\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
62.000000   &                             0.969728 &                                     0.909223 &                                     1.030233 &                          1.020471 &                                  0.710499 &                                  1.330444 &           0.960086 &                   0.917436 &                   1.002736 &               0.773603 &                       0.641850 &                       0.905356 &                 0.960086 &                         0.917436 &                         1.002736 &                 0.960086 &                         0.917436 &                         1.002736 &           0.960086 &                   0.917436 &                   1.002736 &           0.960086 &                   0.917436 &                   1.002736 &                 0.960086 &                         0.917436 &                         1.002736 \\
63.393939   &                             0.970268 &                                     0.911271 &                                     1.029266 &                          1.023347 &                                  0.774407 &                                  1.272286 &           0.961109 &                   0.919521 &                   1.002696 &               0.783885 &                       0.658251 &                       0.909520 &                 0.961109 &                         0.919521 &                         1.002696 &                 0.961109 &                         0.919521 &                         1.002696 &           0.961109 &                   0.919521 &                   1.002696 &           0.961109 &                   0.919521 &                   1.002696 &                 0.961109 &                         0.919521 &                         1.002696 \\
64.787879   &                             0.970810 &                                     0.913305 &                                     1.028315 &                          1.020820 &                                  0.819773 &                                  1.221866 &           0.962132 &                   0.921596 &                   1.002667 &               0.794184 &                       0.674539 &                       0.913828 &                 0.962132 &                         0.921596 &                         1.002667 &                 0.962132 &                         0.921596 &                         1.002667 &           0.962132 &                   0.921596 &                   1.002667 &           0.962132 &                   0.921596 &                   1.002667 &                 0.962132 &                         0.921596 &                         1.002667 \\
66.181818   &                             0.971351 &                                     0.915322 &                                     1.027381 &                          1.013836 &                                  0.846112 &                                  1.181559 &           0.963155 &                   0.923660 &                   1.002651 &               0.804495 &                       0.690694 &                       0.918297 &                 0.963155 &                         0.923660 &                         1.002651 &                 0.963155 &                         0.923660 &                         1.002651 &           0.963155 &                   0.923660 &                   1.002651 &           0.963155 &                   0.923660 &                   1.002651 &                 0.963155 &                         0.923660 &                         1.002651 \\
67.575758   &                             0.971894 &                                     0.917322 &                                     1.026466 &                          1.003340 &                                  0.855625 &                                  1.151055 &           0.964180 &                   0.925712 &                   1.002648 &               0.814819 &                       0.706690 &                       0.922948 &                 0.964180 &                         0.925712 &                         1.002648 &                 0.964180 &                         0.925712 &                         1.002648 &           0.964180 &                   0.925712 &                   1.002648 &           0.964180 &                   0.925712 &                   1.002648 &                 0.964180 &                         0.925712 &                         1.002648 \\
68.969697   &                             0.972438 &                                     0.919303 &                                     1.025572 &                          0.990278 &                                  0.854680 &                                  1.125876 &           0.965207 &                   0.927752 &                   1.002661 &               0.825153 &                       0.722504 &                       0.927801 &                 0.965207 &                         0.927752 &                         1.002661 &                 0.965207 &                         0.927752 &                         1.002661 &           0.965207 &                   0.927752 &                   1.002661 &           0.965207 &                   0.927752 &                   1.002661 &                 0.965207 &                         0.927752 &                         1.002661 \\
70.363636   &                             0.972983 &                                     0.921265 &                                     1.024700 &                          0.975595 &                                  0.851700 &                                  1.099491 &           0.966235 &                   0.929779 &                   1.002691 &               0.835494 &                       0.738110 &                       0.932878 &                 0.966235 &                         0.929779 &                         1.002691 &                 0.966235 &                         0.929779 &                         1.002691 &           0.966235 &                   0.929779 &                   1.002691 &           0.966235 &                   0.929779 &                   1.002691 &                 0.966235 &                         0.929779 &                         1.002691 \\
71.757576   &                             0.973529 &                                     0.923205 &                                     1.023853 &                          0.960332 &                                  0.851734 &                                  1.068930 &           0.967264 &                   0.931791 &                   1.002738 &               0.845828 &                       0.753464 &                       0.938191 &                 0.967264 &                         0.931791 &                         1.002738 &                 0.967264 &                         0.931791 &                         1.002738 &           0.967264 &                   0.931791 &                   1.002738 &           0.967264 &                   0.931791 &                   1.002738 &                 0.967264 &                         0.931791 &                         1.002738 \\
73.151515   &                             0.974076 &                                     0.925121 &                                     1.023031 &                          0.945754 &                                  0.852009 &                                  1.039498 &           0.968296 &                   0.933787 &                   1.002805 &               0.856106 &                       0.768489 &                       0.943723 &                 0.968296 &                         0.933787 &                         1.002805 &                 0.968296 &                         0.933787 &                         1.002805 &           0.968296 &                   0.933787 &                   1.002805 &           0.968296 &                   0.933787 &                   1.002805 &                 0.968296 &                         0.933787 &                         1.002805 \\
74.545455   &                             0.974624 &                                     0.927010 &                                     1.022237 &                          0.933159 &                                  0.846474 &                                  1.019843 &           0.969329 &                   0.935766 &                   1.002892 &               0.866276 &                       0.783100 &                       0.949453 &                 0.969329 &                         0.935766 &                         1.002892 &                 0.969329 &                         0.935766 &                         1.002892 &           0.969329 &                   0.935766 &                   1.002892 &           0.969329 &                   0.935766 &                   1.002892 &                 0.969329 &                         0.935766 &                         1.002892 \\
75.939394   &                             0.975171 &                                     0.928870 &                                     1.021472 &                          0.923846 &                                  0.833264 &                                  1.014427 &           0.970363 &                   0.937725 &                   1.003001 &               0.876287 &                       0.797219 &                       0.955354 &                 0.970363 &                         0.937725 &                         1.003001 &                 0.970363 &                         0.937725 &                         1.003001 &           0.970363 &                   0.937725 &                   1.003001 &           0.970363 &                   0.937725 &                   1.003001 &                 0.970363 &                         0.937725 &                         1.003001 \\
77.333333   &                             0.975717 &                                     0.930697 &                                     1.020737 &                          0.919112 &                                  0.819490 &                                  1.018735 &           0.971398 &                   0.939663 &                   1.003132 &               0.886084 &                       0.810768 &                       0.961400 &                 0.971398 &                         0.939663 &                         1.003132 &                 0.971398 &                         0.939663 &                         1.003132 &           0.971398 &                   0.939663 &                   1.003132 &           0.971398 &                   0.939663 &                   1.003132 &                 0.971398 &                         0.939663 &                         1.003132 \\
