\begin{tabular}{lrrrrrrrrrrrrrrrrrrrrrrrrrrr}
\toprule
{} &  boeck2015/tempodetector2016\_default &  boeck2015/tempodetector2016\_default\_lowerci &  boeck2015/tempodetector2016\_default\_upperci &  davies2009/mirex\_qm\_tempotracker &  davies2009/mirex\_qm\_tempotracker\_lowerci &  davies2009/mirex\_qm\_tempotracker\_upperci &  percival2014/stem &  percival2014/stem\_lowerci &  percival2014/stem\_upperci &  schreiber2014/default &  schreiber2014/default\_lowerci &  schreiber2014/default\_upperci &  schreiber2017/ismir2017 &  schreiber2017/ismir2017\_lowerci &  schreiber2017/ismir2017\_upperci &  schreiber2017/mirex2017 &  schreiber2017/mirex2017\_lowerci &  schreiber2017/mirex2017\_upperci &  schreiber2018/cnn &  schreiber2018/cnn\_lowerci &  schreiber2018/cnn\_upperci &  schreiber2018/fcn &  schreiber2018/fcn\_lowerci &  schreiber2018/fcn\_upperci &  schreiber2018/ismir2018 &  schreiber2018/ismir2018\_lowerci &  schreiber2018/ismir2018\_upperci \\
Tempo (BPM) &                                      &                                              &                                              &                                   &                                           &                                           &                    &                            &                            &                        &                                &                                &                          &                                  &                                  &                          &                                  &                                  &                    &                            &                            &                    &                            &                            &                          &                                  &                                  \\
\midrule
69.970845   &                             0.999814 &                                     0.999496 &                                     1.000132 &                          0.999814 &                                  0.999496 &                                  1.000132 &           0.999814 &                   0.999496 &                   1.000132 &               0.907521 &                       0.770003 &                       1.045038 &                 0.907521 &                         0.770003 &                         1.045038 &                 0.907521 &                         0.770003 &                         1.045038 &           0.999814 &                   0.999496 &                   1.000132 &           0.999814 &                   0.999496 &                   1.000132 &                 0.999814 &                         0.999496 &                         1.000132 \\
71.284271   &                             1.000996 &                                     1.000708 &                                     1.001285 &                          1.000996 &                                  1.000708 &                                  1.001285 &           1.000996 &                   1.000708 &                   1.001285 &               0.904931 &                       0.767632 &                       1.042229 &                 0.904931 &                         0.767632 &                         1.042229 &                 0.904931 &                         0.767632 &                         1.042229 &           1.000996 &                   1.000708 &                   1.001285 &           1.000996 &                   1.000708 &                   1.001285 &                 1.000996 &                         1.000708 &                         1.001285 \\
72.597697   &                             1.001237 &                                     1.000925 &                                     1.001549 &                          1.001237 &                                  1.000925 &                                  1.001549 &           1.001237 &                   1.000925 &                   1.001549 &               0.902826 &                       0.765684 &                       1.039969 &                 0.902826 &                         0.765684 &                         1.039969 &                 0.902826 &                         0.765684 &                         1.039969 &           1.001237 &                   1.000925 &                   1.001549 &           1.001237 &                   1.000925 &                   1.001549 &                 1.001237 &                         1.000925 &                         1.001549 \\
73.911123   &                             1.000861 &                                     1.000494 &                                     1.001228 &                          1.000861 &                                  1.000494 &                                  1.001228 &           1.000861 &                   1.000494 &                   1.001228 &               0.901195 &                       0.764162 &                       1.038227 &                 0.901195 &                         0.764162 &                         1.038227 &                 0.901195 &                         0.764162 &                         1.038227 &           1.000861 &                   1.000494 &                   1.001228 &           1.000861 &                   1.000494 &                   1.001228 &                 1.000861 &                         1.000494 &                         1.001228 \\
75.224549   &                             1.000191 &                                     0.999778 &                                     1.000604 &                          1.000191 &                                  0.999778 &                                  1.000604 &           1.000191 &                   0.999778 &                   1.000604 &               0.900023 &                       0.763068 &                       1.036978 &                 0.900023 &                         0.763068 &                         1.036978 &                 0.900023 &                         0.763068 &                         1.036978 &           1.000191 &                   0.999778 &                   1.000604 &           1.000191 &                   0.999778 &                   1.000604 &                 1.000191 &                         0.999778 &                         1.000604 \\
76.537974   &                             0.999551 &                                     0.999128 &                                     0.999974 &                          0.999551 &                                  0.999128 &                                  0.999974 &           0.999551 &                   0.999128 &                   0.999974 &               0.899298 &                       0.762400 &                       1.036196 &                 0.899298 &                         0.762400 &                         1.036196 &                 0.899298 &                         0.762400 &                         1.036196 &           0.999551 &                   0.999128 &                   0.999974 &           0.999551 &                   0.999128 &                   0.999974 &                 0.999551 &                         0.999128 &                         0.999974 \\
77.851400   &                             0.999265 &                                     0.998871 &                                     0.999659 &                          0.999265 &                                  0.998871 &                                  0.999659 &           0.999265 &                   0.998871 &                   0.999659 &               0.899007 &                       0.762155 &                       1.035858 &                 0.899007 &                         0.762155 &                         1.035858 &                 0.899007 &                         0.762155 &                         1.035858 &           0.999265 &                   0.998871 &                   0.999659 &           0.999265 &                   0.998871 &                   0.999659 &                 0.999265 &                         0.998871 &                         0.999659 \\
79.164826   &                             0.999526 &                                     0.999139 &                                     0.999912 &                          0.999526 &                                  0.999139 &                                  0.999912 &           0.999526 &                   0.999139 &                   0.999912 &               0.899136 &                       0.762324 &                       1.035947 &                 0.899136 &                         0.762324 &                         1.035947 &                 0.899136 &                         0.762324 &                         1.035947 &           0.999526 &                   0.999139 &                   0.999912 &           0.999526 &                   0.999139 &                   0.999912 &                 0.999526 &                         0.999139 &                         0.999912 \\
80.478252   &                             1.000215 &                                     0.999717 &                                     1.000713 &                          1.000215 &                                  0.999717 &                                  1.000713 &           1.000215 &                   0.999717 &                   1.000713 &               0.899672 &                       0.762890 &                       1.036453 &                 0.899672 &                         0.762890 &                         1.036453 &                 0.899672 &                         0.762890 &                         1.036453 &           1.000215 &                   0.999717 &                   1.000713 &           1.000215 &                   0.999717 &                   1.000713 &                 1.000215 &                         0.999717 &                         1.000713 \\
81.791678   &                             1.001171 &                                     1.000460 &                                     1.001881 &                          1.001171 &                                  1.000460 &                                  1.001881 &           1.001171 &                   1.000460 &                   1.001881 &               0.900600 &                       0.763831 &                       1.037369 &                 0.900600 &                         0.763831 &                         1.037369 &                 0.900600 &                         0.763831 &                         1.037369 &           1.001171 &                   1.000460 &                   1.001881 &           1.001171 &                   1.000460 &                   1.001881 &                 1.001171 &                         1.000460 &                         1.001881 \\
83.105104   &                             1.002229 &                                     1.001278 &                                     1.003180 &                          1.002229 &                                  1.001278 &                                  1.003180 &           1.002229 &                   1.001278 &                   1.003180 &               0.901907 &                       0.765121 &                       1.038693 &                 0.901907 &                         0.765121 &                         1.038693 &                 0.901907 &                         0.765121 &                         1.038693 &           1.002229 &                   1.001278 &                   1.003180 &           1.002229 &                   1.001278 &                   1.003180 &                 1.002229 &                         1.001278 &                         1.003180 \\
