\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
70.000000   &                             0.999865 &                                     0.999568 &                                     1.000161 &                          0.999865 &                                  0.999568 &                                  1.000161 &           0.999865 &                   0.999568 &                   1.000161 &               0.908054 &                       0.770359 &                       1.045748 &                 0.908054 &                         0.770359 &                         1.045748 &                 0.908054 &                         0.770359 &                         1.045748 &           0.999865 &                   0.999568 &                   1.000161 &           0.999865 &                   0.999568 &                   1.000161 &                 0.999865 &                         0.999568 &                         1.000161 \\
71.313131   &                             1.000977 &                                     1.000707 &                                     1.001247 &                          1.000977 &                                  1.000707 &                                  1.001247 &           1.000977 &                   1.000707 &                   1.001247 &               0.905473 &                       0.767999 &                       1.042947 &                 0.905473 &                         0.767999 &                         1.042947 &                 0.905473 &                         0.767999 &                         1.042947 &           1.000977 &                   1.000707 &                   1.001247 &           1.000977 &                   1.000707 &                   1.001247 &                 1.000977 &                         1.000707 &                         1.001247 \\
72.626263   &                             1.001191 &                                     1.000897 &                                     1.001484 &                          1.001191 &                                  1.000897 &                                  1.001484 &           1.001191 &                   1.000897 &                   1.001484 &               0.903374 &                       0.766059 &                       1.040689 &                 0.903374 &                         0.766059 &                         1.040689 &                 0.903374 &                         0.766059 &                         1.040689 &           1.001191 &                   1.000897 &                   1.001484 &           1.001191 &                   1.000897 &                   1.001484 &                 1.001191 &                         1.000897 &                         1.001484 \\
73.939394   &                             1.000817 &                                     1.000473 &                                     1.001161 &                          1.000817 &                                  1.000473 &                                  1.001161 &           1.000817 &                   1.000473 &                   1.001161 &               0.901743 &                       0.764540 &                       1.038946 &                 0.901743 &                         0.764540 &                         1.038946 &                 0.901743 &                         0.764540 &                         1.038946 &           1.000817 &                   1.000473 &                   1.001161 &           1.000817 &                   1.000473 &                   1.001161 &                 1.000817 &                         1.000473 &                         1.001161 \\
75.252525   &                             1.000167 &                                     0.999781 &                                     1.000554 &                          1.000167 &                                  0.999781 &                                  1.000554 &           1.000167 &                   0.999781 &                   1.000554 &               0.900567 &                       0.763443 &                       1.037690 &                 0.900567 &                         0.763443 &                         1.037690 &                 0.900567 &                         0.763443 &                         1.037690 &           1.000167 &                   0.999781 &                   1.000554 &           1.000167 &                   0.999781 &                   1.000554 &                 1.000167 &                         0.999781 &                         1.000554 \\
76.565657   &                             0.999553 &                                     0.999158 &                                     0.999948 &                          0.999553 &                                  0.999158 &                                  0.999948 &           0.999553 &                   0.999158 &                   0.999948 &               0.899831 &                       0.762767 &                       1.036895 &                 0.899831 &                         0.762767 &                         1.036895 &                 0.899831 &                         0.762767 &                         1.036895 &           0.999553 &                   0.999158 &                   0.999948 &           0.999553 &                   0.999158 &                   0.999948 &                 0.999553 &                         0.999158 &                         0.999948 \\
77.878788   &                             0.999286 &                                     0.998918 &                                     0.999654 &                          0.999286 &                                  0.998918 &                                  0.999654 &           0.999286 &                   0.998918 &                   0.999654 &               0.899524 &                       0.762509 &                       1.036539 &                 0.899524 &                         0.762509 &                         1.036539 &                 0.899524 &                         0.762509 &                         1.036539 &           0.999286 &                   0.998918 &                   0.999654 &           0.999286 &                   0.998918 &                   0.999654 &                 0.999286 &                         0.998918 &                         0.999654 \\
79.191919   &                             0.999550 &                                     0.999188 &                                     0.999912 &                          0.999550 &                                  0.999188 &                                  0.999912 &           0.999550 &                   0.999188 &                   0.999912 &               0.899631 &                       0.762659 &                       1.036603 &                 0.899631 &                         0.762659 &                         1.036603 &                 0.899631 &                         0.762659 &                         1.036603 &           0.999550 &                   0.999188 &                   0.999912 &           0.999550 &                   0.999188 &                   0.999912 &                 0.999550 &                         0.999188 &                         0.999912 \\
80.505051   &                             1.000230 &                                     0.999761 &                                     1.000699 &                          1.000230 &                                  0.999761 &                                  1.000699 &           1.000230 &                   0.999761 &                   1.000699 &               0.900139 &                       0.763200 &                       1.037078 &                 0.900139 &                         0.763200 &                         1.037078 &                 0.900139 &                         0.763200 &                         1.037078 &           1.000230 &                   0.999761 &                   1.000699 &           1.000230 &                   0.999761 &                   1.000699 &                 1.000230 &                         0.999761 &                         1.000699 \\
81.818182   &                             1.001169 &                                     1.000500 &                                     1.001838 &                          1.001169 &                                  1.000500 &                                  1.001838 &           1.001169 &                   1.000500 &                   1.001838 &               0.901035 &                       0.764111 &                       1.037959 &                 0.901035 &                         0.764111 &                         1.037959 &                 0.901035 &                         0.764111 &                         1.037959 &           1.001169 &                   1.000500 &                   1.001838 &           1.001169 &                   1.000500 &                   1.001838 &                 1.001169 &                         1.000500 &                         1.001838 \\
83.131313   &                             1.002206 &                                     1.001312 &                                     1.003100 &                          1.002206 &                                  1.001312 &                                  1.003100 &           1.002206 &                   1.001312 &                   1.003100 &               0.902306 &                       0.765368 &                       1.039244 &                 0.902306 &                         0.765368 &                         1.039244 &                 0.902306 &                         0.765368 &                         1.039244 &           1.002206 &                   1.001312 &                   1.003100 &           1.002206 &                   1.001312 &                   1.003100 &                 1.002206 &                         1.001312 &                         1.003100 \\
84.444444   &                             1.003184 &                                     1.002090 &                                     1.004278 &                          1.003184 &                                  1.002090 &                                  1.004278 &           1.003184 &                   1.002090 &                   1.004278 &               0.903938 &                       0.766944 &                       1.040933 &                 0.903938 &                         0.766944 &                         1.040933 &                 0.903938 &                         0.766944 &                         1.040933 &           1.003184 &                   1.002090 &                   1.004278 &           1.003184 &                   1.002090 &                   1.004278 &                 1.003184 &                         1.002090 &                         1.004278 \\