78.727273   &                             0.976263 &                                     0.932490 &                                     1.020035 &                          0.920229 &                                  0.814934 &                                  1.025524 &           0.972433 &                   0.941578 &                   1.003289 &               0.895617 &                       0.823677 &                       0.967557 &                 0.972433 &                         0.941578 &                         1.003289 &                 0.972433 &                         0.941578 &                         1.003289 &           0.972433 &                   0.941578 &                   1.003289 &           0.972433 &                   0.941578 &                   1.003289 &                 0.972433 &                         0.941578 &                         1.003289 \\
80.121212   &                             0.976805 &                                     0.934244 &                                     1.019367 &                          0.927013 &                                  0.821687 &                                  1.032339 &           0.973469 &                   0.943467 &                   1.003470 &               0.904836 &                       0.835882 &                       0.973791 &                 0.973469 &                         0.943467 &                         1.003470 &                 0.973469 &                         0.943467 &                         1.003470 &           0.973469 &                   0.943467 &                   1.003470 &           0.973469 &                   0.943467 &                   1.003470 &                 0.973469 &                         0.943467 &                         1.003470 \\
81.515152   &                             0.977343 &                                     0.935955 &                                     1.018732 &                          0.937141 &                                  0.832553 &                                  1.041730 &           0.974502 &                   0.945327 &                   1.003677 &               0.913701 &                       0.847334 &                       0.980068 &                 0.974502 &                         0.945327 &                         1.003677 &                 0.974502 &                         0.945327 &                         1.003677 &           0.974502 &                   0.945327 &                   1.003677 &           0.974502 &                   0.945327 &                   1.003677 &                 0.974502 &                         0.945327 &                         1.003677 \\
82.909091   &                             0.977874 &                                     0.937617 &                                     1.018131 &                          0.948120 &                                  0.841084 &                                  1.055157 &           0.975531 &                   0.947154 &                   1.003908 &               0.922169 &                       0.857994 &                       0.986344 &                 0.975531 &                         0.947154 &                         1.003908 &                 0.975531 &                         0.947154 &                         1.003908 &           0.975531 &                   0.947154 &                   1.003908 &           0.975531 &                   0.947154 &                   1.003908 &                 0.975531 &                         0.947154 &                         1.003908 \\
84.303030   &                             0.978395 &                                     0.939226 &                                     1.017564 &                          0.957456 &                                  0.845508 &                                  1.069404 &           0.976554 &                   0.948944 &                   1.004164 &               0.930200 &                       0.867834 &                       0.992565 &                 0.976554 &                         0.948944 &                         1.004164 &                 0.976554 &                         0.948944 &                         1.004164 &           0.976554 &                   0.948944 &                   1.004164 &           0.976554 &                   0.948944 &                   1.004164 &                 0.976554 &                         0.948944 &                         1.004164 \\
85.696970   &                             0.978904 &                                     0.940777 &                                     1.017030 &                          0.962655 &                                  0.848220 &                                  1.077090 &           0.977569 &                   0.950694 &                   1.004444 &               0.937752 &                       0.876839 &                       0.998664 &                 0.977569 &                         0.950694 &                         1.004444 &                 0.977569 &                         0.950694 &                         1.004444 &           0.977569 &                   0.950694 &                   1.004444 &           0.977569 &                   0.950694 &                   1.004444 &                 0.977569 &                         0.950694 &                         1.004444 \\
87.090909   &                             0.979398 &                                     0.942266 &                                     1.016530 &                          0.961360 &                                  0.852353 &                                  1.070368 &           0.978574 &                   0.952400 &                   1.004749 &               0.944785 &                       0.885004 &                       1.004566 &                 0.978574 &                         0.952400 &                         1.004749 &                 0.978574 &                         0.952400 &                         1.004749 &           0.978574 &                   0.952400 &                   1.004749 &           0.978574 &                   0.952400 &                   1.004749 &                 0.978574 &                         0.952400 &                         1.004749 \\
88.484848   &                             0.979875 &                                     0.943687 &                                     1.016064 &                          0.953982 &                                  0.857134 &                                  1.050831 &           0.979568 &                   0.954059 &                   1.005077 &               0.951276 &                       0.892345 &                       1.010206 &                 0.979568 &                         0.954059 &                         1.005077 &                 0.979568 &                         0.954059 &                         1.005077 &           0.979568 &                   0.954059 &                   1.005077 &           0.979568 &                   0.954059 &                   1.005077 &                 0.979568 &                         0.954059 &                         1.005077 \\
89.878788   &                             0.980334 &                                     0.945037 &                                     1.015632 &                          0.943493 &                                  0.857020 &                                  1.029966 &           0.980549 &                   0.955668 &                   1.005430 &               0.957219 &                       0.898898 &                       1.015539 &                 0.980549 &                         0.955668 &                         1.005430 &                 0.980549 &                         0.955668 &                         1.005430 &           0.980549 &                   0.955668 &                   1.005430 &           0.980549 &                   0.955668 &                   1.005430 &                 0.980549 &                         0.955668 &                         1.005430 \\
91.272727   &                             0.980773 &                                     0.946312 &                                     1.015234 &                          0.932960 &                                  0.847015 &                                  1.018904 &           0.981515 &                   0.957224 &                   1.005807 &               0.962609 &                       0.904700 &                       1.020517 &                 0.981515 &                         0.957224 &                         1.005807 &                 0.981515 &                         0.957224 &                         1.005807 &           0.981515 &                   0.957224 &                   1.005807 &           0.981515 &                   0.957224 &                   1.005807 &                 0.981515 &                         0.957224 &                         1.005807 \\
92.666667   &                             0.981190 &                                     0.947508 &                                     1.014871 &                          0.925452 &                                  0.831005 &                                  1.019898 &           0.982466 &                   0.958725 &                   1.006208 &               0.967439 &                       0.909789 &                       1.025090 &                 0.982466 &                         0.958725 &                         1.006208 &                 0.982466 &                         0.958725 &                         1.006208 &           0.982466 &                   0.958725 &                   1.006208 &           0.982466 &                   0.958725 &                   1.006208 &                 0.982466 &                         0.958725 &                         1.006208 \\
94.060606   &                             0.981582 &                                     0.948622 &                                     1.014542 &                          0.924036 &                                  0.821013 &                                  1.027059 &           0.983401 &                   0.960167 &                   1.006634 &               0.971706 &                       0.914202 &                       1.029209 &                 0.983401 &                         0.960167 &                         1.006634 &                 0.983401 &                         0.960167 &                         1.006634 &           0.983401 &                   0.960167 &                   1.006634 &           0.983401 &                   0.960167 &                   1.006634 &                 0.983401 &                         0.960167 &                         1.006634 \\
95.454545   &                             0.981949 &                                     0.949650 &                                     1.014248 &                          0.931405 &                                  0.827767 &                                  1.035043 &           0.984317 &                   0.961550 &                   1.007085 &               0.975404 &                       0.917976 &                       1.032832 &                 0.984317 &                         0.961550 &                         1.007085 &                 0.984317 &                         0.961550 &                         1.007085 &           0.984317 &                   0.961550 &                   1.007085 &           0.984317 &                   0.961550 &                   1.007085 &                 0.984317 &                         0.961550 &                         1.007085 \\