84.418529   &                             1.003228 &                                     1.002063 &                                     1.004392 &                          1.003228 &                                  1.002063 &                                  1.004392 &           1.003228 &                   1.002063 &                   1.004392 &               0.903578 &                       0.766733 &                       1.040424 &                 0.903578 &                         0.766733 &                         1.040424 &                 0.903578 &                         0.766733 &                         1.040424 &           1.003228 &                   1.002063 &                   1.004392 &           1.003228 &                   1.002063 &                   1.004392 &                 1.003228 &                         1.002063 &                         1.004392 \\
85.731955   &                             1.004005 &                                     1.002693 &                                     1.005317 &                          1.004005 &                                  1.002693 &                                  1.005317 &           1.004005 &                   1.002693 &                   1.005317 &               0.905600 &                       0.768637 &                       1.042563 &                 0.905600 &                         0.768637 &                         1.042563 &                 0.905600 &                         0.768637 &                         1.042563 &           1.004005 &                   1.002693 &                   1.005317 &           1.004005 &                   1.002693 &                   1.005317 &                 1.004005 &                         1.002693 &                         1.005317 \\
87.045381   &                             1.004474 &                                     1.003093 &                                     1.005856 &                          1.004474 &                                  1.003093 &                                  1.005856 &           1.004474 &                   1.003093 &                   1.005856 &               0.907953 &                       0.770801 &                       1.045105 &                 0.907953 &                         0.770801 &                         1.045105 &                 0.907953 &                         0.770801 &                         1.045105 &           1.004474 &                   1.003093 &                   1.005856 &           1.004474 &                   1.003093 &                   1.005856 &                 1.004474 &                         1.003093 &                         1.005856 \\
88.358807   &                             1.004659 &                                     1.003270 &                                     1.006049 &                          1.004659 &                                  1.003270 &                                  1.006049 &           1.004659 &                   1.003270 &                   1.006049 &               0.910611 &                       0.773186 &                       1.048035 &                 0.910611 &                         0.773186 &                         1.048035 &                 0.910611 &                         0.773186 &                         1.048035 &           1.004659 &                   1.003270 &                   1.006049 &           1.004659 &                   1.003270 &                   1.006049 &                 1.004659 &                         1.003270 &                         1.006049 \\
89.672233   &                             1.004593 &                                     1.003239 &                                     1.005947 &                          1.004593 &                                  1.003239 &                                  1.005947 &           1.004593 &                   1.003239 &                   1.005947 &               0.913546 &                       0.775758 &                       1.051334 &                 0.913546 &                         0.775758 &                         1.051334 &                 0.913546 &                         0.775758 &                         1.051334 &           1.004593 &                   1.003239 &                   1.005947 &           1.004593 &                   1.003239 &                   1.005947 &                 1.004593 &                         1.003239 &                         1.005947 \\
90.985658   &                             1.004308 &                                     1.003021 &                                     1.005595 &                          1.004308 &                                  1.003021 &                                  1.005595 &           1.004308 &                   1.003021 &                   1.005595 &               0.916731 &                       0.778486 &                       1.054976 &                 0.916731 &                         0.778486 &                         1.054976 &                 0.916731 &                         0.778486 &                         1.054976 &           1.004308 &                   1.003021 &                   1.005595 &           1.004308 &                   1.003021 &                   1.005595 &                 1.004308 &                         1.003021 &                         1.005595 \\
92.299084   &                             1.003837 &                                     1.002644 &                                     1.005030 &                          1.003837 &                                  1.002644 &                                  1.005030 &           1.003837 &                   1.002644 &                   1.005030 &               0.920139 &                       0.781346 &                       1.058932 &                 0.920139 &                         0.781346 &                         1.058932 &                 0.920139 &                         0.781346 &                         1.058932 &           1.003837 &                   1.002644 &                   1.005030 &           1.003837 &                   1.002644 &                   1.005030 &                 1.003837 &                         1.002644 &                         1.005030 \\
93.612510   &                             1.003214 &                                     1.002144 &                                     1.004284 &                          1.003214 &                                  1.002144 &                                  1.004284 &           1.003214 &                   1.002144 &                   1.004284 &               0.923742 &                       0.784317 &                       1.063167 &                 0.923742 &                         0.784317 &                         1.063167 &                 0.923742 &                         0.784317 &                         1.063167 &           1.003214 &                   1.002144 &                   1.004284 &           1.003214 &                   1.002144 &                   1.004284 &                 1.003214 &                         1.002144 &                         1.004284 \\
94.925936   &                             1.002490 &                                     1.001572 &                                     1.003408 &                          1.002490 &                                  1.001572 &                                  1.003408 &           1.002490 &                   1.001572 &                   1.003408 &               0.927500 &                       0.787375 &                       1.067625 &                 0.927500 &                         0.787375 &                         1.067625 &                 0.927500 &                         0.787375 &                         1.067625 &           1.002490 &                   1.001572 &                   1.003408 &           1.002490 &                   1.001572 &                   1.003408 &                 1.002490 &                         1.001572 &                         1.003408 \\
96.239362   &                             1.001735 &                                     1.000988 &                                     1.002483 &                          1.001735 &                                  1.000988 &                                  1.002483 &           1.001735 &                   1.000988 &                   1.002483 &               0.931359 &                       0.790486 &                       1.072233 &                 0.931359 &                         0.790486 &                         1.072233 &                 0.931359 &                         0.790486 &                         1.072233 &           1.001735 &                   1.000988 &                   1.002483 &           1.001735 &                   1.000988 &                   1.002483 &                 1.001735 &                         1.000988 &                         1.002483 \\
97.552787   &                             1.001020 &                                     1.000446 &                                     1.001594 &                          1.001020 &                                  1.000446 &                                  1.001594 &           1.001020 &                   1.000446 &                   1.001594 &               0.935268 &                       0.793621 &                       1.076915 &                 0.935268 &                         0.793621 &                         1.076915 &                 0.935268 &                         0.793621 &                         1.076915 &           1.001020 &                   1.000446 &                   1.001594 &           1.001020 &                   1.000446 &                   1.001594 &                 1.001020 &                         1.000446 &                         1.001594 \\
98.866213   &                             1.000414 &                                     0.999997 &                                     1.000831 &                          1.000414 &                                  0.999997 &                                  1.000831 &           1.000414 &                   0.999997 &                   1.000831 &               0.939173 &                       0.796754 &                       1.081592 &                 0.939173 &                         0.796754 &                         1.081592 &                 0.939173 &                         0.796754 &                         1.081592 &           1.000414 &                   0.999997 &                   1.000831 &           1.000414 &                   0.999997 &                   1.000831 &                 1.000414 &                         0.999997 &                         1.000831 \\
