                       0.994339 &                 0.931623 &                         0.887990 &                         0.975257 &                 0.931623 &                         0.887990 &                         0.975257 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992446 &                         0.974638 &                         1.010255 \\
163.118081  &                                  1.0 &                                          1.0 &                                          1.0 &              0.971345 &                      0.932872 &                      1.009819 &                        1.0 &                                1.0 &                                1.0 &       0.993385 &               0.980290 &               1.006480 &                          0.662105 &                                  0.582927 &                                  0.741283 &                1.0 &                        1.0 &                        1.0 &               0.862902 &                       0.781445 &                       0.944359 &                 0.910475 &                         0.866382 &                         0.954567 &                 0.910475 &                         0.866382 &                         0.954567 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.992787 &                         0.974327 &                         1.011248 \\
163.637576  &                                  1.0 &                                          1.0 &                                          1.0 &              0.972596 &                      0.932696 &                      1.012496 &                        1.0 &                                1.0 &                                1.0 &       0.993387 &               0.979807 &               1.006968 &                          0.656777 &                                  0.574663 &                                  0.738892 &                1.0 &                        1.0 &                        1.0 &               0.796123 &                       0.693075 &                       0.899170 &                 0.888341 &                         0.844036 &                         0.932646 &                 0.888341 &                         0.844036 &                         0.932646 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993132 &                         0.973987 &                         1.012277 \\
164.157071  &                                  1.0 &                                          1.0 &                                          1.0 &              0.973860 &                      0.932469 &                      1.015252 &                        1.0 &                                1.0 &                                1.0 &       0.993395 &               0.979307 &               1.007484 &                          0.651477 &                                  0.566293 &                                  0.736661 &                1.0 &                        1.0 &                        1.0 &               0.739082 &                       0.615568 &                       0.862597 &                 0.866746 &                         0.822090 &                         0.911402 &                 0.866746 &                         0.822090 &                         0.911402 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993479 &                         0.973619 &                         1.013340 \\
164.676566  &                                  1.0 &                                          1.0 &                                          1.0 &              0.975136 &                      0.932193 &                      1.018080 &                        1.0 &                                1.0 &                                1.0 &       0.993408 &               0.978791 &               1.008024 &                          0.646195 &                                  0.557818 &                                  0.734573 &                1.0 &                        1.0 &                        1.0 &               0.699625 &                       0.563166 &                       0.836084 &                 0.847210 &                         0.801859 &                         0.892561 &                 0.847210 &                         0.801859 &                         0.892561 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.993829 &                         0.973224 &                         1.014435 \\
165.196061  &                                  1.0 &                                          1.0 &                                          1.0 &              0.976421 &                      0.931870 &                      1.020972 &                        1.0 &                                1.0 &                                1.0 &       0.993424 &               0.978260 &               1.008588 &                          0.640922 &                                  0.549236 &                                  0.732608 &                1.0 &                        1.0 &                        1.0 &               0.685596 &                       0.551565 &                       0.819627 &                 0.831256 &                         0.784876 &                         0.877636 &                 0.831256 &                         0.784876 &                         0.877636 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994182 &                         0.972805 &                         1.015558 \\
165.715556  &                                  1.0 &                                          1.0 &                                          1.0 &              0.977712 &                      0.931502 &                      1.023923 &                        1.0 &                                1.0 &                                1.0 &       0.993443 &               0.977714 &               1.009171 &                          0.635649 &                                  0.540547 &                                  0.730750 &                1.0 &                        1.0 &                        1.0 &               0.703482 &                       0.593712 &                       0.813253 &                 0.820323 &                         0.772737 &                         0.867908 &                 0.820323 &                         0.772737 &                         0.867908 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994536 &                         0.972363 &                         1.016708 \\
166.235051  &                                  1.0 &                                          1.0 &                                          1.0 &              0.979009 &                      0.931092 &                      1.026926 &                        1.0 &                                1.0 &                                1.0 &       0.993465 &               0.977155 &               1.009774 &                          0.630370 &                                  0.531757 &                                  0.728984 &                1.0 &                        1.0 &                        1.0 &               0.742807 &                       0.669968 &                       0.815645 &                 0.814792 &                         0.765878 &                         0.863707 &                 0.814792 &                         0.765878 &                         0.863707 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.994891 &                         0.971899 &                         1.017883 \\
166.754545  &                                  1.0 &                                          1.0 &                                          1.0 &              0.980311 &                      0.930644 &                      1.029978 &                        1.0 &                                1.0 &                                1.0 &       0.993488 &               0.976583 &               1.010393 &                          0.625084 &                                  0.522869 &                                  0.727300 &                1.0 &                        1.0 &                        1.0 &               0.781562 &                       0.720220 &                       0.842905 &                 0.814330 &                         0.763852 &                         0.864808 &                 0.814330 &                         0.763852 &                         0.864808 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995247 &                         0.971416 &                         1.019079 \\