85.757576   &                             1.003944 &                                     1.002713 &                                     1.005175 &                          1.003944 &                                  1.002713 &                                  1.005175 &           1.003944 &                   1.002713 &                   1.005175 &               0.905919 &                       0.768811 &                       1.043027 &                 0.905919 &                         0.768811 &                         1.043027 &                 0.905919 &                         0.768811 &                         1.043027 &           1.003944 &                   1.002713 &                   1.005175 &           1.003944 &                   1.002713 &                   1.005175 &                 1.003944 &                         1.002713 &                         1.005175 \\
87.070707   &                             1.004403 &                                     1.003110 &                                     1.005696 &                          1.004403 &                                  1.003110 &                                  1.005696 &           1.004403 &                   1.003110 &                   1.005696 &               0.908228 &                       0.770935 &                       1.045522 &                 0.908228 &                         0.770935 &                         1.045522 &                 0.908228 &                         0.770935 &                         1.045522 &           1.004403 &                   1.003110 &                   1.005696 &           1.004403 &                   1.003110 &                   1.005696 &                 1.004403 &                         1.003110 &                         1.005696 \\
88.383838   &                             1.004584 &                                     1.003287 &                                     1.005881 &                          1.004584 &                                  1.003287 &                                  1.005881 &           1.004584 &                   1.003287 &                   1.005881 &               0.910842 &                       0.773279 &                       1.048404 &                 0.910842 &                         0.773279 &                         1.048404 &                 0.910842 &                         0.773279 &                         1.048404 &           1.004584 &                   1.003287 &                   1.005881 &           1.004584 &                   1.003287 &                   1.005881 &                 1.004584 &                         1.003287 &                         1.005881 \\
89.696970   &                             1.004518 &                                     1.003260 &                                     1.005776 &                          1.004518 &                                  1.003260 &                                  1.005776 &           1.004518 &                   1.003260 &                   1.005776 &               0.913732 &                       0.775810 &                       1.051654 &                 0.913732 &                         0.775810 &                         1.051654 &                 0.913732 &                         0.775810 &                         1.051654 &           1.004518 &                   1.003260 &                   1.005776 &           1.004518 &                   1.003260 &                   1.005776 &                 1.004518 &                         1.003260 &                         1.005776 \\
91.010101   &                             1.004238 &                                     1.003049 &                                     1.005427 &                          1.004238 &                                  1.003049 &                                  1.005427 &           1.004238 &                   1.003049 &                   1.005427 &               0.916873 &                       0.778498 &                       1.055247 &                 0.916873 &                         0.778498 &                         1.055247 &                 0.916873 &                         0.778498 &                         1.055247 &           1.004238 &                   1.003049 &                   1.005427 &           1.004238 &                   1.003049 &                   1.005427 &                 1.004238 &                         1.003049 &                         1.005427 \\
92.323232   &                             1.003775 &                                     1.002679 &                                     1.004871 &                          1.003775 &                                  1.002679 &                                  1.004871 &           1.003775 &                   1.002679 &                   1.004871 &               0.920237 &                       0.781318 &                       1.059155 &                 0.920237 &                         0.781318 &                         1.059155 &                 0.920237 &                         0.781318 &                         1.059155 &           1.003775 &                   1.002679 &                   1.004871 &           1.003775 &                   1.002679 &                   1.004871 &                 1.003775 &                         1.002679 &                         1.004871 \\
93.636364   &                             1.003161 &                                     1.002183 &                                     1.004140 &                          1.003161 &                                  1.002183 &                                  1.004140 &           1.003161 &                   1.002183 &                   1.004140 &               0.923797 &                       0.784253 &                       1.063342 &                 0.923797 &                         0.784253 &                         1.063342 &                 0.923797 &                         0.784253 &                         1.063342 &           1.003161 &                   1.002183 &                   1.004140 &           1.003161 &                   1.002183 &                   1.004140 &                 1.003161 &                         1.002183 &                         1.004140 \\
94.949495   &                             1.002449 &                                     1.001611 &                                     1.003287 &                          1.002449 &                                  1.001611 &                                  1.003287 &           1.002449 &                   1.001611 &                   1.003287 &               0.927514 &                       0.787274 &                       1.067754 &                 0.927514 &                         0.787274 &                         1.067754 &                 0.927514 &                         0.787274 &                         1.067754 &           1.002449 &                   1.001611 &                   1.003287 &           1.002449 &                   1.001611 &                   1.003287 &                 1.002449 &                         1.001611 &                         1.003287 \\
96.262626   &                             1.001706 &                                     1.001023 &                                     1.002389 &                          1.001706 &                                  1.001023 &                                  1.002389 &           1.001706 &                   1.001023 &                   1.002389 &               0.931336 &                       0.790352 &                       1.072319 &                 0.931336 &                         0.790352 &                         1.072319 &                 0.931336 &                         0.790352 &                         1.072319 &           1.001706 &                   1.001023 &                   1.002389 &           1.001706 &                   1.001023 &                   1.002389 &                 1.001706 &                         1.001023 &                         1.002389 \\
97.575758   &                             1.001001 &                                     1.000475 &                                     1.001527 &                          1.001001 &                                  1.000475 &                                  1.001527 &           1.001001 &                   1.000475 &                   1.001527 &               0.935209 &                       0.793457 &                       1.076960 &                 0.935209 &                         0.793457 &                         1.076960 &                 0.935209 &                         0.793457 &                         1.076960 &           1.001001 &                   1.000475 &                   1.001527 &           1.001001 &                   1.000475 &                   1.001527 &                 1.001001 &                         1.000475 &                         1.001527 \\
98.888889   &                             1.000404 &                                     1.000019 &                                     1.000789 &                          1.000404 &                                  1.000019 &                                  1.000789 &           1.000404 &                   1.000019 &                   1.000789 &               0.939082 &                       0.796563 &                       1.081601 &                 0.939082 &                         0.796563 &                         1.081601 &                 0.939082 &                         0.796563 &                         1.081601 &           1.000404 &                   1.000019 &                   1.000789 &           1.000404 &                   1.000019 &                   1.000789 &                 1.000404 &                         1.000019 &                         1.000789 \\
100.202020  &                             0.999982 &                                     0.999697 &                                     1.000267 &                          0.999982 &                                  0.999697 &                                  1.000267 &           0.999982 &                   0.999697 &                   1.000267 &               0.942902 &                       0.799643 &                       1.086162 &                 0.942902 &                         0.799643 &                         1.086162 &                 0.942902 &                         0.799643 &                         1.086162 &           0.999982 &                   0.999697 &                   1.000267 &           0.999982 &                   0.999697 &                   1.000267 &                 0.999982 &                         0.999697 &                         1.000267 \\
101.515152  &                             0.999797 &                                     0.999536 &                                     1.000057 &                          0.999797 &                                  0.999536 &                                  1.000057 &           0.999797 &                   0.999536 &                   1.000057 &               0.946618 &                       0.802671 &                       1.090566 &                 0.946618 &                         0.802671 &                         1.090566 &                 0.946618 &                         0.802671 &                         1.090566 &           0.999797 &                   0.999536 &                   1.000057 &           0.999797 &                   0.999536 &                   1.000057 &                 0.999797 &                         0.999536 &                         1.000057 \\