100.179639  &                             0.999988 &                                     0.999682 &                                     1.000293 &                          0.999988 &                                  0.999682 &                                  1.000293 &           0.999988 &                   0.999682 &                   1.000293 &               0.943022 &                       0.799858 &                       1.086186 &                 0.943022 &                         0.799858 &                         1.086186 &                 0.943022 &                         0.799858 &                         1.086186 &           0.999988 &                   0.999682 &                   1.000293 &           0.999988 &                   0.999682 &                   1.000293 &                 0.999988 &                         0.999682 &                         1.000293 \\
101.493065  &                             0.999802 &                                     0.999524 &                                     1.000080 &                          0.999802 &                                  0.999524 &                                  1.000080 &           0.999802 &                   0.999524 &                   1.000080 &               0.946762 &                       0.802907 &                       1.090618 &                 0.946762 &                         0.802907 &                         1.090618 &                 0.946762 &                         0.802907 &                         1.090618 &           0.999802 &                   0.999524 &                   1.000080 &           0.999802 &                   0.999524 &                   1.000080 &                 0.999802 &                         0.999524 &                         1.000080 \\
102.806491  &                             0.999834 &                                     0.999493 &                                     1.000175 &                          0.999834 &                                  0.999493 &                                  1.000175 &           0.999834 &                   0.999493 &                   1.000175 &               0.950347 &                       0.805866 &                       1.094828 &                 0.950347 &                         0.805866 &                         1.094828 &                 0.950347 &                         0.805866 &                         1.094828 &           0.999834 &                   0.999493 &                   1.000175 &           0.999834 &                   0.999493 &                   1.000175 &                 0.999834 &                         0.999493 &                         1.000175 \\
104.119916  &                             1.000010 &                                     0.999565 &                                     1.000455 &                          1.000010 &                                  0.999565 &                                  1.000455 &           1.000010 &                   0.999565 &                   1.000455 &               0.953735 &                       0.808700 &                       1.098770 &                 0.953735 &                         0.808700 &                         1.098770 &                 0.953735 &                         0.808700 &                         1.098770 &           1.000010 &                   0.999565 &                   1.000455 &           1.000010 &                   0.999565 &                   1.000455 &                 1.000010 &                         0.999565 &                         1.000455 \\
105.433342  &                             1.000256 &                                     0.999708 &                                     1.000805 &                          1.000256 &                                  0.999708 &                                  1.000805 &           1.000256 &                   0.999708 &                   1.000805 &               0.956883 &                       0.811368 &                       1.102398 &                 0.956883 &                         0.811368 &                         1.102398 &                 0.956883 &                         0.811368 &                         1.102398 &           1.000256 &                   0.999708 &                   1.000805 &           1.000256 &                   0.999708 &                   1.000805 &                 1.000256 &                         0.999708 &                         1.000805 \\
106.746768  &                             1.000499 &                                     0.999874 &                                     1.001123 &                          1.000499 &                                  0.999874 &                                  1.001123 &           1.000499 &                   0.999874 &                   1.001123 &               0.959748 &                       0.813830 &                       1.105667 &                 0.959748 &                         0.813830 &                         1.105667 &                 0.959748 &                         0.813830 &                         1.105667 &           1.000499 &                   0.999874 &                   1.001123 &           1.000499 &                   0.999874 &                   1.001123 &                 1.000499 &                         0.999874 &                         1.001123 \\
108.060194  &                             1.000663 &                                     1.000009 &                                     1.001317 &                          1.000663 &                                  1.000009 &                                  1.001317 &           1.000663 &                   1.000009 &                   1.001317 &               0.962288 &                       0.816043 &                       1.108534 &                 0.962288 &                         0.816043 &                         1.108534 &                 0.962288 &                         0.816043 &                         1.108534 &           1.000663 &                   1.000009 &                   1.001317 &           1.000663 &                   1.000009 &                   1.001317 &                 1.000663 &                         1.000009 &                         1.001317 \\
109.373620  &                             1.000690 &                                     1.000066 &                                     1.001313 &                          1.000690 &                                  1.000066 &                                  1.001313 &           1.000690 &                   1.000066 &                   1.001313 &               0.964462 &                       0.817967 &                       1.110958 &                 0.964462 &                         0.817967 &                         1.110958 &                 0.964462 &                         0.817967 &                         1.110958 &           1.000690 &                   1.000066 &                   1.001313 &           1.000690 &                   1.000066 &                   1.001313 &                 1.000690 &                         1.000066 &                         1.001313 \\
110.687045  &                             1.000595 &                                     1.000045 &                                     1.001145 &                          1.000595 &                                  1.000045 &                                  1.001145 &           1.000595 &                   1.000045 &                   1.001145 &               0.966238 &                       0.819565 &                       1.112910 &                 0.966238 &                         0.819565 &                         1.112910 &                 0.966238 &                         0.819565 &                         1.112910 &           1.000595 &                   1.000045 &                   1.001145 &           1.000595 &                   1.000045 &                   1.001145 &                 1.000595 &                         1.000045 &                         1.001145 \\
112.000471  &                             1.000425 &                                     0.999962 &                                     1.000888 &                          1.000425 &                                  0.999962 &                                  1.000888 &           1.000425 &                   0.999962 &                   1.000888 &               0.967585 &                       0.820805 &                       1.114365 &                 0.967585 &                         0.820805 &                         1.114365 &                 0.967585 &                         0.820805 &                         1.114365 &           1.000425 &                   0.999962 &                   1.000888 &           1.000425 &                   0.999962 &                   1.000888 &                 1.000425 &                         0.999962 &                         1.000888 \\
113.313897  &                             1.000224 &                                     0.999836 &                                     1.000612 &                          1.000224 &                                  0.999836 &                                  1.000612 &           1.000224 &                   0.999836 &                   1.000612 &               0.968474 &                       0.821654 &                       1.115294 &                 0.968474 &                         0.821654 &                         1.115294 &                 0.968474 &                         0.821654 &                         1.115294 &           1.000224 &                   0.999836 &                   1.000612 &           1.000224 &                   0.999836 &                   1.000612 &                 1.000224 &                         0.999836 &                         1.000612 \\
114.627323  &                             1.000036 &                                     0.999698 &                                     1.000374 &                          1.000036 &                                  0.999698 &                                  1.000374 &           1.000036 &                   0.999698 &                   1.000374 &               0.968876 &                       0.822085 &                       1.115667 &                 0.968876 &                         0.822085 &                         1.115667 &                 0.968876 &                         0.822085 &                         1.115667 &           1.000036 &                   0.999698 &                   1.000374 &           1.000036 &                   0.999698 &                   1.000374 &                 1.000036 &                         0.999698 &                         1.000374 \\
115.940749  &                             0.999907 &                                     0.999605 &                                     1.000208 &                          0.999907 &                                  0.999605 &                                  1.000208 &           0.999907 &                   0.999605 &                   1.000208 &               0.968761 &                       0.822070 &                       1.115452 &                 0.968761 &                         0.822070 &                         1.115452 &                 0.968761 &                         0.822070 &                         1.115452 &           0.999907 &                   0.999605 &                   1.000208 &           0.999907 &                   0.999605 &                   1.000208 &                 0.999907 &                         0.999605 &                         1.000208 \\
