\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
62.015504   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999982 &                                  0.845932 &                                  1.154031 &                1.0 &                        1.0 &                        1.0 &               0.811336 &                       0.688126 &                       0.934545 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
63.409287   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999978 &                                  0.874217 &                                  1.125740 &                1.0 &                        1.0 &                        1.0 &               0.820863 &                       0.703310 &                       0.938416 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
64.803069   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999990 &                                  0.893183 &                                  1.106797 &                1.0 &                        1.0 &                        1.0 &               0.830396 &                       0.718388 &                       0.942404 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
66.196852   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000010 &                                  0.906710 &                                  1.093309 &                1.0 &                        1.0 &                        1.0 &               0.839926 &                       0.733335 &                       0.946518 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
67.590635   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000030 &                                  0.916347 &                                  1.083713 &                1.0 &                        1.0 &                        1.0 &               0.849445 &                       0.748122 &                       0.950768 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
68.984418   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000043 &                                  0.923388 &                                  1.076698 &                1.0 &                        1.0 &                        1.0 &               0.858943 &                       0.762722 &                       0.955165 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
70.378201   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000042 &                                  0.930443 &                                  1.069641 &                1.0 &                        1.0 &                        1.0 &               0.868413 &                       0.777105 &                       0.959721 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
71.771983   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000023 &                                  0.939811 &                                  1.060236 &                1.0 &                        1.0 &                        1.0 &               0.877830 &                       0.791224 &                       0.964436 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
73.165766   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999995 &                                  0.949446 &                                  1.050545 &                1.0 &                        1.0 &                        1.0 &               0.887141 &                       0.804998 &                       0.969283 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
74.559549   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999966 &                                  0.954638 &                                  1.045295 &                1.0 &                        1.0 &                        1.0 &               0.896284 &                       0.818341 &                       0.974228 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
75.953332   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999946 &                                  0.952816 &                                  1.047076 &                1.0 &                        1.0 &                        1.0 &               0.905201 &                       0.831167 &                       0.979235 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
77.347115   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999944 &                                  0.947731 &                                  1.052156 &                1.0 &                        1.0 &                        1.0 &               0.913831 &                       0.843394 &                       0.984267 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
78.740897   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999968 &                                  0.945213 &                                  1.054722 &                1.0 &                        1.0 &                        1.0 &               0.922114 &                       0.854946 &                       0.989282 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
80.134680   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000018 &                                  0.946842 &                                  1.053193 &                1.0 &                        1.0 &                        1.0 &               0.930004 &                       0.865760 &                       0.994248 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
81.528463   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000079 &                                  0.949057 &                                  1.051102 &                1.0 &                        1.0 &                        1.0 &               0.937475 &                       0.875800 &                       0.999150 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
82.922246   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000136 &                                  0.948442 &                                  1.051830 &                1.0 &                        1.0 &                        1.0 &               0.944503 &                       0.885042 &                       1.003964 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
84.316029   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000173 &                                  0.945071 &                                  1.055275 &                1.0 &                        1.0 &                        1.0 &               0.951062 &                       0.893466 &                       1.008658 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
85.709811   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000174 &                                  0.942447 &                                  1.057902 &                1.0 &                        1.0 &                        1.0 &               0.957128 &                       0.901068 &                       1.013189 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
87.103594   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000125 &                                  0.944513 &                                  1.055736 &                1.0 &                        1.0 &                        1.0 &               0.962678 &                       0.907851 &                       1.017506 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
88.497377   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000032 &                                  0.950927 &                                  1.049136 &                1.0 &                        1.0 &                        1.0 &               0.967703 &                       0.913837 &                       1.021568 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
89.891160   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999923 &                                  0.956667 &                                  1.043178 &                1.0 &                        1.0 &                        1.0 &               0.972205 &                       0.919064 &                       1.025346 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
91.284942   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999826 &                                  0.956727 &                                  1.042925 &                1.0 &                        1.0 &                        1.0 &               0.976192 &                       0.923575 &                       1.028808 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
92.678725   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999769 &                                  0.951664 &                                  1.047875 &                1.0 &                        1.0 &                        1.0 &               0.979666 &                       0.927413 &                       1.031919 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
94.072508   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999781 &                                  0.947041 &                                  1.052521 &                1.0 &                        1.0 &                        1.0 &               0.982634 &                       0.930623 &                       1.034646 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
95.466291   &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999885 &                                  0.947529 &                                  1.052241 &                1.0 &                        1.0 &                        1.0 &               0.985102 &                       0.933247 &                       1.036957 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