167.274040  &                                  1.0 &                                          1.0 &                                          1.0 &              0.981616 &                      0.930159 &                      1.033074 &                        1.0 &                                1.0 &                                1.0 &       0.993514 &               0.975999 &               1.011028 &                          0.619789 &                                  0.513890 &                                  0.725689 &                1.0 &                        1.0 &                        1.0 &               0.797521 &                       0.699861 &                       0.895180 &                 0.818589 &                         0.766126 &                         0.871052 &                 0.818589 &                         0.766126 &                         0.871052 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995604 &                         0.970914 &                         1.020295 \\
167.793535  &                                  1.0 &                                          1.0 &                                          1.0 &              0.982925 &                      0.929640 &                      1.036209 &                        1.0 &                                1.0 &                                1.0 &       0.993541 &               0.975404 &               1.011677 &                          0.614483 &                                  0.504824 &                                  0.724142 &                1.0 &                        1.0 &                        1.0 &               0.768454 &                       0.627558 &                       0.909350 &                 0.827220 &                         0.772098 &                         0.882341 &                 0.827220 &                         0.772098 &                         0.882341 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.995962 &                         0.970395 &                         1.021529 \\
168.313030  &                                  1.0 &                                          1.0 &                                          1.0 &              0.984235 &                      0.929090 &                      1.039379 &                        1.0 &                                1.0 &                                1.0 &       0.993569 &               0.974799 &               1.012338 &                          0.609163 &                                  0.495676 &                                  0.722650 &                1.0 &                        1.0 &                        1.0 &               0.672135 &                       0.501702 &                       0.842568 &                 0.839875 &                         0.781113 &                         0.898637 &                 0.839875 &                         0.781113 &                         0.898637 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996320 &                         0.969861 &                         1.022779 \\
168.832525  &                                  1.0 &                                          1.0 &                                          1.0 &              0.985546 &                      0.928512 &                      1.042580 &                        1.0 &                                1.0 &                                1.0 &       0.993597 &               0.974185 &               1.013010 &                          0.603827 &                                  0.486451 &                                  0.721203 &                1.0 &                        1.0 &                        1.0 &               0.496322 &                       0.312450 &                       0.680195 &                 0.856188 &                         0.792433 &                         0.919943 &                 0.856188 &                         0.792433 &                         0.919943 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.996678 &                         0.969312 &                         1.024045 \\
169.352020  &                                  1.0 &                                          1.0 &                                          1.0 &              0.986858 &                      0.927908 &                      1.045809 &                        1.0 &                                1.0 &                                1.0 &       0.993627 &               0.973562 &               1.013692 &                          0.598477 &                                  0.477157 &                                  0.719798 &                1.0 &                        1.0 &                        1.0 &               0.297260 &                       0.103327 &                       0.491192 &                 0.875662 &                         0.805144 &                         0.946180 &                 0.875662 &                         0.805144 &                         0.946180 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997037 &                         0.968751 &                         1.025323 \\
169.871515  &                                  1.0 &                                          1.0 &                                          1.0 &              0.988171 &                      0.927279 &                      1.049064 &                        1.0 &                                1.0 &                                1.0 &       0.993657 &               0.972931 &               1.014382 &                          0.593115 &                                  0.467799 &                                  0.718432 &                1.0 &                        1.0 &                        1.0 &               0.159916 &                      -0.042791 &                       0.362622 &                 0.897747 &                         0.818465 &                         0.977028 &                 0.897747 &                         0.818465 &                         0.977028 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997396 &                         0.968178 &                         1.026613 \\
170.391010  &                                  1.0 &                                          1.0 &                                          1.0 &              0.989485 &                      0.926629 &                      1.052341 &                        1.0 &                                1.0 &                                1.0 &       0.993687 &               0.972293 &               1.015081 &                          0.587743 &                                  0.458385 &                                  0.717101 &                1.0 &                        1.0 &                        1.0 &               0.169358 &                      -0.026181 &                       0.364897 &                 0.921891 &                         0.831877 &                         1.011906 &                 0.921891 &                         0.831877 &                         1.011906 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.997755 &                         0.967595 &                         1.027914 \\
170.910505  &                                  1.0 &                                          1.0 &                                          1.0 &              0.990799 &                      0.925958 &                      1.055639 &                        1.0 &                                1.0 &                                1.0 &       0.993717 &               0.971648 &               1.015787 &                          0.582363 &                                  0.448921 &                                  0.715805 &                1.0 &                        1.0 &                        1.0 &               0.410653 &                       0.252901 &                       0.568404 &                 0.947545 &                         0.845054 &                         1.050037 &                 0.947545 &                         0.845054 &                         1.050037 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998113 &                         0.967002 &                         1.029225 \\
171.430000  &                                  1.0 &                                          1.0 &                                          1.0 &              0.992113 &                      0.925270 &                      1.058956 &                        1.0 &                                1.0 &                                1.0 &       0.993748 &               0.970997 &               1.016499 &                          0.576978 &                                  0.439414 &                                  0.714541 &                1.0 &                        1.0 &                        1.0 &               0.968867 &                       0.834032 &                       1.103702 &                 0.974158 &                         0.857774 &                         1.090542 &                 0.974158 &                         0.857774 &                         1.090542 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                 0.998472 &                         0.966400 &                         1.030545 \\
\bottomrule
\end{tabular}