117.254174  &                             0.999870 &                                     0.999607 &                                     1.000133 &                          0.999870 &                                  0.999607 &                                  1.000133 &           0.999870 &                   0.999607 &                   1.000133 &               0.968107 &                       0.821590 &                       1.114625 &                 0.968107 &                         0.821590 &                         1.114625 &                 0.968107 &                         0.821590 &                         1.114625 &           0.999870 &                   0.999607 &                   1.000133 &           0.999870 &                   0.999607 &                   1.000133 &                 0.999870 &                         0.999607 &                         1.000133 \\
118.567600  &                             0.999925 &                                     0.999670 &                                     1.000179 &                          0.999925 &                                  0.999670 &                                  1.000179 &           0.999925 &                   0.999670 &                   1.000179 &               0.966914 &                       0.820637 &                       1.113192 &                 0.966914 &                         0.820637 &                         1.113192 &                 0.966914 &                         0.820637 &                         1.113192 &           0.999925 &                   0.999670 &                   1.000179 &           0.999925 &                   0.999670 &                   1.000179 &                 0.999925 &                         0.999670 &                         1.000179 \\
119.881026  &                             1.000062 &                                     0.999756 &                                     1.000368 &                          1.000062 &                                  0.999756 &                                  1.000368 &           1.000062 &                   0.999756 &                   1.000368 &               0.965188 &                       0.819209 &                       1.111166 &                 0.965188 &                         0.819209 &                         1.111166 &                 0.965188 &                         0.819209 &                         1.111166 &           1.000062 &                   0.999756 &                   1.000368 &           1.000062 &                   0.999756 &                   1.000368 &                 1.000062 &                         0.999756 &                         1.000368 \\
121.194452  &                             1.000273 &                                     0.999882 &                                     1.000664 &                          1.000273 &                                  0.999882 &                                  1.000664 &           1.000273 &                   0.999882 &                   1.000664 &               0.962933 &                       0.817308 &                       1.108557 &                 0.962933 &                         0.817308 &                         1.108557 &                 0.962933 &                         0.817308 &                         1.108557 &           1.000273 &                   0.999882 &                   1.000664 &           1.000273 &                   0.999882 &                   1.000664 &                 1.000273 &                         0.999882 &                         1.000664 \\
122.507878  &                             1.000548 &                                     1.000084 &                                     1.001013 &                          1.000548 &                                  1.000084 &                                  1.001013 &           1.000548 &                   1.000084 &                   1.001013 &               0.960155 &                       0.814938 &                       1.105372 &                 0.960155 &                         0.814938 &                         1.105372 &                 0.960155 &                         0.814938 &                         1.105372 &           1.000548 &                   1.000084 &                   1.001013 &           1.000548 &                   1.000084 &                   1.001013 &                 1.000548 &                         1.000084 &                         1.001013 \\
123.821303  &                             1.000879 &                                     1.000388 &                                     1.001371 &                          1.000879 &                                  1.000388 &                                  1.001371 &           1.000879 &                   1.000388 &                   1.001371 &               0.956860 &                       0.812105 &                       1.101614 &                 0.956860 &                         0.812105 &                         1.101614 &                 0.956860 &                         0.812105 &                         1.101614 &           1.000879 &                   1.000388 &                   1.001371 &           1.000879 &                   1.000388 &                   1.001371 &                 1.000879 &                         1.000388 &                         1.001371 \\
125.134729  &                             1.001207 &                                     1.000747 &                                     1.001668 &                          1.001207 &                                  1.000747 &                                  1.001668 &           1.001207 &                   1.000747 &                   1.001668 &               0.953063 &                       0.808828 &                       1.097299 &                 0.953063 &                         0.808828 &                         1.097299 &                 0.953063 &                         0.808828 &                         1.097299 &           1.001207 &                   1.000747 &                   1.001668 &           1.001207 &                   1.000747 &                   1.001668 &                 1.001207 &                         1.000747 &                         1.001668 \\
126.448155  &                             1.001373 &                                     1.000979 &                                     1.001767 &                          1.001373 &                                  1.000979 &                                  1.001767 &           1.001373 &                   1.000979 &                   1.001767 &               0.948807 &                       0.805147 &                       1.092467 &                 0.948807 &                         0.805147 &                         1.092467 &                 0.948807 &                         0.805147 &                         1.092467 &           1.001373 &                   1.000979 &                   1.001767 &           1.001373 &                   1.000979 &                   1.001767 &                 1.001373 &                         1.000979 &                         1.001767 \\
127.761581  &                             1.001205 &                                     1.000877 &                                     1.001534 &                          1.001205 &                                  1.000877 &                                  1.001534 &           1.001205 &                   1.000877 &                   1.001534 &               0.944133 &                       0.801106 &                       1.087160 &                 0.944133 &                         0.801106 &                         1.087160 &                 0.944133 &                         0.801106 &                         1.087160 &           1.001205 &                   1.000877 &                   1.001534 &           1.001205 &                   1.000877 &                   1.001534 &                 1.001205 &                         1.000877 &                         1.001534 \\
129.075007  &                             1.000532 &                                     1.000223 &                                     1.000841 &                          1.000532 &                                  1.000223 &                                  1.000841 &           1.000532 &                   1.000223 &                   1.000841 &               0.939085 &                       0.796750 &                       1.081420 &                 0.939085 &                         0.796750 &                         1.081420 &                 0.939085 &                         0.796750 &                         1.081420 &           1.000532 &                   1.000223 &                   1.000841 &           1.000532 &                   1.000223 &                   1.000841 &                 1.000532 &                         1.000223 &                         1.000841 \\
130.388432  &                             0.999184 &                                     0.998837 &                                     0.999530 &                          0.999184 &                                  0.998837 &                                  0.999530 &           0.999184 &                   0.998837 &                   0.999530 &               0.933706 &                       0.792127 &                       1.075286 &                 0.933706 &                         0.792127 &                         1.075286 &                 0.933706 &                         0.792127 &                         1.075286 &           0.999184 &                   0.998837 &                   0.999530 &           0.999184 &                   0.998837 &                   0.999530 &                 0.999184 &                         0.998837 &                         0.999530 \\
131.701858  &                             0.996991 &                                     0.996591 &                                     0.997392 &                          0.996991 &                                  0.996591 &                                  0.997392 &           0.996991 &                   0.996591 &                   0.997392 &               0.928040 &                       0.787282 &                       1.068798 &                 0.928040 &                         0.787282 &                         1.068798 &                 0.928040 &                         0.787282 &                         1.068798 &           0.996991 &                   0.996591 &                   0.997392 &           0.996991 &                   0.996591 &                   0.997392 &                 0.996991 &                         0.996591 &                         0.997392 \\
133.015284  &                             0.993915 &                                     0.993477 &                                     0.994352 &                          0.993915 &                                  0.993477 &                                  0.994352 &           0.993915 &                   0.993477 &                   0.994352 &               0.922140 &                       0.782269 &                       1.062011 &                 0.922140 &                         0.782269 &                         1.062011 &                 0.922140 &                         0.782269 &                         1.062011 &           0.993915 &                   0.993477 &                   0.994352 &           0.993915 &                   0.993477 &                   0.994352 &                 0.993915 &                         0.993477 &                         0.994352 \\