96.860074   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000056 &                                  0.951872 &                                  1.048240 &                1.0 &                        1.0 &                        1.0 &               0.987084 &                       0.935328 &                       1.038840 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
98.253856   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000242 &                                  0.955119 &                                  1.045364 &                1.0 &                        1.0 &                        1.0 &               0.988603 &                       0.936911 &                       1.040296 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
99.647639   &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000390 &                                  0.953750 &                                  1.047030 &                1.0 &                        1.0 &                        1.0 &               0.989681 &                       0.938033 &                       1.041328 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
101.041422  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000448 &                                  0.949321 &                                  1.051574 &                1.0 &                        1.0 &                        1.0 &               0.990337 &                       0.938732 &                       1.041942 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
102.435205  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000363 &                                  0.946548 &                                  1.054177 &                1.0 &                        1.0 &                        1.0 &               0.990596 &                       0.939044 &                       1.042147 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
103.828988  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000101 &                                  0.948592 &                                  1.051610 &                1.0 &                        1.0 &                        1.0 &               0.990478 &                       0.939001 &                       1.041954 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
105.222770  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999741 &                                  0.952483 &                                  1.046999 &                1.0 &                        1.0 &                        1.0 &               0.990012 &                       0.938630 &                       1.041393 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
106.616553  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999398 &                                  0.952540 &                                  1.046257 &                1.0 &                        1.0 &                        1.0 &               0.989229 &                       0.937958 &                       1.040499 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
108.010336  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999191 &                                  0.946537 &                                  1.051844 &                1.0 &                        1.0 &                        1.0 &               0.988159 &                       0.937008 &                       1.039309 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
109.404119  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999234 &                                  0.938302 &                                  1.060166 &                1.0 &                        1.0 &                        1.0 &               0.986832 &                       0.935803 &                       1.037860 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
110.797901  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999645 &                                  0.933288 &                                  1.066002 &                1.0 &                        1.0 &                        1.0 &               0.985279 &                       0.934368 &                       1.036189 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
112.191684  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.000469 &                                  0.934279 &                                  1.066659 &                1.0 &                        1.0 &                        1.0 &               0.983532 &                       0.932726 &                       1.034338 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
113.585467  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.001513 &                                  0.938618 &                                  1.064409 &                1.0 &                        1.0 &                        1.0 &               0.981628 &                       0.930900 &                       1.032355 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
114.979250  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.002534 &                                  0.942548 &                                  1.062520 &                1.0 &                        1.0 &                        1.0 &               0.979604 &                       0.928916 &                       1.030293 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
116.373033  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.003286 &                                  0.944062 &                                  1.062511 &                1.0 &                        1.0 &                        1.0 &               0.977500 &                       0.926801 &                       1.028199 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
117.766815  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.003528 &                                  0.944331 &                                  1.062725 &                1.0 &                        1.0 &                        1.0 &               0.975353 &                       0.924586 &                       1.026120 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
119.160598  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.003016 &                                  0.946660 &                                  1.059373 &                1.0 &                        1.0 &                        1.0 &               0.973201 &                       0.922304 &                       1.024099 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
120.554381  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.001710 &                                  0.952771 &                                  1.050649 &                1.0 &                        1.0 &                        1.0 &               0.971083 &                       0.919986 &                       1.022180 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
121.948164  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999977 &                                  0.959575 &                                  1.040379 &                1.0 &                        1.0 &                        1.0 &               0.969034 &                       0.917661 &                       1.020407 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
123.341947  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.998232 &                                  0.961832 &                                  1.034633 &                1.0 &                        1.0 &                        1.0 &               0.967092 &                       0.915359 &                       1.018825 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
124.735729  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.996893 &                                  0.957532 &                                  1.036254 &                1.0 &                        1.0 &                        1.0 &               0.965293 &                       0.913111 &                       1.017475 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
126.129512  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.996374 &                                  0.951851 &                                  1.040896 &                1.0 &                        1.0 &                        1.0 &               0.963674 &                       0.910952 &                       1.016396 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
127.523295  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.997081 &                                  0.951039 &                                  1.043122 &                1.0 &                        1.0 &                        1.0 &               0.962271 &                       0.908920 &                       1.015622 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
128.917078  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999016 &                                  0.955847 &                                  1.042185 &                1.0 &                        1.0 &                        1.0 &               0.961103 &                       0.907031 &                       1.015175 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
130.310861  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.001677 &                                  0.961350 &                                  1.042003 &                1.0 &                        1.0 &                        1.0 &               0.960168 &                       0.905281 &                       1.015056 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
131.704643  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.004527 &                                  0.963083 &                                  1.045971 &                1.0 &                        1.0 &                        1.0 &               0.959463 &                       0.903664 &                       1.015262 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