102.828283  &                             0.999825 &                                     0.999509 &                                     1.000141 &                          0.999825 &                                  0.999509 &                                  1.000141 &           0.999825 &                   0.999509 &                   1.000141 &               0.950184 &                       0.805614 &                       1.094755 &                 0.950184 &                         0.805614 &                         1.094755 &                 0.950184 &                         0.805614 &                         1.094755 &           0.999825 &                   0.999509 &                   1.000141 &           0.999825 &                   0.999509 &                   1.000141 &                 0.999825 &                         0.999509 &                         1.000141 \\
104.141414  &                             0.999995 &                                     0.999584 &                                     1.000407 &                          0.999995 &                                  0.999584 &                                  1.000407 &           0.999995 &                   0.999584 &                   1.000407 &               0.953557 &                       0.808435 &                       1.098680 &                 0.953557 &                         0.808435 &                         1.098680 &                 0.953557 &                         0.808435 &                         1.098680 &           0.999995 &                   0.999584 &                   1.000407 &           0.999995 &                   0.999584 &                   1.000407 &                 0.999995 &                         0.999584 &                         1.000407 \\
105.454545  &                             1.000236 &                                     0.999729 &                                     1.000742 &                          1.000236 &                                  0.999729 &                                  1.000742 &           1.000236 &                   0.999729 &                   1.000742 &               0.956695 &                       0.811094 &                       1.102297 &                 0.956695 &                         0.811094 &                         1.102297 &                 0.956695 &                         0.811094 &                         1.102297 &           1.000236 &                   0.999729 &                   1.000742 &           1.000236 &                   0.999729 &                   1.000742 &                 1.000236 &                         0.999729 &                         1.000742 \\
106.767677  &                             1.000474 &                                     0.999897 &                                     1.001051 &                          1.000474 &                                  0.999897 &                                  1.001051 &           1.000474 &                   0.999897 &                   1.001051 &               0.959556 &                       0.813551 &                       1.105561 &                 0.959556 &                         0.813551 &                         1.105561 &                 0.959556 &                         0.813551 &                         1.105561 &           1.000474 &                   0.999897 &                   1.001051 &           1.000474 &                   0.999897 &                   1.001051 &                 1.000474 &                         0.999897 &                         1.001051 \\
108.080808  &                             1.000638 &                                     1.000034 &                                     1.001242 &                          1.000638 &                                  1.000034 &                                  1.001242 &           1.000638 &                   1.000034 &                   1.001242 &               0.962097 &                       0.815765 &                       1.108429 &                 0.962097 &                         0.815765 &                         1.108429 &                 0.962097 &                         0.815765 &                         1.108429 &           1.000638 &                   1.000034 &                   1.001242 &           1.000638 &                   1.000034 &                   1.001242 &                 1.000638 &                         1.000034 &                         1.001242 \\
109.393939  &                             1.000669 &                                     1.000092 &                                     1.001246 &                          1.000669 &                                  1.000092 &                                  1.001246 &           1.000669 &                   1.000092 &                   1.001246 &               0.964277 &                       0.817693 &                       1.110860 &                 0.964277 &                         0.817693 &                         1.110860 &                 0.964277 &                         0.817693 &                         1.110860 &           1.000669 &                   1.000092 &                   1.001246 &           1.000669 &                   1.000092 &                   1.001246 &                 1.000669 &                         1.000092 &                         1.001246 \\
110.707071  &                             1.000583 &                                     1.000071 &                                     1.001095 &                          1.000583 &                                  1.000071 &                                  1.001095 &           1.000583 &                   1.000071 &                   1.001095 &               0.966063 &                       0.819301 &                       1.112826 &                 0.966063 &                         0.819301 &                         1.112826 &                 0.966063 &                         0.819301 &                         1.112826 &           1.000583 &                   1.000071 &                   1.001095 &           1.000583 &                   1.000071 &                   1.001095 &                 1.000583 &                         1.000071 &                         1.001095 \\
112.020202  &                             1.000423 &                                     0.999989 &                                     1.000856 &                          1.000423 &                                  0.999989 &                                  1.000856 &           1.000423 &                   0.999989 &                   1.000856 &               0.967427 &                       0.820554 &                       1.114301 &                 0.967427 &                         0.820554 &                         1.114301 &                 0.967427 &                         0.820554 &                         1.114301 &           1.000423 &                   0.999989 &                   1.000856 &           1.000423 &                   0.999989 &                   1.000856 &                 1.000423 &                         0.999989 &                         1.000856 \\
113.333333  &                             1.000230 &                                     0.999865 &                                     1.000596 &                          1.000230 &                                  0.999865 &                                  1.000596 &           1.000230 &                   0.999865 &                   1.000596 &               0.968338 &                       0.821421 &                       1.115255 &                 0.968338 &                         0.821421 &                         1.115255 &                 0.968338 &                         0.821421 &                         1.115255 &           1.000230 &                   0.999865 &                   1.000596 &           1.000230 &                   0.999865 &                   1.000596 &                 1.000230 &                         0.999865 &                         1.000596 \\
114.646465  &                             1.000050 &                                     0.999730 &                                     1.000369 &                          1.000050 &                                  0.999730 &                                  1.000369 &           1.000050 &                   0.999730 &                   1.000369 &               0.968767 &                       0.821875 &                       1.115659 &                 0.968767 &                         0.821875 &                         1.115659 &                 0.968767 &                         0.821875 &                         1.115659 &           1.000050 &                   0.999730 &                   1.000369 &           1.000050 &                   0.999730 &                   1.000369 &                 1.000050 &                         0.999730 &                         1.000369 \\
115.959596  &                             0.999922 &                                     0.999640 &                                     1.000205 &                          0.999922 &                                  0.999640 &                                  1.000205 &           0.999922 &                   0.999640 &                   1.000205 &               0.968684 &                       0.821888 &                       1.115479 &                 0.968684 &                         0.821888 &                         1.115479 &                 0.968684 &                         0.821888 &                         1.115479 &           0.999922 &                   0.999640 &                   1.000205 &           0.999922 &                   0.999640 &                   1.000205 &                 0.999922 &                         0.999640 &                         1.000205 \\
117.272727  &                             0.999882 &                                     0.999638 &                                     1.000127 &                          0.999882 &                                  0.999638 &                                  1.000127 &           0.999882 &                   0.999638 &                   1.000127 &               0.968065 &                       0.821440 &                       1.114691 &                 0.968065 &                         0.821440 &                         1.114691 &                 0.968065 &                         0.821440 &                         1.114691 &           0.999882 &                   0.999638 &                   1.000127 &           0.999882 &                   0.999638 &                   1.000127 &                 0.999882 &                         0.999638 &                         1.000127 \\