134.328710  &                             0.990074 &                                     0.989625 &                                     0.990524 &                          0.990074 &                                  0.989625 &                                  0.990524 &           0.990074 &                   0.989625 &                   0.990524 &               0.916076 &                       0.777145 &                       1.055008 &                 0.916076 &                         0.777145 &                         1.055008 &                 0.916076 &                         0.777145 &                         1.055008 &           0.990074 &                   0.989625 &                   0.990524 &           0.990074 &                   0.989625 &                   0.990524 &                 0.990074 &                         0.989625 &                         0.990524 \\
135.642136  &                             0.985600 &                                     0.985162 &                                     0.986039 &                          0.985600 &                                  0.985162 &                                  0.986039 &           0.985600 &                   0.985162 &                   0.986039 &               0.909917 &                       0.771963 &                       1.047872 &                 0.909917 &                         0.771963 &                         1.047872 &                 0.909917 &                         0.771963 &                         1.047872 &           0.985600 &                   0.985162 &                   0.986039 &           0.985600 &                   0.985162 &                   0.986039 &                 0.985600 &                         0.985162 &                         0.986039 \\
136.955561  &                             0.980623 &                                     0.980214 &                                     0.981032 &                          0.980623 &                                  0.980214 &                                  0.981032 &           0.980623 &                   0.980214 &                   0.981032 &               0.903734 &                       0.766778 &                       1.040689 &                 0.903734 &                         0.766778 &                         1.040689 &                 0.903734 &                         0.766778 &                         1.040689 &           0.980623 &                   0.980214 &                   0.981032 &           0.980623 &                   0.980214 &                   0.981032 &                 0.980623 &                         0.980214 &                         0.981032 \\
138.268987  &                             0.975273 &                                     0.974905 &                                     0.975641 &                          0.975273 &                                  0.974905 &                                  0.975641 &           0.975273 &                   0.974905 &                   0.975641 &               0.897594 &                       0.761642 &                       1.033546 &                 0.897594 &                         0.761642 &                         1.033546 &                 0.897594 &                         0.761642 &                         1.033546 &           0.975273 &                   0.974905 &                   0.975641 &           0.975273 &                   0.974905 &                   0.975641 &                 0.975273 &                         0.974905 &                         0.975641 \\
139.582413  &                             0.969681 &                                     0.969358 &                                     0.970004 &                          0.969681 &                                  0.969358 &                                  0.970004 &           0.969681 &                   0.969358 &                   0.970004 &               0.891568 &                       0.756607 &                       1.026529 &                 0.891568 &                         0.756607 &                         1.026529 &                 0.891568 &                         0.756607 &                         1.026529 &           0.969681 &                   0.969358 &                   0.970004 &           0.969681 &                   0.969358 &                   0.970004 &                 0.969681 &                         0.969358 &                         0.970004 \\
140.895839  &                             0.963986 &                                     0.963706 &                                     0.964267 &                          0.963986 &                                  0.963706 &                                  0.964267 &           0.963986 &                   0.963706 &                   0.964267 &               0.885716 &                       0.751719 &                       1.019713 &                 0.885716 &                         0.751719 &                         1.019713 &                 0.885716 &                         0.751719 &                         1.019713 &           0.963986 &                   0.963706 &                   0.964267 &           0.963986 &                   0.963706 &                   0.964267 &                 0.963986 &                         0.963706 &                         0.964267 \\
142.209265  &                             0.958335 &                                     0.958089 &                                     0.958581 &                          0.958335 &                                  0.958089 &                                  0.958581 &           0.958335 &                   0.958089 &                   0.958581 &               0.880092 &                       0.747015 &                       1.013169 &                 0.880092 &                         0.747015 &                         1.013169 &                 0.880092 &                         0.747015 &                         1.013169 &           0.958335 &                   0.958089 &                   0.958581 &           0.958335 &                   0.958089 &                   0.958581 &                 0.958335 &                         0.958089 &                         0.958581 \\
143.522690  &                             0.952874 &                                     0.952648 &                                     0.953100 &                          0.952874 &                                  0.952648 &                                  0.953100 &           0.952874 &                   0.952648 &                   0.953100 &               0.874749 &                       0.742535 &                       1.006963 &                 0.874749 &                         0.742535 &                         1.006963 &                 0.874749 &                         0.742535 &                         1.006963 &           0.952874 &                   0.952648 &                   0.953100 &           0.952874 &                   0.952648 &                   0.953100 &                 0.952874 &                         0.952648 &                         0.953100 \\
144.836116  &                             0.947749 &                                     0.947528 &                                     0.947969 &                          0.947749 &                                  0.947528 &                                  0.947969 &           0.947749 &                   0.947528 &                   0.947969 &               0.869742 &                       0.738322 &                       1.001161 &                 0.869742 &                         0.738322 &                         1.001161 &                 0.869742 &                         0.738322 &                         1.001161 &           0.947749 &                   0.947528 &                   0.947969 &           0.947749 &                   0.947528 &                   0.947969 &                 0.947749 &                         0.947528 &                         0.947969 \\
146.149542  &                             0.943106 &                                     0.942882 &                                     0.943331 &                          0.943106 &                                  0.942882 &                                  0.943331 &           0.943106 &                   0.942882 &                   0.943331 &               0.865123 &                       0.734419 &                       0.995826 &                 0.865123 &                         0.734419 &                         0.995826 &                 0.865123 &                         0.734419 &                         0.995826 &           0.943106 &                   0.942882 &                   0.943331 &           0.943106 &                   0.942882 &                   0.943331 &                 0.943106 &                         0.942882 &                         0.943331 \\
147.462968  &                             0.939085 &                                     0.938854 &                                     0.939316 &                          0.939085 &                                  0.938854 &                                  0.939316 &           0.939085 &                   0.938854 &                   0.939316 &               0.860943 &                       0.730870 &                       0.991017 &                 0.860943 &                         0.730870 &                         0.991017 &                 0.860943 &                         0.730870 &                         0.991017 &           0.939085 &                   0.938854 &                   0.939316 &           0.939085 &                   0.938854 &                   0.939316 &                 0.939085 &                         0.938854 &                         0.939316 \\
148.776394  &                             0.935753 &                                     0.935519 &                                     0.935987 &                          0.935753 &                                  0.935519 &                                  0.935987 &           0.935753 &                   0.935519 &                   0.935987 &               0.857232 &                       0.727699 &                       0.986766 &                 0.857232 &                         0.727699 &                         0.986766 &                 0.857232 &                         0.727699 &                         0.986766 &           0.935753 &                   0.935519 &                   0.935987 &           0.935753 &                   0.935519 &                   0.935987 &                 0.935753 &                         0.935519 &                         0.935987 \\