96.848485   &                             0.982289 &                                     0.950590 &                                     1.013987 &                          0.946438 &                                  0.848942 &                                  1.043934 &           0.985215 &                   0.962870 &                   1.007559 &               0.978545 &                       0.921150 &                       1.035940 &                 0.985215 &                         0.962870 &                         1.007559 &                 0.985215 &                         0.962870 &                         1.007559 &           0.985215 &                   0.962870 &                   1.007559 &           0.985215 &                   0.962870 &                   1.007559 &                 0.985215 &                         0.962870 &                         1.007559 \\
98.242424   &                             0.982601 &                                     0.951440 &                                     1.013762 &                          0.965803 &                                  0.874296 &                                  1.057311 &           0.986093 &                   0.964128 &                   1.008059 &               0.981150 &                       0.923767 &                       1.038533 &                 0.986093 &                         0.964128 &                         1.008059 &                 0.986093 &                         0.964128 &                         1.008059 &           0.986093 &                   0.964128 &                   1.008059 &           0.986093 &                   0.964128 &                   1.008059 &                 0.986093 &                         0.964128 &                         1.008059 \\
99.636364   &                             0.982885 &                                     0.952197 &                                     1.013572 &                          0.986141 &                                  0.895026 &                                  1.077256 &           0.986952 &                   0.965320 &                   1.008584 &               0.983239 &                       0.925863 &                       1.040615 &                 0.986952 &                         0.965320 &                         1.008584 &                 0.986952 &                         0.965320 &                         1.008584 &           0.986952 &                   0.965320 &                   1.008584 &           0.986952 &                   0.965320 &                   1.008584 &                 0.986952 &                         0.965320 &                         1.008584 \\
101.030303  &                             0.983139 &                                     0.952861 &                                     1.013417 &                          1.004090 &                                  0.908457 &                                  1.099724 &           0.987791 &                   0.966448 &                   1.009134 &               0.984834 &                       0.927476 &                       1.042192 &                 0.987791 &                         0.966448 &                         1.009134 &                 0.987791 &                         0.966448 &                         1.009134 &           0.987791 &                   0.966448 &                   1.009134 &           0.987791 &                   0.966448 &                   1.009134 &                 0.987791 &                         0.966448 &                         1.009134 \\
102.424242  &                             0.983363 &                                     0.953431 &                                     1.013295 &                          1.016292 &                                  0.917109 &                                  1.115476 &           0.988609 &                   0.967510 &                   1.009709 &               0.985954 &                       0.928637 &                       1.043271 &                 0.988609 &                         0.967510 &                         1.009709 &                 0.988609 &                         0.967510 &                         1.009709 &           0.988609 &                   0.967510 &                   1.009709 &           0.988609 &                   0.967510 &                   1.009709 &                 0.988609 &                         0.967510 &                         1.009709 \\
103.818182  &                             0.983556 &                                     0.953905 &                                     1.013208 &                          1.020088 &                                  0.922811 &                                  1.117364 &           0.989407 &                   0.968506 &                   1.010308 &               0.986623 &                       0.929378 &                       1.043867 &                 0.989407 &                         0.968506 &                         1.010308 &                 0.989407 &                         0.968506 &                         1.010308 &           0.989407 &                   0.968506 &                   1.010308 &           0.989407 &                   0.968506 &                   1.010308 &                 0.989407 &                         0.968506 &                         1.010308 \\
105.212121  &                             0.983718 &                                     0.954284 &                                     1.013153 &                          1.016820 &                                  0.922452 &                                  1.111188 &           0.990184 &                   0.969435 &                   1.010933 &               0.986869 &                       0.929727 &                       1.044012 &                 0.990184 &                         0.969435 &                         1.010933 &                 0.990184 &                         0.969435 &                         1.010933 &           0.990184 &                   0.969435 &                   1.010933 &           0.990184 &                   0.969435 &                   1.010933 &                 0.990184 &                         0.969435 &                         1.010933 \\
106.606061  &                             0.983849 &                                     0.954567 &                                     1.013131 &                          1.009251 &                                  0.911638 &                                  1.106865 &           0.990940 &                   0.970299 &                   1.011581 &               0.986728 &                       0.929709 &                       1.043747 &                 0.990940 &                         0.970299 &                         1.011581 &                 0.990940 &                         0.970299 &                         1.011581 &           0.990940 &                   0.970299 &                   1.011581 &           0.990940 &                   0.970299 &                   1.011581 &                 0.990940 &                         0.970299 &                         1.011581 \\
108.000000  &                             0.983949 &                                     0.954757 &                                     1.013141 &                          1.000145 &                                  0.891640 &                                  1.108650 &           0.991676 &                   0.971099 &                   1.012254 &               0.986232 &                       0.929349 &                       1.043115 &                 0.991676 &                         0.971099 &                         1.012254 &                 0.991676 &                         0.971099 &                         1.012254 &           0.991676 &                   0.971099 &                   1.012254 &           0.991676 &                   0.971099 &                   1.012254 &                 0.991676 &                         0.971099 &                         1.012254 \\
109.393939  &                             0.984018 &                                     0.954853 &                                     1.013182 &                          0.992264 &                                  0.870700 &                                  1.113828 &           0.992392 &                   0.971834 &                   1.012949 &               0.985414 &                       0.928670 &                       1.042158 &                 0.992392 &                         0.971834 &                         1.012949 &                 0.992392 &                         0.971834 &                         1.012949 &           0.992392 &                   0.971834 &                   1.012949 &           0.992392 &                   0.971834 &                   1.012949 &                 0.992392 &                         0.971834 &                         1.012949 \\
110.787879  &                             0.984055 &                                     0.954858 &                                     1.013252 &                          0.988372 &                                  0.858968 &                                  1.117776 &           0.993087 &                   0.972506 &                   1.013668 &               0.984309 &                       0.927698 &                       1.040919 &                 0.993087 &                         0.972506 &                         1.013668 &                 0.993087 &                         0.972506 &                         1.013668 &           0.993087 &                   0.972506 &                   1.013668 &           0.993087 &                   0.972506 &                   1.013668 &                 0.993087 &                         0.972506 &                         1.013668 \\
112.181818  &                             0.984062 &                                     0.954772 &                                     1.013351 &                          0.990224 &                                  0.862070 &                                  1.118378 &           0.993762 &                   0.973116 &                   1.014408 &               0.982950 &                       0.926458 &                       1.039443 &                 0.993762 &                         0.973116 &                         1.014408 &                 0.993762 &                         0.973116 &                         1.014408 &           0.993762 &                   0.973116 &                   1.014408 &           0.993762 &                   0.973116 &                   1.014408 &                 0.993762 &                         0.973116 &                         1.014408 \\