118.585859  &                             0.999929 &                                     0.999693 &                                     1.000165 &                          0.999929 &                                  0.999693 &                                  1.000165 &           0.999929 &                   0.999693 &                   1.000165 &               0.966913 &                       0.820523 &                       1.113302 &                 0.966913 &                         0.820523 &                         1.113302 &                 0.966913 &                         0.820523 &                         1.113302 &           0.999929 &                   0.999693 &                   1.000165 &           0.999929 &                   0.999693 &                   1.000165 &                 0.999929 &                         0.999693 &                         1.000165 \\
119.898990  &                             1.000056 &                                     0.999769 &                                     1.000343 &                          1.000056 &                                  0.999769 &                                  1.000343 &           1.000056 &                   0.999769 &                   1.000343 &               0.965231 &                       0.819137 &                       1.111325 &                 0.965231 &                         0.819137 &                         1.111325 &                 0.965231 &                         0.819137 &                         1.111325 &           1.000056 &                   0.999769 &                   1.000343 &           1.000056 &                   0.999769 &                   1.000343 &                 1.000056 &                         0.999769 &                         1.000343 \\
121.212121  &                             1.000257 &                                     0.999887 &                                     1.000627 &                          1.000257 &                                  0.999887 &                                  1.000627 &           1.000257 &                   0.999887 &                   1.000627 &               0.963024 &                       0.817280 &                       1.108768 &                 0.963024 &                         0.817280 &                         1.108768 &                 0.963024 &                         0.817280 &                         1.108768 &           1.000257 &                   0.999887 &                   1.000627 &           1.000257 &                   0.999887 &                   1.000627 &                 1.000257 &                         0.999887 &                         1.000627 \\
122.525253  &                             1.000525 &                                     1.000084 &                                     1.000967 &                          1.000525 &                                  1.000084 &                                  1.000967 &           1.000525 &                   1.000084 &                   1.000967 &               0.960298 &                       0.814957 &                       1.105639 &                 0.960298 &                         0.814957 &                         1.105639 &                 0.960298 &                         0.814957 &                         1.105639 &           1.000525 &                   1.000084 &                   1.000967 &           1.000525 &                   1.000084 &                   1.000967 &                 1.000525 &                         1.000084 &                         1.000967 \\
123.838384  &                             1.000854 &                                     1.000384 &                                     1.001323 &                          1.000854 &                                  1.000384 &                                  1.001323 &           1.000854 &                   1.000384 &                   1.001323 &               0.957058 &                       0.812174 &                       1.101942 &                 0.957058 &                         0.812174 &                         1.101942 &                 0.957058 &                         0.812174 &                         1.101942 &           1.000854 &                   1.000384 &                   1.001323 &           1.000854 &                   1.000384 &                   1.001323 &                 1.000854 &                         1.000384 &                         1.001323 \\
125.151515  &                             1.001189 &                                     1.000746 &                                     1.001632 &                          1.001189 &                                  1.000746 &                                  1.001632 &           1.001189 &                   1.000746 &                   1.001632 &               0.953320 &                       0.808948 &                       1.097691 &                 0.953320 &                         0.808948 &                         1.097691 &                 0.953320 &                         0.808948 &                         1.097691 &           1.001189 &                   1.000746 &                   1.001632 &           1.001189 &                   1.000746 &                   1.001632 &                 1.001189 &                         1.000746 &                         1.001632 \\
126.464646  &                             1.001382 &                                     1.001001 &                                     1.001764 &                          1.001382 &                                  1.001001 &                                  1.001764 &           1.001382 &                   1.001001 &                   1.001764 &               0.949123 &                       0.805319 &                       1.092926 &                 0.949123 &                         0.805319 &                         1.092926 &                 0.949123 &                         0.805319 &                         1.092926 &           1.001382 &                   1.001001 &                   1.001764 &           1.001382 &                   1.001001 &                   1.001764 &                 1.001382 &                         1.001001 &                         1.001764 \\
127.777778  &                             1.001275 &                                     1.000958 &                                     1.001592 &                          1.001275 &                                  1.000958 &                                  1.001592 &           1.001275 &                   1.000958 &                   1.001592 &               0.944510 &                       0.801329 &                       1.087690 &                 0.944510 &                         0.801329 &                         1.087690 &                 0.944510 &                         0.801329 &                         1.087690 &           1.001275 &                   1.000958 &                   1.001592 &           1.001275 &                   1.000958 &                   1.001592 &                 1.001275 &                         1.000958 &                         1.001592 \\
129.090909  &                             1.000708 &                                     1.000419 &                                     1.000997 &                          1.000708 &                                  1.000419 &                                  1.000997 &           1.000708 &                   1.000419 &                   1.000997 &               0.939522 &                       0.797023 &                       1.082020 &                 0.939522 &                         0.797023 &                         1.082020 &                 0.939522 &                         0.797023 &                         1.082020 &           1.000708 &                   1.000419 &                   1.000997 &           1.000708 &                   1.000419 &                   1.000997 &                 1.000708 &                         1.000419 &                         1.000997 \\
130.404040  &                             0.999522 &                                     0.999209 &                                     0.999835 &                          0.999522 &                                  0.999209 &                                  0.999835 &           0.999522 &                   0.999209 &                   0.999835 &               0.934201 &                       0.792448 &                       1.075955 &                 0.934201 &                         0.792448 &                         1.075955 &                 0.934201 &                         0.792448 &                         1.075955 &           0.999522 &                   0.999209 &                   0.999835 &           0.999522 &                   0.999209 &                   0.999835 &                 0.999522 &                         0.999209 &                         0.999835 \\
131.717172  &                             0.997560 &                                     0.997201 &                                     0.997918 &                          0.997560 &                                  0.997201 &                                  0.997918 &           0.997560 &                   0.997201 &                   0.997918 &               0.928591 &                       0.787649 &                       1.069533 &                 0.928591 &                         0.787649 &                         1.069533 &                 0.928591 &                         0.787649 &                         1.069533 &           0.997560 &                   0.997201 &                   0.997918 &           0.997560 &                   0.997201 &                   0.997918 &                 0.997560 &                         0.997201 &                         0.997918 \\
133.030303  &                             0.994774 &                                     0.994382 &                                     0.995166 &                          0.994774 &                                  0.994382 &                                  0.995166 &           0.994774 &                   0.994382 &                   0.995166 &               0.922745 &                       0.782680 &                       1.062809 &                 0.922745 &                         0.782680 &                         1.062809 &                 0.922745 &                         0.782680 &                         1.062809 &           0.994774 &                   0.994382 &                   0.995166 &           0.994774 &                   0.994382 &                   0.995166 &                 0.994774 &                         0.994382 &                         0.995166 \\
134.343434  &                             0.991253 &                                     0.990849 &                                     0.991657 &                          0.991253 &                                  0.990849 &                                  0.991657 &           0.991253 &                   0.990849 &                   0.991657 &               0.916730 &                       0.777596 &                       1.055864 &                 0.916730 &                         0.777596 &                         1.055864 &                 0.916730 &                         0.777596 &                         1.055864 &           0.991253 &                   0.990849 &                   0.991657 &           0.991253 &                   0.990849 &                   0.991657 &                 0.991253 &                         0.990849 &                         0.991657 \\
