\begin{tabular}{lrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  davies2009/mirex\_qm\_tempotracker &  percival2014/stem &  schreiber2014/default &  schreiber2017/ismir2017 &  schreiber2017/mirex2017 &  schreiber2018/cnn &  schreiber2018/fcn \\
Tolerance (\%) &                                      &                                   &                    &                        &                          &                          &                    &                    \\
\midrule
0.000         &                             0.072984 &                          0.000000 &           0.000000 &               0.000000 &                 0.000000 &                 0.000000 &           0.732466 &           0.589563 \\
0.001         &                             0.210322 &                          0.000000 &           0.191023 &               0.215257 &                 0.243995 &                 0.243995 &           0.732466 &           0.589563 \\
0.002         &                             0.273802 &                          0.039216 &           0.357354 &               0.311864 &                 0.364378 &                 0.364378 &           0.732466 &           0.589563 \\
0.003         &                             0.319174 &                          0.039216 &           0.393240 &               0.389315 &                 0.493530 &                 0.507112 &           0.732466 &           0.589563 \\
0.004         &                             0.375012 &                          0.115337 &           0.522660 &               0.428011 &                 0.548741 &                 0.562323 &           0.732466 &           0.589563 \\
0.005         &                             0.389534 &                          0.134035 &           0.591750 &               0.479219 &                 0.637718 &                 0.651300 &           0.732466 &           0.589563 \\
0.006         &                             0.453191 &                          0.134035 &           0.610163 &               0.549341 &                 0.706977 &                 0.726007 &           0.737435 &           0.597224 \\
0.007         &                             0.491641 &                          0.134035 &           0.623962 &               0.587449 &                 0.744677 &                 0.763706 &           0.762780 &           0.620376 \\
0.008         &                             0.566362 &                          0.150028 &           0.657098 &               0.597747 &                 0.808840 &                 0.828814 &           0.780827 &           0.659893 \\
0.009         &                             0.638084 &                          0.219926 &           0.692429 &               0.599198 &                 0.846523 &                 0.866497 &           0.799240 &           0.697569 \\
0.010         &                             0.662229 &                          0.219926 &           0.706620 &               0.618806 &                 0.847718 &                 0.867692 &           0.832848 &           0.731178 \\
0.011         &                             0.738995 &                          0.278031 &           0.706620 &               0.636380 &                 0.847718 &                 0.867692 &           0.850422 &           0.749962 \\
0.012         &                             0.777670 &                          0.288329 &           0.706620 &               0.656333 &                 0.848063 &                 0.868036 &           0.850422 &           0.784209 \\
0.013         &                             0.787514 &                          0.362288 &           0.743377 &               0.686266 &                 0.848063 &                 0.868036 &           0.914115 &           0.862228 \\
0.014         &                             0.809597 &                          0.381896 &           0.743377 &               0.700831 &                 0.848063 &                 0.868036 &           0.929009 &           0.875428 \\
0.015         &                             0.841488 &                          0.382904 &           0.743377 &               0.702026 &                 0.848063 &                 0.868036 &           0.929009 &           0.889223 \\
0.016         &                             0.841488 &                          0.421296 &           0.761468 &               0.702026 &                 0.848063 &                 0.868036 &           0.929009 &           0.907380 \\
0.017         &                             0.860087 &                          0.485960 &           0.761468 &               0.702026 &                 0.848063 &                 0.868036 &           0.948962 &           0.928439 \\
0.018         &                             0.860087 &                          0.485960 &           0.761468 &               0.702026 &                 0.848063 &                 0.868036 &           0.948962 &           0.929634 \\
0.019         &                             0.878244 &                          0.504560 &           0.770778 &               0.734976 &                 0.868594 &                 0.888568 &           0.951566 &           0.943276 \\
0.020         &                             0.878244 &                          0.542324 &           0.770778 &               0.734976 &                 0.868594 &                 0.888568 &           0.951566 &           0.943276 \\
0.021         &                             0.878244 &                          0.542324 &           0.770778 &               0.754584 &                 0.868594 &                 0.888568 &           0.957375 &           0.943276 \\
0.022         &                             0.878244 &                          0.595564 &           0.784801 &               0.772676 &                 0.870045 &                 0.890019 &           0.957375 &           0.943276 \\
0.023         &                             0.878244 &                          0.598574 &           0.784801 &               0.792284 &                 0.870045 &                 0.890019 &           0.957375 &           0.943276 \\
0.024         &                             0.878244 &                          0.610802 &           0.784801 &               0.811719 &                 0.875461 &                 0.895435 &           0.957375 &           0.943276 \\
0.025         &                             0.878244 &                          0.610802 &           0.784801 &               0.811719 &                 0.875461 &                 0.895435 &           0.957375 &           0.943276 \\
0.026         &                             0.878244 &                          0.708820 &           0.784801 &               0.817136 &                 0.893618 &                 0.913592 &           0.957375 &           0.943276 \\
0.027         &                             0.879253 &                          0.708820 &           0.784801 &               0.817136 &                 0.893618 &                 0.913592 &           0.957375 &           0.943276 \\
0.028         &                             0.889551 &                          0.708820 &           0.784801 &               0.817136 &                 0.893618 &                 0.913592 &           0.957375 &           0.955268 \\
0.029         &                             0.889551 &                          0.718130 &           0.784801 &               0.817136 &                 0.893618 &                 0.913592 &           0.957375 &           0.955268 \\
0.030         &                             0.889551 &                          0.737738 &           0.784801 &               0.817136 &                 0.908426 &                 0.928399 &           0.957375 &           0.955268 \\
0.031         &                             0.889551 &                          0.770816 &           0.784801 &               0.818696 &                 0.908426 &                 0.928399 &           0.957375 &           0.955268 \\
0.032         &                             0.889551 &                          0.770816 &           0.784801 &               0.832720 &                 0.908426 &                 0.928399 &           0.957375 &           0.955268 \\
0.033         &                             0.889551 &                          0.770816 &           0.784801 &               0.842030 &                 0.908426 &                 0.928399 &           0.957375 &           0.955268 \\