113.575758  &                             0.984038 &                                     0.954599 &                                     1.013477 &                          0.996194 &                                  0.874283 &                                  1.118105 &           0.994418 &                   0.973667 &                   1.015170 &               0.981379 &                       0.924973 &                       1.037785 &                 0.994418 &                         0.973667 &                         1.015170 &                 0.994418 &                         0.973667 &                         1.015170 &           0.994418 &                   0.973667 &                   1.015170 &           0.994418 &                   0.973667 &                   1.015170 &                 0.994418 &                         0.973667 &                         1.015170 \\
114.969697  &                             0.983983 &                                     0.954339 &                                     1.013628 &                          1.003946 &                                  0.887656 &                                  1.120236 &           0.995055 &                   0.974158 &                   1.015952 &               0.979638 &                       0.923273 &                       1.036003 &                 0.995055 &                         0.974158 &                         1.015952 &                 0.995055 &                         0.974158 &                         1.015952 &           0.995055 &                   0.974158 &                   1.015952 &           0.995055 &                   0.974158 &                   1.015952 &                 0.995055 &                         0.974158 &                         1.015952 \\
116.363636  &                             0.983900 &                                     0.953996 &                                     1.013804 &                          1.011146 &                                  0.897056 &                                  1.125235 &           0.995673 &                   0.974593 &                   1.016753 &               0.977768 &                       0.921387 &                       1.034150 &                 0.995673 &                         0.974593 &                         1.016753 &                 0.995673 &                         0.974593 &                         1.016753 &           0.995673 &                   0.974593 &                   1.016753 &           0.995673 &                   0.974593 &                   1.016753 &                 0.995673 &                         0.974593 &                         1.016753 \\
117.757576  &                             0.983787 &                                     0.953571 &                                     1.014004 &                          1.015458 &                                  0.902284 &                                  1.128633 &           0.996273 &                   0.974973 &                   1.017572 &               0.975812 &                       0.919348 &                       1.032276 &                 0.996273 &                         0.974973 &                         1.017572 &                 0.996273 &                         0.974973 &                         1.017572 &           0.996273 &                   0.974973 &                   1.017572 &           0.996273 &                   0.974973 &                   1.017572 &                 0.996273 &                         0.974973 &                         1.017572 \\
119.151515  &                             0.983646 &                                     0.953068 &                                     1.014225 &                          1.014561 &                                  0.906596 &                                  1.122526 &           0.996854 &                   0.975299 &                   1.018409 &               0.973811 &                       0.917192 &                       1.030430 &                 0.996854 &                         0.975299 &                         1.018409 &                 0.996854 &                         0.975299 &                         1.018409 &           0.996854 &                   0.975299 &                   1.018409 &           0.996854 &                   0.975299 &                   1.018409 &                 0.996854 &                         0.975299 &                         1.018409 \\
120.545455  &                             0.983478 &                                     0.952489 &                                     1.014467 &                          1.007821 &                                  0.912198 &                                  1.103445 &           0.997418 &                   0.975574 &                   1.019263 &               0.971807 &                       0.914954 &                       1.028660 &                 0.997418 &                         0.975574 &                         1.019263 &                 0.997418 &                         0.975574 &                         1.019263 &           0.997418 &                   0.975574 &                   1.019263 &           0.997418 &                   0.975574 &                   1.019263 &                 0.997418 &                         0.975574 &                         1.019263 \\
121.939394  &                             0.983283 &                                     0.951836 &                                     1.014729 &                          0.998026 &                                  0.916448 &                                  1.079603 &           0.997966 &                   0.975799 &                   1.020132 &               0.969839 &                       0.912665 &                       1.027014 &                 0.997966 &                         0.975799 &                         1.020132 &                 0.997966 &                         0.975799 &                         1.020132 &           0.997966 &                   0.975799 &                   1.020132 &           0.997966 &                   0.975799 &                   1.020132 &                 0.997966 &                         0.975799 &                         1.020132 \\
123.333333  &                             0.983063 &                                     0.951114 &                                     1.015012 &                          0.988373 &                                  0.914108 &                                  1.062639 &           0.998496 &                   0.975975 &                   1.021017 &               0.967949 &                       0.910355 &                       1.025542 &                 0.998496 &                         0.975975 &                         1.021017 &                 0.998496 &                         0.975975 &                         1.021017 &           0.998496 &                   0.975975 &                   1.021017 &           0.998496 &                   0.975975 &                   1.021017 &                 0.998496 &                         0.975975 &                         1.021017 \\
124.727273  &                             0.982820 &                                     0.950324 &                                     1.015315 &                          0.982064 &                                  0.904439 &                                  1.059689 &           0.999011 &                   0.976105 &                   1.021917 &               0.966174 &                       0.908060 &                       1.024288 &                 0.999011 &                         0.976105 &                         1.021917 &                 0.999011 &                         0.976105 &                         1.021917 &           0.999011 &                   0.976105 &                   1.021917 &           0.999011 &                   0.976105 &                   1.021917 &                 0.999011 &                         0.976105 &                         1.021917 \\
126.121212  &                             0.982554 &                                     0.949470 &                                     1.015639 &                          0.982296 &                                  0.896818 &                                  1.067775 &           0.999511 &                   0.976189 &                   1.022832 &               0.964556 &                       0.905818 &                       1.023293 &                 0.999511 &                         0.976189 &                         1.022832 &                 0.999511 &                         0.976189 &                         1.022832 &           0.999511 &                   0.976189 &                   1.022832 &           0.999511 &                   0.976189 &                   1.022832 &                 0.999511 &                         0.976189 &                         1.022832 \\
127.515152  &                             0.982268 &                                     0.948554 &                                     1.015982 &                          0.992150 &                                  0.903446 &                                  1.080855 &           0.999995 &                   0.976230 &                   1.023760 &               0.963133 &                       0.903670 &                       1.022596 &                 0.999995 &                         0.976230 &                         1.023760 &                 0.999995 &                         0.976230 &                         1.023760 &           0.999995 &                   0.976230 &                   1.023760 &           0.999995 &                   0.976230 &                   1.023760 &                 0.999995 &                         0.976230 &                         1.023760 \\
128.909091  &                             0.981963 &                                     0.947579 &                                     1.016347 &                          1.010362 &                                  0.925145 &                                  1.095580 &           1.000465 &                   0.976228 &                   1.024703 &               0.961928 &                       0.901635 &                       1.022221 &                 1.000465 &                         0.976228 &                         1.024703 &                 1.000465 &                         0.976228 &                         1.024703 &           1.000465 &                   0.976228 &                   1.024703 &           1.000465 &                   0.976228 &                   1.024703 &                 1.000465 &                         0.976228 &                         1.024703 \\
130.303030  &                             0.981642 &                                     0.946548 &                                     1.016736 &                          1.030201 &                                  0.949396 &                                  1.111005 &           1.000922 &                   0.976184 &                   1.025660 &               0.960941 &                       0.899712 &                       1.022171 &                 1.000922 &                         0.976184 &                         1.025660 &                 1.000922 &                         0.976184 &                         1.025660 &           1.000922 &                   0.976184 &                   1.025660 &           1.000922 &                   0.976184 &                   1.025660 &                 1.000922 &                         0.976184 &                         1.025660 \\