133.098426  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.007030 &                                  0.961168 &                                  1.052893 &                1.0 &                        1.0 &                        1.0 &               0.958983 &                       0.902178 &                       1.015788 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
134.492209  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.008652 &                                  0.959030 &                                  1.058274 &                1.0 &                        1.0 &                        1.0 &               0.958725 &                       0.900824 &                       1.016626 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
135.885992  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.008745 &                                  0.958343 &                                  1.059147 &                1.0 &                        1.0 &                        1.0 &               0.958685 &                       0.899605 &                       1.017765 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
137.279774  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.004923 &                                  0.952562 &                                  1.057285 &                1.0 &                        1.0 &                        1.0 &               0.958850 &                       0.898509 &                       1.019191 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
138.673557  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.993418 &                                  0.932653 &                                  1.054183 &                1.0 &                        1.0 &                        1.0 &               0.959199 &                       0.897516 &                       1.020883 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
140.067340  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.970423 &                                  0.896445 &                                  1.044401 &                1.0 &                        1.0 &                        1.0 &               0.959715 &                       0.896607 &                       1.022822 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
141.461123  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.932133 &                                  0.845758 &                                  1.018507 &                1.0 &                        1.0 &                        1.0 &               0.960375 &                       0.895762 &                       1.024988 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
142.854906  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.874741 &                                  0.781814 &                                  0.967667 &                1.0 &                        1.0 &                        1.0 &               0.961161 &                       0.894963 &                       1.027358 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
144.248688  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.795750 &                                  0.704002 &                                  0.887498 &                1.0 &                        1.0 &                        1.0 &               0.962052 &                       0.894191 &                       1.029914 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
145.642471  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.703517 &                                  0.614583 &                                  0.792450 &                1.0 &                        1.0 &                        1.0 &               0.963037 &                       0.893431 &                       1.032642 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
147.036254  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.611762 &                                  0.518958 &                                  0.704567 &                1.0 &                        1.0 &                        1.0 &               0.964103 &                       0.892670 &                       1.035537 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
148.430037  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.534247 &                                  0.429146 &                                  0.639347 &                1.0 &                        1.0 &                        1.0 &               0.965241 &                       0.891894 &                       1.038589 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
149.823820  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.484730 &                                  0.364679 &                                  0.604781 &                1.0 &                        1.0 &                        1.0 &               0.966441 &                       0.891090 &                       1.041791 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
151.217602  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.476972 &                                  0.346771 &                                  0.607173 &                1.0 &                        1.0 &                        1.0 &               0.967690 &                       0.890246 &                       1.045134 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
152.611385  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.520472 &                                  0.389205 &                                  0.651739 &                1.0 &                        1.0 &                        1.0 &               0.968980 &                       0.889351 &                       1.048609 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
154.005168  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.604392 &                                  0.477604 &                                  0.731180 &                1.0 &                        1.0 &                        1.0 &               0.970303 &                       0.888394 &                       1.052212 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
155.398951  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.711833 &                                  0.589527 &                                  0.834138 &                1.0 &                        1.0 &                        1.0 &               0.971653 &                       0.887365 &                       1.055942 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
156.792734  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.825892 &                                  0.705047 &                                  0.946737 &                1.0 &                        1.0 &                        1.0 &               0.973024 &                       0.886254 &                       1.059794 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
158.186516  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.929670 &                                  0.808747 &                                  1.050593 &                1.0 &                        1.0 &                        1.0 &               0.974408 &                       0.885052 &                       1.063765 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
159.580299  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.006273 &                                  0.888595 &                                  1.123950 &                1.0 &                        1.0 &                        1.0 &               0.975801 &                       0.883750 &                       1.067851 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
160.974082  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.045071 &                                  0.937099 &                                  1.153044 &                1.0 &                        1.0 &                        1.0 &               0.977195 &                       0.882340 &                       1.072050 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
162.367865  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.053122 &                                  0.957173 &                                  1.149070 &                1.0 &                        1.0 &                        1.0 &               0.978587 &                       0.880811 &                       1.076364 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
163.761647  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.040575 &                                  0.952850 &                                  1.128300 &                1.0 &                        1.0 &                        1.0 &               0.979975 &                       0.879153 &                       1.080798 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
165.155430  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.017585 &                                  0.931217 &                                  1.103952 &                1.0 &                        1.0 &                        1.0 &               0.981355 &                       0.877358 &                       1.085353 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
166.549213  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.994302 &                                  0.904806 &                                  1.083798 &                1.0 &                        1.0 &                        1.0 &               0.982724 &                       0.875414 &                       1.090035 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