150.089819  &                             0.933148 &                                     0.932914 &                                     0.933381 &                          0.933148 &                                  0.932914 &                                  0.933381 &           0.933148 &                   0.932914 &                   0.933381 &               0.854008 &                       0.724925 &                       0.983090 &                 0.854008 &                         0.724925 &                         0.983090 &                 0.854008 &                         0.724925 &                         0.983090 &           0.933148 &                   0.932914 &                   0.933381 &           0.933148 &                   0.932914 &                   0.933381 &                 0.933148 &                         0.932914 &                         0.933381 \\
151.403245  &                             0.931303 &                                     0.931073 &                                     0.931532 &                          0.931303 &                                  0.931073 &                                  0.931532 &           0.931303 &                   0.931073 &                   0.931532 &               0.851286 &                       0.722567 &                       0.980005 &                 0.851286 &                         0.722567 &                         0.980005 &                 0.851286 &                         0.722567 &                         0.980005 &           0.931303 &                   0.931073 &                   0.931532 &           0.931303 &                   0.931073 &                   0.931532 &                 0.931303 &                         0.931073 &                         0.931532 \\
152.716671  &                             0.930254 &                                     0.930030 &                                     0.930479 &                          0.930254 &                                  0.930030 &                                  0.930479 &           0.930254 &                   0.930030 &                   0.930479 &               0.849086 &                       0.720644 &                       0.977529 &                 0.849086 &                         0.720644 &                         0.977529 &                 0.849086 &                         0.720644 &                         0.977529 &           0.930254 &                   0.930030 &                   0.930479 &           0.930254 &                   0.930030 &                   0.930479 &                 0.930254 &                         0.930030 &                         0.930479 \\
154.030097  &                             0.930037 &                                     0.929817 &                                     0.930257 &                          0.930037 &                                  0.929817 &                                  0.930257 &           0.930037 &                   0.929817 &                   0.930257 &               0.847426 &                       0.719177 &                       0.975675 &                 0.847426 &                         0.719177 &                         0.975675 &                 0.847426 &                         0.719177 &                         0.975675 &           0.930037 &                   0.929817 &                   0.930257 &           0.930037 &                   0.929817 &                   0.930257 &                 0.930037 &                         0.929817 &                         0.930257 \\
155.343523  &                             0.930670 &                                     0.930453 &                                     0.930888 &                          0.930670 &                                  0.930453 &                                  0.930888 &           0.930670 &                   0.930453 &                   0.930888 &               0.846316 &                       0.718181 &                       0.974451 &                 0.846316 &                         0.718181 &                         0.974451 &                 0.846316 &                         0.718181 &                         0.974451 &           0.930670 &                   0.930453 &                   0.930888 &           0.930670 &                   0.930453 &                   0.930888 &                 0.930670 &                         0.930453 &                         0.930888 \\
156.656948  &                             0.932094 &                                     0.931876 &                                     0.932311 &                          0.932094 &                                  0.931876 &                                  0.932311 &           0.932094 &                   0.931876 &                   0.932311 &               0.845743 &                       0.717649 &                       0.973837 &                 0.845743 &                         0.717649 &                         0.973837 &                 0.845743 &                         0.717649 &                         0.973837 &           0.932094 &                   0.931876 &                   0.932311 &           0.932094 &                   0.931876 &                   0.932311 &                 0.932094 &                         0.931876 &                         0.932311 \\
157.970374  &                             0.934224 &                                     0.934005 &                                     0.934443 &                          0.934224 &                                  0.934005 &                                  0.934443 &           0.934224 &                   0.934005 &                   0.934443 &               0.845684 &                       0.717566 &                       0.973803 &                 0.845684 &                         0.717566 &                         0.973803 &                 0.845684 &                         0.717566 &                         0.973803 &           0.934224 &                   0.934005 &                   0.934443 &           0.934224 &                   0.934005 &                   0.934443 &                 0.934224 &                         0.934005 &                         0.934443 \\
159.283800  &                             0.936977 &                                     0.936755 &                                     0.937198 &                          0.936977 &                                  0.936755 &                                  0.937198 &           0.936977 &                   0.936755 &                   0.937198 &               0.846117 &                       0.717915 &                       0.974320 &                 0.846117 &                         0.717915 &                         0.974320 &                 0.846117 &                         0.717915 &                         0.974320 &           0.936977 &                   0.936755 &                   0.937198 &           0.936977 &                   0.936755 &                   0.937198 &                 0.936977 &                         0.936755 &                         0.937198 \\
160.597226  &                             0.940269 &                                     0.940045 &                                     0.940492 &                          0.940269 &                                  0.940045 &                                  0.940492 &           0.940269 &                   0.940045 &                   0.940492 &               0.847020 &                       0.718679 &                       0.975361 &                 0.847020 &                         0.718679 &                         0.975361 &                 0.847020 &                         0.718679 &                         0.975361 &           0.940269 &                   0.940045 &                   0.940492 &           0.940269 &                   0.940045 &                   0.940492 &                 0.940269 &                         0.940045 &                         0.940492 \\
161.910652  &                             0.944016 &                                     0.943793 &                                     0.944240 &                          0.944016 &                                  0.943793 &                                  0.944240 &           0.944016 &                   0.943793 &                   0.944240 &               0.848370 &                       0.719841 &                       0.976899 &                 0.848370 &                         0.719841 &                         0.976899 &                 0.848370 &                         0.719841 &                         0.976899 &           0.944016 &                   0.943793 &                   0.944240 &           0.944016 &                   0.943793 &                   0.944240 &                 0.944016 &                         0.943793 &                         0.944240 \\
163.224078  &                             0.948133 &                                     0.947911 &                                     0.948356 &                          0.948133 &                                  0.947911 &                                  0.948356 &           0.948133 &                   0.947911 &                   0.948356 &               0.850138 &                       0.721375 &                       0.978902 &                 0.850138 &                         0.721375 &                         0.978902 &                 0.850138 &                         0.721375 &                         0.978902 &           0.948133 &                   0.947911 &                   0.948356 &           0.948133 &                   0.947911 &                   0.948356 &                 0.948133 &                         0.947911 &                         0.948356 \\
164.537503  &                             0.952527 &                                     0.952306 &                                     0.952748 &                          0.952527 &                                  0.952306 &                                  0.952748 &           0.952527 &                   0.952306 &                   0.952748 &               0.852276 &                       0.723237 &                       0.981316 &                 0.852276 &                         0.723237 &                         0.981316 &                 0.852276 &                         0.723237 &                         0.981316 &           0.952527 &                   0.952306 &                   0.952748 &           0.952527 &                   0.952306 &                   0.952748 &                 0.952527 &                         0.952306 &                         0.952748 \\
165.850929  &                             0.957102 &                                     0.956880 &                                     0.957324 &                          0.957102 &                                  0.956880 &                                  0.957324 &           0.957102 &                   0.956880 &                   0.957324 &               0.854733 &                       0.725378 &                       0.984087 &                 0.854733 &                         0.725378 &                         0.984087 &                 0.854733 &                         0.725378 &                         0.984087 &           0.957102 &                   0.956880 &                   0.957324 &           0.957102 &                   0.956880 &                   0.957324 &                 0.957102 &                         0.956880 &                         0.957324 \\