131.696970  &                             0.981307 &                                     0.945465 &                                     1.017149 &                          1.044583 &                                  0.963369 &                                  1.125797 &           1.001365 &                   0.976100 &                   1.026630 &               0.960171 &                       0.897897 &                       1.022446 &                 1.001365 &                         0.976100 &                         1.026630 &                 1.001365 &                         0.976100 &                         1.026630 &           1.001365 &                   0.976100 &                   1.026630 &           1.001365 &                   0.976100 &                   1.026630 &                 1.001365 &                         0.976100 &                         1.026630 \\
133.090909  &                             0.980962 &                                     0.944333 &                                     1.017590 &                          1.046429 &                                  0.959353 &                                  1.133504 &           1.001796 &                   0.975976 &                   1.027615 &               0.959617 &                       0.896193 &                       1.023041 &                 1.001796 &                         0.975976 &                         1.027615 &                 1.001796 &                         0.975976 &                         1.027615 &           1.001796 &                   0.975976 &                   1.027615 &           1.001796 &                   0.975976 &                   1.027615 &                 1.001796 &                         0.975976 &                         1.027615 \\
134.484848  &                             0.980608 &                                     0.943156 &                                     1.018059 &                          1.028656 &                                  0.934662 &                                  1.122650 &           1.002214 &                   0.975814 &                   1.028614 &               0.959277 &                       0.894603 &                       1.023951 &                 1.002214 &                         0.975814 &                         1.028614 &                 1.002214 &                         0.975814 &                         1.028614 &           1.002214 &                   0.975814 &                   1.028614 &           1.002214 &                   0.975814 &                   1.028614 &                 1.002214 &                         0.975814 &                         1.028614 \\
135.878788  &                             0.980249 &                                     0.941937 &                                     1.018561 &                          0.984617 &                                  0.886312 &                                  1.082922 &           1.002621 &                   0.975615 &                   1.029627 &               0.959149 &                       0.893132 &                       1.025166 &                 1.002621 &                         0.975615 &                         1.029627 &                 1.002621 &                         0.975615 &                         1.029627 &           1.002621 &                   0.975615 &                   1.029627 &           1.002621 &                   0.975615 &                   1.029627 &                 1.002621 &                         0.975615 &                         1.029627 \\
137.272727  &                             0.979887 &                                     0.940678 &                                     1.019096 &                          0.914448 &                                  0.810698 &                                  1.018198 &           1.003017 &                   0.975378 &                   1.030655 &               0.959224 &                       0.891774 &                       1.026673 &                 1.003017 &                         0.975378 &                         1.030655 &                 1.003017 &                         0.975378 &                         1.030655 &           1.003017 &                   0.975378 &                   1.030655 &           1.003017 &                   0.975378 &                   1.030655 &                 1.003017 &                         0.975378 &                         1.030655 \\
138.666667  &                             0.979526 &                                     0.939383 &                                     1.019668 &                          0.823675 &                                  0.707540 &                                  0.939809 &           1.003402 &                   0.975106 &                   1.031699 &               0.959481 &                       0.890508 &                       1.028454 &                 1.003402 &                         0.975106 &                         1.031699 &                 1.003402 &                         0.975106 &                         1.031699 &           1.003402 &                   0.975106 &                   1.031699 &           1.003402 &                   0.975106 &                   1.031699 &                 1.003402 &                         0.975106 &                         1.031699 \\
140.060606  &                             0.979168 &                                     0.938056 &                                     1.020279 &                          0.717970 &                                  0.582938 &                                  0.853003 &           1.003777 &                   0.974798 &                   1.032757 &               0.959903 &                       0.889315 &                       1.030490 &                 1.003777 &                         0.974798 &                         1.032757 &                 1.003777 &                         0.974798 &                         1.032757 &           1.003777 &                   0.974798 &                   1.032757 &           1.003777 &                   0.974798 &                   1.032757 &                 1.003777 &                         0.974798 &                         1.032757 \\
141.454545  &                             0.978816 &                                     0.936700 &                                     1.020933 &                          0.603008 &                                  0.447847 &                                  0.758169 &           1.004143 &                   0.974455 &                   1.033831 &               0.960471 &                       0.888177 &                       1.032764 &                 1.004143 &                         0.974455 &                         1.033831 &                 1.004143 &                         0.974455 &                         1.033831 &           1.004143 &                   0.974455 &                   1.033831 &           1.004143 &                   0.974455 &                   1.033831 &                 1.004143 &                         0.974455 &                         1.033831 \\
142.848485  &                             0.978475 &                                     0.935318 &                                     1.021632 &                          0.484462 &                                  0.313383 &                                  0.655541 &           1.004499 &                   0.974078 &                   1.034921 &               0.961166 &                       0.887076 &                       1.035256 &                 1.004499 &                         0.974078 &                         1.034921 &                 1.004499 &                         0.974078 &                         1.034921 &           1.004499 &                   0.974078 &                   1.034921 &           1.004499 &                   0.974078 &                   1.034921 &                 1.004499 &                         0.974078 &                         1.034921 \\
144.242424  &                             0.978145 &                                     0.933913 &                                     1.022377 &                          0.368292 &                                  0.187191 &                                  0.549392 &           1.004847 &                   0.973667 &                   1.036026 &               0.961970 &                       0.885994 &                       1.037947 &                 1.004847 &                         0.973667 &                         1.036026 &                 1.004847 &                         0.973667 &                         1.036026 &           1.004847 &                   0.973667 &                   1.036026 &           1.004847 &                   0.973667 &                   1.036026 &                 1.004847 &                         0.973667 &                         1.036026 \\
145.636364  &                             0.977830 &                                     0.932488 &                                     1.023171 &                          0.262833 &                                  0.071512 &                                  0.454154 &           1.005186 &                   0.973224 &                   1.037147 &               0.962872 &                       0.884917 &                       1.040827 &                 1.005186 &                         0.973224 &                         1.037147 &                 1.005186 &                         0.973224 &                         1.037147 &           1.005186 &                   0.973224 &                   1.037147 &           1.005186 &                   0.973224 &                   1.037147 &                 1.005186 &                         0.973224 &                         1.037147 \\
147.030303  &                             0.977527 &                                     0.931042 &                                     1.024013 &                          0.177598 &                                 -0.029976 &                                  0.385171 &           1.005517 &                   0.972749 &                   1.038285 &               0.963859 &                       0.883829 &                       1.043889 &                 1.005517 &                         0.972749 &                         1.038285 &                 1.005517 &                         0.972749 &                         1.038285 &           1.005517 &                   0.972749 &                   1.038285 &           1.005517 &                   0.972749 &                   1.038285 &                 1.005517 &                         0.972749 &                         1.038285 \\