135.656566  &                             0.987095 &                                     0.986698 &                                     0.987491 &                          0.987095 &                                  0.986698 &                                  0.987491 &           0.987095 &                   0.986698 &                   0.987491 &               0.910617 &                       0.772453 &                       1.048780 &                 0.910617 &                         0.772453 &                         1.048780 &                 0.910617 &                         0.772453 &                         1.048780 &           0.987095 &                   0.986698 &                   0.987491 &           0.987095 &                   0.986698 &                   0.987491 &                 0.987095 &                         0.986698 &                         0.987491 \\
136.969697  &                             0.982396 &                                     0.982023 &                                     0.982769 &                          0.982396 &                                  0.982023 &                                  0.982769 &           0.982396 &                   0.982023 &                   0.982769 &               0.904474 &                       0.767303 &                       1.041644 &                 0.904474 &                         0.767303 &                         1.041644 &                 0.904474 &                         0.767303 &                         1.041644 &           0.982396 &                   0.982023 &                   0.982769 &           0.982396 &                   0.982023 &                   0.982769 &                 0.982396 &                         0.982023 &                         0.982769 \\
138.282828  &                             0.977254 &                                     0.976916 &                                     0.977592 &                          0.977254 &                                  0.976916 &                                  0.977592 &           0.977254 &                   0.976916 &                   0.977592 &               0.898370 &                       0.762199 &                       1.034542 &                 0.898370 &                         0.762199 &                         1.034542 &                 0.898370 &                         0.762199 &                         1.034542 &           0.977254 &                   0.976916 &                   0.977592 &           0.977254 &                   0.976916 &                   0.977592 &                 0.977254 &                         0.976916 &                         0.977592 \\
139.595960  &                             0.971769 &                                     0.971470 &                                     0.972067 &                          0.971769 &                                  0.971470 &                                  0.972067 &           0.971769 &                   0.971470 &                   0.972067 &               0.892375 &                       0.757192 &                       1.027558 &                 0.892375 &                         0.757192 &                         1.027558 &                 0.892375 &                         0.757192 &                         1.027558 &           0.971769 &                   0.971470 &                   0.972067 &           0.971769 &                   0.971470 &                   0.972067 &                 0.971769 &                         0.971470 &                         0.972067 \\
140.909091  &                             0.966071 &                                     0.965811 &                                     0.966332 &                          0.966071 &                                  0.965811 &                                  0.966332 &           0.966071 &                   0.965811 &                   0.966332 &               0.886549 &                       0.752327 &                       1.020771 &                 0.886549 &                         0.752327 &                         1.020771 &                 0.886549 &                         0.752327 &                         1.020771 &           0.966071 &                   0.965811 &                   0.966332 &           0.966071 &                   0.965811 &                   0.966332 &                 0.966071 &                         0.965811 &                         0.966332 \\
142.222222  &                             0.960320 &                                     0.960091 &                                     0.960549 &                          0.960320 &                                  0.960091 &                                  0.960549 &           0.960320 &                   0.960091 &                   0.960549 &               0.880945 &                       0.747641 &                       1.014250 &                 0.880945 &                         0.747641 &                         1.014250 &                 0.880945 &                         0.747641 &                         1.014250 &           0.960320 &                   0.960091 &                   0.960549 &           0.960320 &                   0.960091 &                   0.960549 &                 0.960320 &                         0.960091 &                         0.960549 \\
143.535354  &                             0.954673 &                                     0.954463 &                                     0.954883 &                          0.954673 &                                  0.954463 &                                  0.954883 &           0.954673 &                   0.954463 &                   0.954883 &               0.875618 &                       0.743176 &                       1.008061 &                 0.875618 &                         0.743176 &                         1.008061 &                 0.875618 &                         0.743176 &                         1.008061 &           0.954673 &                   0.954463 &                   0.954883 &           0.954673 &                   0.954463 &                   0.954883 &                 0.954673 &                         0.954463 &                         0.954883 \\
144.848485  &                             0.949288 &                                     0.949084 &                                     0.949492 &                          0.949288 &                                  0.949084 &                                  0.949492 &           0.949288 &                   0.949084 &                   0.949492 &               0.870622 &                       0.738972 &                       1.002272 &                 0.870622 &                         0.738972 &                         1.002272 &                 0.870622 &                         0.738972 &                         1.002272 &           0.949288 &                   0.949084 &                   0.949492 &           0.949288 &                   0.949084 &                   0.949492 &                 0.949288 &                         0.949084 &                         0.949492 \\
146.161616  &                             0.944324 &                                     0.944116 &                                     0.944532 &                          0.944324 &                                  0.944116 &                                  0.944532 &           0.944324 &                   0.944116 &                   0.944532 &               0.866010 &                       0.735073 &                       0.996946 &                 0.866010 &                         0.735073 &                         0.996946 &                 0.866010 &                         0.735073 &                         0.996946 &           0.944324 &                   0.944116 &                   0.944532 &           0.944324 &                   0.944116 &                   0.944532 &                 0.944324 &                         0.944116 &                         0.944532 \\
147.474747  &                             0.939933 &                                     0.939719 &                                     0.940146 &                          0.939933 &                                  0.939719 &                                  0.940146 &           0.939933 &                   0.939719 &                   0.940146 &               0.861832 &                       0.731524 &                       0.992141 &                 0.861832 &                         0.731524 &                         0.992141 &                 0.861832 &                         0.731524 &                         0.992141 &           0.939933 &                   0.939719 &                   0.940146 &           0.939933 &                   0.939719 &                   0.940146 &                 0.939933 &                         0.939719 &                         0.940146 \\
148.787879  &                             0.936209 &                                     0.935992 &                                     0.936427 &                          0.936209 &                                  0.935992 &                                  0.936427 &           0.936209 &                   0.935992 &                   0.936427 &               0.858120 &                       0.728350 &                       0.987889 &                 0.858120 &                         0.728350 &                         0.987889 &                 0.858120 &                         0.728350 &                         0.987889 &           0.936209 &                   0.935992 &                   0.936427 &           0.936209 &                   0.935992 &                   0.936427 &                 0.936209 &                         0.935992 &                         0.936427 \\
150.101010  &                             0.933223 &                                     0.933005 &                                     0.933441 &                          0.933223 &                                  0.933005 &                                  0.933441 &           0.933223 &                   0.933005 &                   0.933441 &               0.854889 &                       0.725570 &                       0.984208 &                 0.854889 &                         0.725570 &                         0.984208 &                 0.854889 &                         0.725570 &                         0.984208 &           0.933223 &                   0.933005 &                   0.933441 &           0.933223 &                   0.933005 &                   0.933441 &                 0.933223 &                         0.933005 &                         0.933441 \\