0.034         &                             0.889551 &                          0.770816 &           0.784801 &               0.842030 &                 0.908426 &                 0.928399 &           0.957375 &           0.955268 \\
0.035         &                             0.889551 &                          0.770816 &           0.784801 &               0.843038 &                 0.918724 &                 0.938698 &           0.957375 &           0.955268 \\
0.036         &                             0.894967 &                          0.826629 &           0.784801 &               0.843038 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.037         &                             0.894967 &                          0.844720 &           0.784801 &               0.843038 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.038         &                             0.894967 &                          0.857493 &           0.784801 &               0.861195 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.039         &                             0.894967 &                          0.857493 &           0.784801 &               0.861195 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.040         &                             0.894967 &                          0.857493 &           0.784801 &               0.861367 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.041         &                             0.896418 &                          0.876705 &           0.784801 &               0.861367 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.042         &                             0.896418 &                          0.876705 &           0.784801 &               0.861367 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.043         &                             0.896418 &                          0.876705 &           0.784801 &               0.861367 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.044         &                             0.896418 &                          0.876705 &           0.784801 &               0.861367 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.045         &                             0.896418 &                          0.876705 &           0.784801 &               0.861367 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.046         &                             0.896418 &                          0.876705 &           0.784801 &               0.880975 &                 0.918724 &                 0.938698 &           0.958570 &           0.955268 \\
0.047         &                             0.896418 &                          0.876877 &           0.784801 &               0.880975 &                 0.918724 &                 0.938698 &           0.958570 &           0.955440 \\
0.048         &                             0.896418 &                          0.876877 &           0.784801 &               0.880975 &                 0.920284 &                 0.940258 &           0.958570 &           0.955440 \\
0.049         &                             0.896418 &                          0.876877 &           0.784801 &               0.880975 &                 0.920284 &                 0.940258 &           0.958570 &           0.955440 \\
0.050         &                             0.896418 &                          0.876877 &           0.784801 &               0.880975 &                 0.920284 &                 0.940258 &           0.958570 &           0.957001 \\
0.051         &                             0.896418 &                          0.876877 &           0.784801 &               0.880975 &                 0.920284 &                 0.940258 &           0.958570 &           0.957001 \\
0.052         &                             0.896418 &                          0.876877 &           0.784801 &               0.896968 &                 0.920284 &                 0.940258 &           0.958570 &           0.957001 \\
0.053         &                             0.896418 &                          0.876877 &           0.784801 &               0.911159 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.054         &                             0.896418 &                          0.876877 &           0.784801 &               0.911159 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.055         &                             0.896418 &                          0.876877 &           0.784801 &               0.911159 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.056         &                             0.896418 &                          0.876877 &           0.784801 &               0.911159 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.057         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.058         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.059         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.060         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.061         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.062         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.063         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.064         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.065         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.066         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.920284 &                 0.940258 &           0.958570 &           0.962809 \\
0.067         &                             0.896418 &                          0.876877 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.068         &                             0.896418 &                          0.896485 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.069         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.070         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.071         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.072         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.073         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.074         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.075         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.076         &                             0.896418 &                          0.897936 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.077         &                             0.896418 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.078         &                             0.896418 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.079         &                             0.896418 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.080         &                             0.896418 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.081         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.082         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.083         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.084         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.085         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.086         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.087         &                             0.902227 &                          0.899497 &           0.784801 &               0.914774 &                 0.926093 &                 0.946067 &           0.958570 &           0.962809 \\
0.088         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966229 &           0.962809 \\
0.089         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966229 &           0.962809 \\
0.090         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966229 &           0.962809 \\
0.091         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966229 &           0.962809 \\
0.092         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966229 &           0.962809 \\
0.093         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.094         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.095         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.096         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.097         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.098         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.099         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
0.100         &                             0.902227 &                          0.899497 &           0.790610 &               0.914774 &                 0.926093 &                 0.946067 &           0.966401 &           0.962809 \\
\bottomrule
\end{tabular}