148.424242  &                             0.977239 &                                     0.929575 &                                     1.024902 &                          0.122105 &                                 -0.107081 &                                  0.351290 &           1.005841 &                   0.972243 &                   1.039439 &               0.964923 &                       0.882718 &                       1.047128 &                 1.005841 &                         0.972243 &                         1.039439 &                 1.005841 &                         0.972243 &                         1.039439 &           1.005841 &                   0.972243 &                   1.039439 &           1.005841 &                   0.972243 &                   1.039439 &                 1.005841 &                         0.972243 &                         1.039439 \\
149.818182  &                             0.976964 &                                     0.928090 &                                     1.025838 &                          0.105873 &                                 -0.144170 &                                  0.355916 &           1.006157 &                   0.971706 &                   1.040609 &               0.966053 &                       0.881571 &                       1.050535 &                 1.006157 &                         0.971706 &                         1.040609 &                 1.006157 &                         0.971706 &                         1.040609 &           1.006157 &                   0.971706 &                   1.040609 &           1.006157 &                   0.971706 &                   1.040609 &                 1.006157 &                         0.971706 &                         1.040609 \\
151.212121  &                             0.976703 &                                     0.926585 &                                     1.026821 &                          0.138422 &                                 -0.123746 &                                  0.400591 &           1.006467 &                   0.971139 &                   1.041796 &               0.967239 &                       0.880376 &                       1.054101 &                 1.006467 &                         0.971139 &                         1.041796 &                 1.006467 &                         0.971139 &                         1.041796 &           1.006467 &                   0.971139 &                   1.041796 &           1.006467 &                   0.971139 &                   1.041796 &                 1.006467 &                         0.971139 &                         1.041796 \\
152.606061  &                             0.976456 &                                     0.925062 &                                     1.027850 &                          0.225467 &                                 -0.034571 &                                  0.485506 &           1.006771 &                   0.970543 &                   1.042998 &               0.968471 &                       0.879123 &                       1.057819 &                 1.006771 &                         0.970543 &                         1.042998 &                 1.006771 &                         0.970543 &                         1.042998 &           1.006771 &                   0.970543 &                   1.042998 &           1.006771 &                   0.970543 &                   1.042998 &                 1.006771 &                         0.970543 &                         1.042998 \\
154.000000  &                             0.976222 &                                     0.923521 &                                     1.028924 &                          0.354559 &                                  0.107250 &                                  0.601869 &           1.007068 &                   0.969919 &                   1.044217 &               0.969741 &                       0.877800 &                       1.061682 &                 1.007068 &                         0.969919 &                         1.044217 &                 1.007068 &                         0.969919 &                         1.044217 &           1.007068 &                   0.969919 &                   1.044217 &           1.007068 &                   0.969919 &                   1.044217 &                 1.007068 &                         0.969919 &                         1.044217 \\
155.393939  &                             0.976001 &                                     0.921961 &                                     1.030040 &                          0.507836 &                                  0.277120 &                                  0.738552 &           1.007360 &                   0.969267 &                   1.045453 &               0.971043 &                       0.876398 &                       1.065688 &                 1.007360 &                         0.969267 &                         1.045453 &                 1.007360 &                         0.969267 &                         1.045453 &           1.007360 &                   0.969267 &                   1.045453 &           1.007360 &                   0.969267 &                   1.045453 &                 1.007360 &                         0.969267 &                         1.045453 \\
156.787879  &                             0.975791 &                                     0.920383 &                                     1.031199 &                          0.667434 &                                  0.451674 &                                  0.883193 &           1.007646 &                   0.968589 &                   1.046704 &               0.972370 &                       0.874909 &                       1.069830 &                 1.007646 &                         0.968589 &                         1.046704 &                 1.007646 &                         0.968589 &                         1.046704 &           1.007646 &                   0.968589 &                   1.046704 &           1.007646 &                   0.968589 &                   1.046704 &                 1.007646 &                         0.968589 &                         1.046704 \\
158.181818  &                             0.975591 &                                     0.918786 &                                     1.032397 &                          0.815490 &                                  0.611080 &                                  1.019900 &           1.007928 &                   0.967885 &                   1.047970 &               0.973714 &                       0.873323 &                       1.074106 &                 1.007928 &                         0.967885 &                         1.047970 &                 1.007928 &                         0.967885 &                         1.047970 &           1.007928 &                   0.967885 &                   1.047970 &           1.007928 &                   0.967885 &                   1.047970 &                 1.007928 &                         0.967885 &                         1.047970 \\
159.575758  &                             0.975402 &                                     0.917169 &                                     1.033634 &                          0.934148 &                                  0.739923 &                                  1.128372 &           1.008205 &                   0.967157 &                   1.049253 &               0.975069 &                       0.871631 &                       1.078508 &                 1.008205 &                         0.967157 &                         1.049253 &                 1.008205 &                         0.967157 &                         1.049253 &           1.008205 &                   0.967157 &                   1.049253 &           1.008205 &                   0.967157 &                   1.049253 &                 1.008205 &                         0.967157 &                         1.049253 \\
160.969697  &                             0.975221 &                                     0.915534 &                                     1.034908 &                          1.011590 &                                  0.829559 &                                  1.193620 &           1.008477 &                   0.966404 &                   1.050551 &               0.976429 &                       0.869824 &                       1.083035 &                 1.008477 &                         0.966404 &                         1.050551 &                 1.008477 &                         0.966404 &                         1.050551 &           1.008477 &                   0.966404 &                   1.050551 &           1.008477 &                   0.966404 &                   1.050551 &                 1.008477 &                         0.966404 &                         1.050551 \\
162.363636  &                             0.975049 &                                     0.913880 &                                     1.036217 &                          1.053036 &                                  0.882522 &                                  1.223549 &           1.008746 &                   0.965629 &                   1.051864 &               0.977791 &                       0.867890 &                       1.087691 &                 1.008746 &                         0.965629 &                         1.051864 &                 1.008746 &                         0.965629 &                         1.051864 &           1.008746 &                   0.965629 &                   1.051864 &           1.008746 &                   0.965629 &                   1.051864 &                 1.008746 &                         0.965629 &                         1.051864 \\
163.757576  &                             0.974884 &                                     0.912208 &                                     1.037559 &                          1.066692 &                                  0.901717 &                                  1.231666 &           1.009011 &                   0.964831 &                   1.053191 &               0.979150 &                       0.865820 &                       1.092480 &                 1.009011 &                         0.964831 &                         1.053191 &                 1.009011 &                         0.964831 &                         1.053191 &           1.009011 &                   0.964831 &                   1.053191 &           1.009011 &                   0.964831 &                   1.053191 &                 1.009011 &                         0.964831 &                         1.053191 \\
165.151515  &                             0.974726 &                                     0.910517 &                                     1.038935 &                          1.060763 &                                  0.891914 &                                  1.229612 &           1.009273 &                   0.964012 &                   1.054533 &               0.980504 &                       0.863602 &                       1.097406 &                 1.009273 &                         0.964012 &                         1.054533 &                 1.009273 &                         0.964012 &                         1.054533 &           1.009273 &                   0.964012 &                   1.054533 &           1.009273 &                   0.964012 &                   1.054533 &                 1.009273 &                         0.964012 &                         1.054533 \\