167.164355  &                             0.961765 &                                     0.961538 &                                     0.961992 &                          0.961765 &                                  0.961538 &                                  0.961992 &           0.961765 &                   0.961538 &                   0.961992 &               0.857456 &                       0.727752 &                       0.987161 &                 0.857456 &                         0.727752 &                         0.987161 &                 0.857456 &                         0.727752 &                         0.987161 &           0.961765 &                   0.961538 &                   0.961992 &           0.961765 &                   0.961538 &                   0.961992 &                 0.961765 &                         0.961538 &                         0.961992 \\
168.477781  &                             0.966421 &                                     0.966183 &                                     0.966660 &                          0.966421 &                                  0.966183 &                                  0.966660 &           0.966421 &                   0.966183 &                   0.966660 &               0.860395 &                       0.730308 &                       0.990482 &                 0.860395 &                         0.730308 &                         0.990482 &                 0.860395 &                         0.730308 &                         0.990482 &           0.966421 &                   0.966183 &                   0.966660 &           0.966421 &                   0.966183 &                   0.966660 &                 0.966421 &                         0.966183 &                         0.966660 \\
169.791207  &                             0.970976 &                                     0.970719 &                                     0.971233 &                          0.970976 &                                  0.970719 &                                  0.971233 &           0.970976 &                   0.970719 &                   0.971233 &               0.863497 &                       0.733000 &                       0.993995 &                 0.863497 &                         0.733000 &                         0.993995 &                 0.863497 &                         0.733000 &                         0.993995 &           0.970976 &                   0.970719 &                   0.971233 &           0.970976 &                   0.970719 &                   0.971233 &                 0.970976 &                         0.970719 &                         0.971233 \\
171.104632  &                             0.975363 &                                     0.975080 &                                     0.975645 &                          0.975363 &                                  0.975080 &                                  0.975645 &           0.975363 &                   0.975080 &                   0.975645 &               0.866709 &                       0.735776 &                       0.997643 &                 0.866709 &                         0.735776 &                         0.997643 &                 0.866709 &                         0.735776 &                         0.997643 &           0.975363 &                   0.975080 &                   0.975645 &           0.975363 &                   0.975080 &                   0.975645 &                 0.975363 &                         0.975080 &                         0.975645 \\
172.418058  &                             0.979557 &                                     0.979244 &                                     0.979871 &                          0.979557 &                                  0.979244 &                                  0.979871 &           0.979557 &                   0.979244 &                   0.979871 &               0.869972 &                       0.738582 &                       1.001362 &                 0.869972 &                         0.738582 &                         1.001362 &                 0.869972 &                         0.738582 &                         1.001362 &           0.979557 &                   0.979244 &                   0.979871 &           0.979557 &                   0.979244 &                   0.979871 &                 0.979557 &                         0.979244 &                         0.979871 \\
173.731484  &                             0.983542 &                                     0.983196 &                                     0.983889 &                          0.983542 &                                  0.983196 &                                  0.983889 &           0.983542 &                   0.983196 &                   0.983889 &               0.873226 &                       0.741366 &                       1.005086 &                 0.873226 &                         0.741366 &                         1.005086 &                 0.873226 &                         0.741366 &                         1.005086 &           0.983542 &                   0.983196 &                   0.983889 &           0.983542 &                   0.983196 &                   0.983889 &                 0.983542 &                         0.983196 &                         0.983889 \\
175.044910  &                             0.987300 &                                     0.986920 &                                     0.987680 &                          0.987300 &                                  0.986920 &                                  0.987680 &           0.987300 &                   0.986920 &                   0.987680 &               0.876413 &                       0.744077 &                       1.008749 &                 0.876413 &                         0.744077 &                         1.008749 &                 0.876413 &                         0.744077 &                         1.008749 &           0.987300 &                   0.986920 &                   0.987680 &           0.987300 &                   0.986920 &                   0.987680 &                 0.987300 &                         0.986920 &                         0.987680 \\
176.358336  &                             0.990811 &                                     0.990402 &                                     0.991221 &                          0.990811 &                                  0.990402 &                                  0.991221 &           0.990811 &                   0.990402 &                   0.991221 &               0.879473 &                       0.746665 &                       1.012280 &                 0.879473 &                         0.746665 &                         1.012280 &                 0.879473 &                         0.746665 &                         1.012280 &           0.990811 &                   0.990402 &                   0.991221 &           0.990811 &                   0.990402 &                   0.991221 &                 0.990811 &                         0.990402 &                         0.991221 \\
177.671761  &                             0.994058 &                                     0.993625 &                                     0.994492 &                          0.994058 &                                  0.993625 &                                  0.994492 &           0.994058 &                   0.993625 &                   0.994492 &               0.882347 &                       0.749083 &                       1.015611 &                 0.882347 &                         0.749083 &                         1.015611 &                 0.882347 &                         0.749083 &                         1.015611 &           0.994058 &                   0.993625 &                   0.994492 &           0.994058 &                   0.993625 &                   0.994492 &                 0.994058 &                         0.993625 &                         0.994492 \\
178.985187  &                             0.997029 &                                     0.996580 &                                     0.997479 &                          0.997029 &                                  0.996580 &                                  0.997479 &           0.997029 &                   0.996580 &                   0.997479 &               0.884991 &                       0.751296 &                       1.018686 &                 0.884991 &                         0.751296 &                         1.018686 &                 0.884991 &                         0.751296 &                         1.018686 &           0.997029 &                   0.996580 &                   0.997479 &           0.997029 &                   0.996580 &                   0.997479 &                 0.997029 &                         0.996580 &                         0.997479 \\
180.298613  &                             0.999718 &                                     0.999261 &                                     1.000175 &                          0.999718 &                                  0.999261 &                                  1.000175 &           0.999718 &                   0.999261 &                   1.000175 &               0.887373 &                       0.753281 &                       1.021465 &                 0.887373 &                         0.753281 &                         1.021465 &                 0.887373 &                         0.753281 &                         1.021465 &           0.999718 &                   0.999261 &                   1.000175 &           0.999718 &                   0.999261 &                   1.000175 &                 0.999718 &                         0.999261 &                         1.000175 \\
181.612039  &                             1.002118 &                                     1.001661 &                                     1.002574 &                          1.002118 &                                  1.001661 &                                  1.002574 &           1.002118 &                   1.001661 &                   1.002574 &               0.889465 &                       0.755018 &                       1.023912 &                 0.889465 &                         0.755018 &                         1.023912 &                 0.889465 &                         0.755018 &                         1.023912 &           1.002118 &                   1.001661 &                   1.002574 &           1.002118 &                   1.001661 &                   1.002574 &                 1.002118 &                         1.001661 &                         1.002574 \\
182.925465  &                             1.004223 &                                     1.003775 &                                     1.004671 &                          1.004223 &                                  1.003775 &                                  1.004671 &           1.004223 &                   1.003775 &                   1.004671 &               0.891237 &                       0.756484 &                       1.025989 &                 0.891237 &                         0.756484 &                         1.025989 &                 0.891237 &                         0.756484 &                         1.025989 &           1.004223 &                   1.003775 &                   1.004671 &           1.004223 &                   1.003775 &                   1.004671 &                 1.004223 &                         1.003775 &                         1.004671 \\