151.414141  &                             0.931041 &                                     0.930826 &                                     0.931257 &                          0.931041 &                                  0.930826 &                                  0.931257 &           0.931041 &                   0.930826 &                   0.931257 &               0.852158 &                       0.723202 &                       0.981115 &                 0.852158 &                         0.723202 &                         0.981115 &                 0.852158 &                         0.723202 &                         0.981115 &           0.931041 &                   0.930826 &                   0.931257 &           0.931041 &                   0.930826 &                   0.931257 &                 0.931041 &                         0.930826 &                         0.931257 \\
152.727273  &                             0.929733 &                                     0.929522 &                                     0.929945 &                          0.929733 &                                  0.929522 &                                  0.929945 &           0.929733 &                   0.929522 &                   0.929945 &               0.849946 &                       0.721266 &                       0.978626 &                 0.849946 &                         0.721266 &                         0.978626 &                 0.849946 &                         0.721266 &                         0.978626 &           0.929733 &                   0.929522 &                   0.929945 &           0.929733 &                   0.929522 &                   0.929945 &                 0.929733 &                         0.929522 &                         0.929945 \\
154.040404  &                             0.929367 &                                     0.929159 &                                     0.929575 &                          0.929367 &                                  0.929159 &                                  0.929575 &           0.929367 &                   0.929159 &                   0.929575 &               0.848269 &                       0.719784 &                       0.976755 &                 0.848269 &                         0.719784 &                         0.976755 &                 0.848269 &                         0.719784 &                         0.976755 &           0.929367 &                   0.929159 &                   0.929575 &           0.929367 &                   0.929159 &                   0.929575 &                 0.929367 &                         0.929159 &                         0.929575 \\
155.353535  &                             0.929987 &                                     0.929782 &                                     0.930193 &                          0.929987 &                                  0.929782 &                                  0.930193 &           0.929987 &                   0.929782 &                   0.930193 &               0.847141 &                       0.718772 &                       0.975510 &                 0.847141 &                         0.718772 &                         0.975510 &                 0.847141 &                         0.718772 &                         0.975510 &           0.929987 &                   0.929782 &                   0.930193 &           0.929987 &                   0.929782 &                   0.930193 &                 0.929987 &                         0.929782 &                         0.930193 \\
156.666667  &                             0.931528 &                                     0.931323 &                                     0.931733 &                          0.931528 &                                  0.931323 &                                  0.931733 &           0.931528 &                   0.931323 &                   0.931733 &               0.846547 &                       0.718222 &                       0.974871 &                 0.846547 &                         0.718222 &                         0.974871 &                 0.846547 &                         0.718222 &                         0.974871 &           0.931528 &                   0.931323 &                   0.931733 &           0.931528 &                   0.931323 &                   0.931733 &                 0.931528 &                         0.931323 &                         0.931733 \\
157.979798  &                             0.933891 &                                     0.933685 &                                     0.934096 &                          0.933891 &                                  0.933685 &                                  0.934096 &           0.933891 &                   0.933685 &                   0.934096 &               0.846464 &                       0.718120 &                       0.974808 &                 0.846464 &                         0.718120 &                         0.974808 &                 0.846464 &                         0.718120 &                         0.974808 &           0.933891 &                   0.933685 &                   0.934096 &           0.933891 &                   0.933685 &                   0.934096 &                 0.933891 &                         0.933685 &                         0.934096 \\
159.292929  &                             0.936976 &                                     0.936769 &                                     0.937183 &                          0.936976 &                                  0.936769 &                                  0.937183 &           0.936976 &                   0.936769 &                   0.937183 &               0.846871 &                       0.718449 &                       0.975294 &                 0.846871 &                         0.718449 &                         0.975294 &                 0.846871 &                         0.718449 &                         0.975294 &           0.936976 &                   0.936769 &                   0.937183 &           0.936976 &                   0.936769 &                   0.937183 &                 0.936976 &                         0.936769 &                         0.937183 \\
160.606061  &                             0.940686 &                                     0.940478 &                                     0.940894 &                          0.940686 &                                  0.940478 &                                  0.940894 &           0.940686 &                   0.940478 &                   0.940894 &               0.847746 &                       0.719192 &                       0.976300 &                 0.847746 &                         0.719192 &                         0.976300 &                 0.847746 &                         0.719192 &                         0.976300 &           0.940686 &                   0.940478 &                   0.940894 &           0.940686 &                   0.940478 &                   0.940894 &                 0.940686 &                         0.940478 &                         0.940894 \\
161.919192  &                             0.944920 &                                     0.944712 &                                     0.945128 &                          0.944920 &                                  0.944712 &                                  0.945128 &           0.944920 &                   0.944712 &                   0.945128 &               0.849066 &                       0.720331 &                       0.977802 &                 0.849066 &                         0.720331 &                         0.977802 &                 0.849066 &                         0.720331 &                         0.977802 &           0.944920 &                   0.944712 &                   0.945128 &           0.944920 &                   0.944712 &                   0.945128 &                 0.944920 &                         0.944712 &                         0.945128 \\
163.232323  &                             0.949572 &                                     0.949365 &                                     0.949779 &                          0.949572 &                                  0.949365 &                                  0.949779 &           0.949572 &                   0.949365 &                   0.949779 &               0.850803 &                       0.721841 &                       0.979765 &                 0.850803 &                         0.721841 &                         0.979765 &                 0.850803 &                         0.721841 &                         0.979765 &           0.949572 &                   0.949365 &                   0.949779 &           0.949572 &                   0.949365 &                   0.949779 &                 0.949572 &                         0.949365 &                         0.949779 \\
164.545455  &                             0.954515 &                                     0.954308 &                                     0.954722 &                          0.954515 &                                  0.954308 &                                  0.954722 &           0.954515 &                   0.954308 &                   0.954722 &               0.852908 &                       0.723677 &                       0.982139 &                 0.852908 &                         0.723677 &                         0.982139 &                 0.852908 &                         0.723677 &                         0.982139 &           0.954515 &                   0.954308 &                   0.954722 &           0.954515 &                   0.954308 &                   0.954722 &                 0.954515 &                         0.954308 &                         0.954722 \\
165.858586  &                             0.959615 &                                     0.959405 &                                     0.959824 &                          0.959615 &                                  0.959405 &                                  0.959824 &           0.959615 &                   0.959405 &                   0.959824 &               0.855330 &                       0.725791 &                       0.984868 &                 0.855330 &                         0.725791 &                         0.984868 &                 0.855330 &                         0.725791 &                         0.984868 &           0.959615 &                   0.959405 &                   0.959824 &           0.959615 &                   0.959405 &                   0.959824 &                 0.959615 &                         0.959405 &                         0.959824 \\
167.171717  &                             0.964741 &                                     0.964524 &                                     0.964957 &                          0.964741 &                                  0.964524 &                                  0.964957 &           0.964741 &                   0.964524 &                   0.964957 &               0.858017 &                       0.728136 &                       0.987898 &                 0.858017 &                         0.728136 &                         0.987898 &                 0.858017 &                         0.728136 &                         0.987898 &           0.964741 &                   0.964524 &                   0.964957 &           0.964741 &                   0.964524 &                   0.964957 &                 0.964741 &                         0.964524 &                         0.964957 \\