166.545455  &                             0.974574 &                                     0.908808 &                                     1.040341 &                          1.043456 &                                  0.862568 &                                  1.224343 &           1.009531 &                   0.963172 &                   1.055890 &               0.981850 &                       0.861226 &                       1.102475 &                 1.009531 &                         0.963172 &                         1.055890 &                 1.009531 &                         0.963172 &                         1.055890 &           1.009531 &                   0.963172 &                   1.055890 &           1.009531 &                   0.963172 &                   1.055890 &                 1.009531 &                         0.963172 &                         1.055890 \\
167.939394  &                             0.974429 &                                     0.907081 &                                     1.041777 &                          1.022941 &                                  0.826278 &                                  1.219605 &           1.009786 &                   0.962313 &                   1.057260 &               0.983185 &                       0.858680 &                       1.107689 &                 1.009786 &                         0.962313 &                         1.057260 &                 1.009786 &                         0.962313 &                         1.057260 &           1.009786 &                   0.962313 &                   1.057260 &           1.009786 &                   0.962313 &                   1.057260 &                 1.009786 &                         0.962313 &                         1.057260 \\
169.333333  &                             0.974289 &                                     0.905336 &                                     1.043241 &                          1.004650 &                                  0.791081 &                                  1.218220 &           1.010039 &                   0.961434 &                   1.058644 &               0.984506 &                       0.855956 &                       1.113056 &                 1.010039 &                         0.961434 &                         1.058644 &                 1.010039 &                         0.961434 &                         1.058644 &           1.010039 &                   0.961434 &                   1.058644 &           1.010039 &                   0.961434 &                   1.058644 &                 1.010039 &                         0.961434 &                         1.058644 \\
170.727273  &                             0.974153 &                                     0.903574 &                                     1.044732 &                          0.989292 &                                  0.757176 &                                  1.221409 &           1.010289 &                   0.960538 &                   1.060041 &               0.985814 &                       0.853041 &                       1.118586 &                 1.010289 &                         0.960538 &                         1.060041 &                 1.010289 &                         0.960538 &                         1.060041 &           1.010289 &                   0.960538 &                   1.060041 &           1.010289 &                   0.960538 &                   1.060041 &                 1.010289 &                         0.960538 &                         1.060041 \\
172.121212  &                             0.974022 &                                     0.901796 &                                     1.046249 &                          0.977110 &                                  0.725336 &                                  1.228885 &           1.010537 &                   0.959625 &                   1.061450 &               0.987108 &                       0.849927 &                       1.124288 &                 1.010537 &                         0.959625 &                         1.061450 &                 1.010537 &                         0.959625 &                         1.061450 &           1.010537 &                   0.959625 &                   1.061450 &           1.010537 &                   0.959625 &                   1.061450 &                 1.010537 &                         0.959625 &                         1.061450 \\
173.515152  &                             0.973896 &                                     0.900000 &                                     1.047791 &                          0.968347 &                                  0.698134 &                                  1.238561 &           1.010783 &                   0.958694 &                   1.062872 &               0.988388 &                       0.846606 &                       1.130169 &                 1.010783 &                         0.958694 &                         1.062872 &                 1.010783 &                         0.958694 &                         1.062872 &           1.010783 &                   0.958694 &                   1.062872 &           1.010783 &                   0.958694 &                   1.062872 &                 1.010783 &                         0.958694 &                         1.062872 \\
174.909091  &                             0.973773 &                                     0.898189 &                                     1.049356 &                          0.963246 &                                  0.679214 &                                  1.247278 &           1.011027 &                   0.957748 &                   1.064306 &               0.989654 &                       0.843072 &                       1.136237 &                 1.011027 &                         0.957748 &                         1.064306 &                 1.011027 &                         0.957748 &                         1.064306 &           1.011027 &                   0.957748 &                   1.064306 &           1.011027 &                   0.957748 &                   1.064306 &                 1.011027 &                         0.957748 &                         1.064306 \\
176.303030  &                             0.973653 &                                     0.896362 &                                     1.050944 &                          0.962029 &                                  0.671941 &                                  1.252118 &           1.011269 &                   0.956786 &                   1.065751 &               0.990907 &                       0.839320 &                       1.142494 &                 1.011269 &                         0.956786 &                         1.065751 &                 1.011269 &                         0.956786 &                         1.065751 &           1.011269 &                   0.956786 &                   1.065751 &           1.011269 &                   0.956786 &                   1.065751 &                 1.011269 &                         0.956786 &                         1.065751 \\
177.696970  &                             0.973537 &                                     0.894521 &                                     1.052554 &                          0.964397 &                                  0.674925 &                                  1.253868 &           1.011509 &                   0.955810 &                   1.067208 &               0.992146 &                       0.835348 &                       1.148944 &                 1.011509 &                         0.955810 &                         1.067208 &                 1.011509 &                         0.955810 &                         1.067208 &           1.011509 &                   0.955810 &                   1.067208 &           1.011509 &                   0.955810 &                   1.067208 &                 1.011509 &                         0.955810 &                         1.067208 \\
179.090909  &                             0.973424 &                                     0.892664 &                                     1.054184 &                          0.969480 &                                  0.682062 &                                  1.256898 &           1.011748 &                   0.954820 &                   1.068676 &               0.993372 &                       0.831153 &                       1.155591 &                 1.011748 &                         0.954820 &                         1.068676 &                 1.011748 &                         0.954820 &                         1.068676 &           1.011748 &                   0.954820 &                   1.068676 &           1.011748 &                   0.954820 &                   1.068676 &                 1.011748 &                         0.954820 &                         1.068676 \\
180.484848  &                             0.973313 &                                     0.890794 &                                     1.055833 &                          0.976385 &                                  0.687753 &                                  1.265017 &           1.011985 &                   0.953817 &                   1.070154 &               0.994586 &                       0.826738 &                       1.162435 &                 1.011985 &                         0.953817 &                         1.070154 &                 1.011985 &                         0.953817 &                         1.070154 &           1.011985 &                   0.953817 &                   1.070154 &           1.011985 &                   0.953817 &                   1.070154 &                 1.011985 &                         0.953817 &                         1.070154 \\
181.878788  &                             0.973205 &                                     0.888909 &                                     1.057501 &                          0.984217 &                                  0.688908 &                                  1.279526 &           1.012221 &                   0.952801 &                   1.071642 &               0.995789 &                       0.822104 &                       1.169474 &                 1.012221 &                         0.952801 &                         1.071642 &                 1.012221 &                         0.952801 &                         1.071642 &           1.012221 &                   0.952801 &                   1.071642 &           1.012221 &                   0.952801 &                   1.071642 &                 1.012221 &                         0.952801 &                         1.071642 \\
183.272727  &                             0.973099 &                                     0.887012 &                                     1.059186 &                          0.992079 &                                  0.685874 &                                  1.298284 &           1.012456 &                   0.951773 &                   1.073139 &               0.996981 &                       0.817255 &                       1.176706 &                 1.012456 &                         0.951773 &                         1.073139 &                 1.012456 &                         0.951773 &                         1.073139 &           1.012456 &                   0.951773 &                   1.073139 &           1.012456 &                   0.951773 &                   1.073139 &                 1.012456 &                         0.951773 &                         1.073139 \\