167.942996  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.980817 &                                  0.886473 &                                  1.075161 &                1.0 &                        1.0 &                        1.0 &               0.984079 &                       0.873314 &                       1.094844 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
169.336779  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.982122 &                                  0.875598 &                                  1.088646 &                1.0 &                        1.0 &                        1.0 &               0.985418 &                       0.871047 &                       1.099788 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
170.730561  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.994433 &                                  0.861283 &                                  1.127582 &                1.0 &                        1.0 &                        1.0 &               0.986740 &                       0.868604 &                       1.104876 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
172.124344  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.013096 &                                  0.843258 &                                  1.182934 &                1.0 &                        1.0 &                        1.0 &               0.988046 &                       0.865975 &                       1.110117 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
173.518127  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.033459 &                                  0.826734 &                                  1.240184 &                1.0 &                        1.0 &                        1.0 &               0.989336 &                       0.863154 &                       1.115518 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
174.911910  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.050870 &                                  0.816693 &                                  1.285046 &                1.0 &                        1.0 &                        1.0 &               0.990610 &                       0.860135 &                       1.121085 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
176.305693  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.060791 &                                  0.816796 &                                  1.304787 &                1.0 &                        1.0 &                        1.0 &               0.991868 &                       0.856914 &                       1.126823 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
177.699475  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.061775 &                                  0.826862 &                                  1.296689 &                1.0 &                        1.0 &                        1.0 &               0.993111 &                       0.853487 &                       1.132735 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
179.093258  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.055707 &                                  0.842597 &                                  1.268817 &                1.0 &                        1.0 &                        1.0 &               0.994339 &                       0.849854 &                       1.138825 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
180.487041  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.044639 &                                  0.858206 &                                  1.231072 &                1.0 &                        1.0 &                        1.0 &               0.995554 &                       0.846016 &                       1.145092 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
181.880824  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.030621 &                                  0.866773 &                                  1.194470 &                1.0 &                        1.0 &                        1.0 &               0.996756 &                       0.841975 &                       1.151537 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
183.274607  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.015706 &                                  0.862612 &                                  1.168800 &                1.0 &                        1.0 &                        1.0 &               0.997946 &                       0.837736 &                       1.158156 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
184.668389  &                                  1.0 &                                          1.0 &                                          1.0 &                          1.001860 &                                  0.846637 &                                  1.157082 &                1.0 &                        1.0 &                        1.0 &               0.999125 &                       0.833303 &                       1.164947 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
186.062172  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.989990 &                                  0.825584 &                                  1.154396 &                1.0 &                        1.0 &                        1.0 &               1.000294 &                       0.828683 &                       1.171904 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
187.455955  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.980284 &                                  0.805512 &                                  1.155055 &                1.0 &                        1.0 &                        1.0 &               1.001453 &                       0.823883 &                       1.179024 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
188.849738  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.972914 &                                  0.790370 &                                  1.155459 &                1.0 &                        1.0 &                        1.0 &               1.002604 &                       0.818909 &                       1.186299 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
190.243520  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.968056 &                                  0.782420 &                                  1.153692 &                1.0 &                        1.0 &                        1.0 &               1.003748 &                       0.813772 &                       1.193724 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
191.637303  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.965882 &                                  0.782807 &                                  1.148956 &                1.0 &                        1.0 &                        1.0 &               1.004885 &                       0.808480 &                       1.201290 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
193.031086  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.966511 &                                  0.791620 &                                  1.141402 &                1.0 &                        1.0 &                        1.0 &               1.006017 &                       0.803044 &                       1.208989 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
194.424869  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.969687 &                                  0.806780 &                                  1.132594 &                1.0 &                        1.0 &                        1.0 &               1.007144 &                       0.797474 &                       1.216813 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
195.818652  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.974999 &                                  0.824509 &                                  1.125488 &                1.0 &                        1.0 &                        1.0 &               1.008266 &                       0.791779 &                       1.224753 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
197.212434  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.982032 &                                  0.839733 &                                  1.124330 &                1.0 &                        1.0 &                        1.0 &               1.009386 &                       0.785971 &                       1.232801 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
198.606217  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.990373 &                                  0.847002 &                                  1.133744 &                1.0 &                        1.0 &                        1.0 &               1.010503 &                       0.780061 &                       1.240945 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
200.000000  &                                  1.0 &                                          1.0 &                                          1.0 &                          0.999610 &                                  0.843069 &                                  1.156150 &                1.0 &                        1.0 &                        1.0 &               1.011618 &                       0.774059 &                       1.249178 &                      1.0 &                              1.0 &                              1.0 &                      1.0 &                              1.0 &                              1.0 &                1.0 &                        1.0 &                        1.0 &                1.0 &                        1.0 &                        1.0 &                      1.0 &                              1.0 &                              1.0 \\
\bottomrule
\end{tabular}