168.484848  &                             0.969760 &                                     0.969529 &                                     0.969990 &                          0.969760 &                                  0.969529 &                                  0.969990 &           0.969760 &                   0.969529 &                   0.969990 &               0.860917 &                       0.730661 &                       0.991174 &                 0.860917 &                         0.730661 &                         0.991174 &                 0.860917 &                         0.730661 &                         0.991174 &           0.969760 &                   0.969529 &                   0.969990 &           0.969760 &                   0.969529 &                   0.969990 &                 0.969760 &                         0.969529 &                         0.969990 \\
169.797980  &                             0.974541 &                                     0.974291 &                                     0.974791 &                          0.974541 &                                  0.974291 &                                  0.974791 &           0.974541 &                   0.974291 &                   0.974791 &               0.863981 &                       0.733320 &                       0.994641 &                 0.863981 &                         0.733320 &                         0.994641 &                 0.863981 &                         0.733320 &                         0.994641 &           0.974541 &                   0.974291 &                   0.974791 &           0.974541 &                   0.974291 &                   0.974791 &                 0.974541 &                         0.974291 &                         0.974791 \\
171.111111  &                             0.978996 &                                     0.978720 &                                     0.979271 &                          0.978996 &                                  0.978720 &                                  0.979271 &           0.978996 &                   0.978720 &                   0.979271 &               0.867152 &                       0.736061 &                       0.998243 &                 0.867152 &                         0.736061 &                         0.998243 &                 0.867152 &                         0.736061 &                         0.998243 &           0.978996 &                   0.978720 &                   0.979271 &           0.978996 &                   0.978720 &                   0.979271 &                 0.978996 &                         0.978720 &                         0.979271 \\
172.424242  &                             0.983111 &                                     0.982806 &                                     0.983417 &                          0.983111 &                                  0.982806 &                                  0.983417 &           0.983111 &                   0.982806 &                   0.983417 &               0.870373 &                       0.738831 &                       1.001914 &                 0.870373 &                         0.738831 &                         1.001914 &                 0.870373 &                         0.738831 &                         1.001914 &           0.983111 &                   0.982806 &                   0.983417 &           0.983111 &                   0.982806 &                   0.983417 &                 0.983111 &                         0.982806 &                         0.983417 \\
173.737374  &                             0.986882 &                                     0.986545 &                                     0.987218 &                          0.986882 &                                  0.986545 &                                  0.987218 &           0.986882 &                   0.986545 &                   0.987218 &               0.873584 &                       0.741578 &                       1.005591 &                 0.873584 &                         0.741578 &                         1.005591 &                 0.873584 &                         0.741578 &                         1.005591 &           0.986882 &                   0.986545 &                   0.987218 &           0.986882 &                   0.986545 &                   0.987218 &                 0.986882 &                         0.986545 &                         0.987218 \\
175.050505  &                             0.990302 &                                     0.989935 &                                     0.990668 &                          0.990302 &                                  0.989935 &                                  0.990668 &           0.990302 &                   0.989935 &                   0.990668 &               0.876727 &                       0.744251 &                       1.009204 &                 0.876727 &                         0.744251 &                         1.009204 &                 0.876727 &                         0.744251 &                         1.009204 &           0.990302 &                   0.989935 &                   0.990668 &           0.990302 &                   0.989935 &                   0.990668 &                 0.990302 &                         0.989935 &                         0.990668 \\
176.363636  &                             0.993365 &                                     0.992973 &                                     0.993758 &                          0.993365 &                                  0.992973 &                                  0.993758 &           0.993365 &                   0.992973 &                   0.993758 &               0.879743 &                       0.746800 &                       1.012685 &                 0.879743 &                         0.746800 &                         1.012685 &                 0.879743 &                         0.746800 &                         1.012685 &           0.993365 &                   0.992973 &                   0.993758 &           0.993365 &                   0.992973 &                   0.993758 &                 0.993365 &                         0.992973 &                         0.993758 \\
177.676768  &                             0.996068 &                                     0.995656 &                                     0.996480 &                          0.996068 &                                  0.995656 &                                  0.996480 &           0.996068 &                   0.995656 &                   0.996480 &               0.882573 &                       0.749180 &                       1.015965 &                 0.882573 &                         0.749180 &                         1.015965 &                 0.882573 &                         0.749180 &                         1.015965 &           0.996068 &                   0.995656 &                   0.996480 &           0.996068 &                   0.995656 &                   0.996480 &                 0.996068 &                         0.995656 &                         0.996480 \\
178.989899  &                             0.998420 &                                     0.997997 &                                     0.998844 &                          0.998420 &                                  0.997997 &                                  0.998844 &           0.998420 &                   0.997997 &                   0.998844 &               0.885172 &                       0.751355 &                       1.018989 &                 0.885172 &                         0.751355 &                         1.018989 &                 0.885172 &                         0.751355 &                         1.018989 &           0.998420 &                   0.997997 &                   0.998844 &           0.998420 &                   0.997997 &                   0.998844 &                 0.998420 &                         0.997997 &                         0.998844 \\
180.303030  &                             1.000454 &                                     1.000027 &                                     1.000882 &                          1.000454 &                                  1.000027 &                                  1.000882 &           1.000454 &                   1.000027 &                   1.000882 &               0.887511 &                       0.753304 &                       1.021719 &                 0.887511 &                         0.753304 &                         1.021719 &                 0.887511 &                         0.753304 &                         1.021719 &           1.000454 &                   1.000027 &                   1.000882 &           1.000454 &                   1.000027 &                   1.000882 &                 1.000454 &                         1.000027 &                         1.000882 \\
181.616162  &                             1.002201 &                                     1.001777 &                                     1.002625 &                          1.002201 &                                  1.001777 &                                  1.002625 &           1.002201 &                   1.001777 &                   1.002625 &               0.889563 &                       0.755006 &                       1.024119 &                 0.889563 &                         0.755006 &                         1.024119 &                 0.889563 &                         0.755006 &                         1.024119 &           1.002201 &                   1.001777 &                   1.002625 &           1.002201 &                   1.001777 &                   1.002625 &                 1.002201 &                         1.001777 &                         1.002625 \\
182.929293  &                             1.003692 &                                     1.003278 &                                     1.004105 &                          1.003692 &                                  1.003278 &                                  1.004105 &           1.003692 &                   1.003278 &                   1.004105 &               0.891298 &                       0.756441 &                       1.026154 &                 0.891298 &                         0.756441 &                         1.026154 &                 0.891298 &                         0.756441 &                         1.026154 &           1.003692 &                   1.003278 &                   1.004105 &           1.003692 &                   1.003278 &                   1.004105 &                 1.003692 &                         1.003278 &                         1.004105 \\
184.242424  &                             1.004958 &                                     1.004562 &                                     1.005353 &                          1.004958 &                                  1.004562 &                                  1.005353 &           1.004958 &                   1.004562 &                   1.005353 &               0.892688 &                       0.757587 &                       1.027788 &                 0.892688 &                         0.757587 &                         1.027788 &                 0.892688 &                         0.757587 &                         1.027788 &           1.004958 &                   1.004562 &                   1.005353 &           1.004958 &                   1.004562 &                   1.005353 &                 1.004958 &                         1.004562 &                         1.005353 \\