184.666667  &                             0.972995 &                                     0.885102 &                                     1.060888 &                          0.999117 &                                  0.681763 &                                  1.316471 &           1.012690 &                   0.950734 &                   1.074646 &               0.998163 &                       0.812198 &                       1.184128 &                 1.012690 &                         0.950734 &                         1.074646 &                 1.012690 &                         0.950734 &                         1.074646 &           1.012690 &                   0.950734 &                   1.074646 &           1.012690 &                   0.950734 &                   1.074646 &                 1.012690 &                         0.950734 &                         1.074646 \\
186.060606  &                             0.972893 &                                     0.883180 &                                     1.062605 &                          1.004970 &                                  0.679795 &                                  1.330145 &           1.012923 &                   0.949685 &                   1.076162 &               0.999335 &                       0.806938 &                       1.191733 &                 1.012923 &                         0.949685 &                         1.076162 &                 1.012923 &                         0.949685 &                         1.076162 &           1.012923 &                   0.949685 &                   1.076162 &           1.012923 &                   0.949685 &                   1.076162 &                 1.012923 &                         0.949685 &                         1.076162 \\
187.454545  &                             0.972792 &                                     0.881247 &                                     1.064337 &                          1.009613 &                                  0.681609 &                                  1.337617 &           1.013155 &                   0.948625 &                   1.077686 &               1.000499 &                       0.801482 &                       1.199517 &                 1.013155 &                         0.948625 &                         1.077686 &                 1.013155 &                         0.948625 &                         1.077686 &           1.013155 &                   0.948625 &                   1.077686 &           1.013155 &                   0.948625 &                   1.077686 &                 1.013155 &                         0.948625 &                         1.077686 \\
188.848485  &                             0.972692 &                                     0.879302 &                                     1.066082 &                          1.013030 &                                  0.687745 &                                  1.338314 &           1.013387 &                   0.947556 &                   1.079218 &               1.001656 &                       0.795838 &                       1.207474 &                 1.013387 &                         0.947556 &                         1.079218 &                 1.013387 &                         0.947556 &                         1.079218 &           1.013387 &                   0.947556 &                   1.079218 &           1.013387 &                   0.947556 &                   1.079218 &                 1.013387 &                         0.947556 &                         1.079218 \\
190.242424  &                             0.972594 &                                     0.877347 &                                     1.067841 &                          1.015201 &                                  0.697913 &                                  1.332489 &           1.013618 &                   0.946478 &                   1.080757 &               1.002806 &                       0.790016 &                       1.215595 &                 1.013618 &                         0.946478 &                         1.080757 &                 1.013618 &                         0.946478 &                         1.080757 &           1.013618 &                   0.946478 &                   1.080757 &           1.013618 &                   0.946478 &                   1.080757 &                 1.013618 &                         0.946478 &                         1.080757 \\
191.636364  &                             0.972497 &                                     0.875382 &                                     1.069611 &                          1.016110 &                                  0.711045 &                                  1.321176 &           1.013848 &                   0.945392 &                   1.082304 &               1.003949 &                       0.784025 &                       1.223873 &                 1.013848 &                         0.945392 &                         1.082304 &                 1.013848 &                         0.945392 &                         1.082304 &           1.013848 &                   0.945392 &                   1.082304 &           1.013848 &                   0.945392 &                   1.082304 &                 1.013848 &                         0.945392 &                         1.082304 \\
193.030303  &                             0.972400 &                                     0.873407 &                                     1.071393 &                          1.015758 &                                  0.725107 &                                  1.306409 &           1.014078 &                   0.944298 &                   1.083858 &               1.005088 &                       0.777877 &                       1.232298 &                 1.014078 &                         0.944298 &                         1.083858 &                 1.014078 &                         0.944298 &                         1.083858 &           1.014078 &                   0.944298 &                   1.083858 &           1.014078 &                   0.944298 &                   1.083858 &                 1.014078 &                         0.944298 &                         1.083858 \\
194.424242  &                             0.972304 &                                     0.871424 &                                     1.073185 &                          1.014274 &                                  0.736649 &                                  1.291899 &           1.014307 &                   0.943196 &                   1.085418 &               1.006222 &                       0.771582 &                       1.240862 &                 1.014307 &                         0.943196 &                         1.085418 &                 1.014307 &                         0.943196 &                         1.085418 &           1.014307 &                   0.943196 &                   1.085418 &           1.014307 &                   0.943196 &                   1.085418 &                 1.014307 &                         0.943196 &                         1.085418 \\
195.818182  &                             0.972209 &                                     0.869431 &                                     1.074987 &                          1.011842 &                                  0.741201 &                                  1.282482 &           1.014536 &                   0.942088 &                   1.086985 &               1.007352 &                       0.765151 &                       1.249553 &                 1.014536 &                         0.942088 &                         1.086985 &                 1.014536 &                         0.942088 &                         1.086985 &           1.014536 &                   0.942088 &                   1.086985 &           1.014536 &                   0.942088 &                   1.086985 &                 1.014536 &                         0.942088 &                         1.086985 \\
197.212121  &                             0.972115 &                                     0.867431 &                                     1.076798 &                          1.008644 &                                  0.734364 &                                  1.282925 &           1.014765 &                   0.940973 &                   1.088557 &               1.008480 &                       0.758596 &                       1.258363 &                 1.014765 &                         0.940973 &                         1.088557 &                 1.014765 &                         0.940973 &                         1.088557 &           1.014765 &                   0.940973 &                   1.088557 &           1.014765 &                   0.940973 &                   1.088557 &                 1.014765 &                         0.940973 &                         1.088557 \\
198.606061  &                             0.972020 &                                     0.865423 &                                     1.078618 &                          1.004866 &                                  0.713461 &                                  1.296271 &           1.014994 &                   0.939853 &                   1.090135 &               1.009605 &                       0.751928 &                       1.267282 &                 1.014994 &                         0.939853 &                         1.090135 &                 1.014994 &                         0.939853 &                         1.090135 &           1.014994 &                   0.939853 &                   1.090135 &           1.014994 &                   0.939853 &                   1.090135 &                 1.014994 &                         0.939853 &                         1.090135 \\
200.000000  &                             0.971926 &                                     0.863407 &                                     1.080445 &                          1.000690 &                                  0.678685 &                                  1.322694 &           1.015222 &                   0.938727 &                   1.091718 &               1.010728 &                       0.745159 &                       1.276297 &                 1.015222 &                         0.938727 &                         1.091718 &                 1.015222 &                         0.938727 &                         1.091718 &           1.015222 &                   0.938727 &                   1.091718 &           1.015222 &                   0.938727 &                   1.091718 &                 1.015222 &                         0.938727 &                         1.091718 \\
\bottomrule
\end{tabular}