185.555556  &                             1.006028 &                                     1.005654 &                                     1.006402 &                          1.006028 &                                  1.005654 &                                  1.006402 &           1.006028 &                   1.005654 &                   1.006402 &               0.893706 &                       0.758424 &                       1.028988 &                 0.893706 &                         0.758424 &                         1.028988 &                 0.893706 &                         0.758424 &                         1.028988 &           1.006028 &                   1.005654 &                   1.006402 &           1.006028 &                   1.005654 &                   1.006402 &                 1.006028 &                         1.005654 &                         1.006402 \\
186.868687  &                             1.006900 &                                     1.006550 &                                     1.007251 &                          1.006900 &                                  1.006550 &                                  1.007251 &           1.006900 &                   1.006550 &                   1.007251 &               0.894344 &                       0.758946 &                       1.029742 &                 0.894344 &                         0.758946 &                         1.029742 &                 0.894344 &                         0.758946 &                         1.029742 &           1.006900 &                   1.006550 &                   1.007251 &           1.006900 &                   1.006550 &                   1.007251 &                 1.006900 &                         1.006550 &                         1.007251 \\
188.181818  &                             1.007550 &                                     1.007220 &                                     1.007881 &                          1.007550 &                                  1.007220 &                                  1.007881 &           1.007550 &                   1.007220 &                   1.007881 &               0.894608 &                       0.759160 &                       1.030056 &                 0.894608 &                         0.759160 &                         1.030056 &                 0.894608 &                         0.759160 &                         1.030056 &           1.007550 &                   1.007220 &                   1.007881 &           1.007550 &                   1.007220 &                   1.007881 &                 1.007550 &                         1.007220 &                         1.007881 \\
189.494949  &                             1.007955 &                                     1.007635 &                                     1.008274 &                          1.007955 &                                  1.007635 &                                  1.008274 &           1.007955 &                   1.007635 &                   1.008274 &               0.894503 &                       0.759069 &                       1.029937 &                 0.894503 &                         0.759069 &                         1.029937 &                 0.894503 &                         0.759069 &                         1.029937 &           1.007955 &                   1.007635 &                   1.008274 &           1.007955 &                   1.007635 &                   1.008274 &                 1.007955 &                         1.007635 &                         1.008274 \\
190.808081  &                             1.008088 &                                     1.007769 &                                     1.008408 &                          1.008088 &                                  1.007769 &                                  1.008408 &           1.008088 &                   1.007769 &                   1.008408 &               0.894035 &                       0.758680 &                       1.029391 &                 0.894035 &                         0.758680 &                         1.029391 &                 0.894035 &                         0.758680 &                         1.029391 &           1.008088 &                   1.007769 &                   1.008408 &           1.008088 &                   1.007769 &                   1.008408 &                 1.008088 &                         1.007769 &                         1.008408 \\
192.121212  &                             1.007928 &                                     1.007596 &                                     1.008259 &                          1.007928 &                                  1.007596 &                                  1.008259 &           1.007928 &                   1.007596 &                   1.008259 &               0.893210 &                       0.757998 &                       1.028422 &                 0.893210 &                         0.757998 &                         1.028422 &                 0.893210 &                         0.757998 &                         1.028422 &           1.007928 &                   1.007596 &                   1.008259 &           1.007928 &                   1.007596 &                   1.008259 &                 1.007928 &                         1.007596 &                         1.008259 \\
193.434343  &                             1.007450 &                                     1.007098 &                                     1.007801 &                          1.007450 &                                  1.007098 &                                  1.007801 &           1.007450 &                   1.007098 &                   1.007801 &               0.892034 &                       0.757029 &                       1.027039 &                 0.892034 &                         0.757029 &                         1.027039 &                 0.892034 &                         0.757029 &                         1.027039 &           1.007450 &                   1.007098 &                   1.007801 &           1.007450 &                   1.007098 &                   1.007801 &                 1.007450 &                         1.007098 &                         1.007801 \\
194.747475  &                             1.006643 &                                     1.006268 &                                     1.007018 &                          1.006643 &                                  1.006268 &                                  1.007018 &           1.006643 &                   1.006268 &                   1.007018 &               0.890526 &                       0.755787 &                       1.025266 &                 0.890526 &                         0.755787 &                         1.025266 &                 0.890526 &                         0.755787 &                         1.025266 &           1.006643 &                   1.006268 &                   1.007018 &           1.006643 &                   1.006268 &                   1.007018 &                 1.006643 &                         1.006268 &                         1.007018 \\
196.060606  &                             1.005501 &                                     1.005103 &                                     1.005900 &                          1.005501 &                                  1.005103 &                                  1.005900 &           1.005501 &                   1.005103 &                   1.005900 &               0.888710 &                       0.754289 &                       1.023132 &                 0.888710 &                         0.754289 &                         1.023132 &                 0.888710 &                         0.754289 &                         1.023132 &           1.005501 &                   1.005103 &                   1.005900 &           1.005501 &                   1.005103 &                   1.005900 &                 1.005501 &                         1.005103 &                         1.005900 \\
197.373737  &                             1.004017 &                                     1.003600 &                                     1.004435 &                          1.004017 &                                  1.003600 &                                  1.004435 &           1.004017 &                   1.003600 &                   1.004435 &               0.886610 &                       0.752551 &                       1.020669 &                 0.886610 &                         0.752551 &                         1.020669 &                 0.886610 &                         0.752551 &                         1.020669 &           1.004017 &                   1.003600 &                   1.004435 &           1.004017 &                   1.003600 &                   1.004435 &                 1.004017 &                         1.003600 &                         1.004435 \\
198.686869  &                             1.002185 &                                     1.001757 &                                     1.002612 &                          1.002185 &                                  1.001757 &                                  1.002612 &           1.002185 &                   1.001757 &                   1.002612 &               0.884248 &                       0.750589 &                       1.017908 &                 0.884248 &                         0.750589 &                         1.017908 &                 0.884248 &                         0.750589 &                         1.017908 &           1.002185 &                   1.001757 &                   1.002612 &           1.002185 &                   1.001757 &                   1.002612 &                 1.002185 &                         1.001757 &                         1.002612 \\
200.000000  &                             0.999997 &                                     0.999569 &                                     1.000424 &                          0.999997 &                                  0.999569 &                                  1.000424 &           0.999997 &                   0.999569 &                   1.000424 &               0.881649 &                       0.748416 &                       1.014881 &                 0.881649 &                         0.748416 &                         1.014881 &                 0.881649 &                         0.748416 &                         1.014881 &           0.999997 &                   0.999569 &                   1.000424 &           0.999997 &                   0.999569 &                   1.000424 &                 0.999997 &                         0.999569 &                         1.000424 \\
\bottomrule
\end{tabular}