184.238890  &                             1.006028 &                                     1.005596 &                                     1.006460 &                          1.006028 &                                  1.005596 &                                  1.006460 &           1.006028 &                   1.005596 &                   1.006460 &               0.892658 &                       0.757658 &                       1.027658 &                 0.892658 &                         0.757658 &                         1.027658 &                 0.892658 &                         0.757658 &                         1.027658 &           1.006028 &                   1.005596 &                   1.006460 &           1.006028 &                   1.005596 &                   1.006460 &                 1.006028 &                         1.005596 &                         1.006460 \\
185.552316  &                             1.007526 &                                     1.007116 &                                     1.007936 &                          1.007526 &                                  1.007116 &                                  1.007936 &           1.007526 &                   1.007116 &                   1.007936 &               0.893701 &                       0.758517 &                       1.028885 &                 0.893701 &                         0.758517 &                         1.028885 &                 0.893701 &                         0.758517 &                         1.028885 &           1.007526 &                   1.007116 &                   1.007936 &           1.007526 &                   1.007116 &                   1.007936 &                 1.007526 &                         1.007116 &                         1.007936 \\
186.865742  &                             1.008702 &                                     1.008317 &                                     1.009088 &                          1.008702 &                                  1.008317 &                                  1.009088 &           1.008702 &                   1.008317 &                   1.009088 &               0.894358 &                       0.759057 &                       1.029658 &                 0.894358 &                         0.759057 &                         1.029658 &                 0.894358 &                         0.759057 &                         1.029658 &           1.008702 &                   1.008317 &                   1.009088 &           1.008702 &                   1.008317 &                   1.009088 &                 1.008702 &                         1.008317 &                         1.009088 \\
188.179168  &                             1.009539 &                                     1.009174 &                                     1.009903 &                          1.009539 &                                  1.009174 &                                  1.009903 &           1.009539 &                   1.009174 &                   1.009903 &               0.894634 &                       0.759283 &                       1.029985 &                 0.894634 &                         0.759283 &                         1.029985 &                 0.894634 &                         0.759283 &                         1.029985 &           1.009539 &                   1.009174 &                   1.009903 &           1.009539 &                   1.009174 &                   1.009903 &                 1.009539 &                         1.009174 &                         1.009903 \\
189.492594  &                             1.010015 &                                     1.009664 &                                     1.010366 &                          1.010015 &                                  1.009664 &                                  1.010366 &           1.010015 &                   1.009664 &                   1.010366 &               0.894535 &                       0.759199 &                       1.029870 &                 0.894535 &                         0.759199 &                         1.029870 &                 0.894535 &                         0.759199 &                         1.029870 &           1.010015 &                   1.009664 &                   1.010366 &           1.010015 &                   1.009664 &                   1.010366 &                 1.010015 &                         1.009664 &                         1.010366 \\
190.806019  &                             1.010112 &                                     1.009763 &                                     1.010462 &                          1.010112 &                                  1.009763 &                                  1.010462 &           1.010112 &                   1.009763 &                   1.010462 &               0.894067 &                       0.758812 &                       1.029322 &                 0.894067 &                         0.758812 &                         1.029322 &                 0.894067 &                         0.758812 &                         1.029322 &           1.010112 &                   1.009763 &                   1.010462 &           1.010112 &                   1.009763 &                   1.010462 &                 1.010112 &                         1.009763 &                         1.010462 \\
192.119445  &                             1.009811 &                                     1.009452 &                                     1.010171 &                          1.009811 &                                  1.009452 &                                  1.010171 &           1.009811 &                   1.009452 &                   1.010171 &               0.893236 &                       0.758126 &                       1.028345 &                 0.893236 &                         0.758126 &                         1.028345 &                 0.893236 &                         0.758126 &                         1.028345 &           1.009811 &                   1.009452 &                   1.010171 &           1.009811 &                   1.009452 &                   1.010171 &                 1.009811 &                         1.009452 &                         1.010171 \\
193.432871  &                             1.009097 &                                     1.008717 &                                     1.009476 &                          1.009097 &                                  1.008717 &                                  1.009476 &           1.009097 &                   1.008717 &                   1.009476 &               0.892049 &                       0.757148 &                       1.026949 &                 0.892049 &                         0.757148 &                         1.026949 &                 0.892049 &                         0.757148 &                         1.026949 &           1.009097 &                   1.008717 &                   1.009476 &           1.009097 &                   1.008717 &                   1.009476 &                 1.009097 &                         1.008717 &                         1.009476 \\
194.746297  &                             1.007981 &                                     1.007578 &                                     1.008384 &                          1.007981 &                                  1.007578 &                                  1.008384 &           1.007981 &                   1.007578 &                   1.008384 &               0.890525 &                       0.755893 &                       1.025157 &                 0.890525 &                         0.755893 &                         1.025157 &                 0.890525 &                         0.755893 &                         1.025157 &           1.007981 &                   1.007578 &                   1.008384 &           1.007981 &                   1.007578 &                   1.008384 &                 1.007981 &                         1.007578 &                         1.008384 \\
196.059723  &                             1.006489 &                                     1.006062 &                                     1.006917 &                          1.006489 &                                  1.006062 &                                  1.006917 &           1.006489 &                   1.006062 &                   1.006917 &               0.888689 &                       0.754378 &                       1.023001 &                 0.888689 &                         0.754378 &                         1.023001 &                 0.888689 &                         0.754378 &                         1.023001 &           1.006489 &                   1.006062 &                   1.006917 &           1.006489 &                   1.006062 &                   1.006917 &                 1.006489 &                         1.006062 &                         1.006917 \\
197.373148  &                             1.004646 &                                     1.004200 &                                     1.005093 &                          1.004646 &                                  1.004200 &                                  1.005093 &           1.004646 &                   1.004200 &                   1.005093 &               0.886565 &                       0.752618 &                       1.020511 &                 0.886565 &                         0.752618 &                         1.020511 &                 0.886565 &                         0.752618 &                         1.020511 &           1.004646 &                   1.004200 &                   1.005093 &           1.004646 &                   1.004200 &                   1.005093 &                 1.004646 &                         1.004200 &                         1.005093 \\
198.686574  &                             1.002477 &                                     1.002019 &                                     1.002935 &                          1.002477 &                                  1.002019 &                                  1.002935 &           1.002477 &                   1.002019 &                   1.002935 &               0.884176 &                       0.750632 &                       1.017720 &                 0.884176 &                         0.750632 &                         1.017720 &                 0.884176 &                         0.750632 &                         1.017720 &           1.002477 &                   1.002019 &                   1.002935 &           1.002477 &                   1.002019 &                   1.002935 &                 1.002477 &                         1.002019 &                         1.002935 \\
200.000000  &                             1.000006 &                                     0.999549 &                                     1.000463 &                          1.000006 &                                  0.999549 &                                  1.000463 &           1.000006 &                   0.999549 &                   1.000463 &               0.881547 &                       0.748432 &                       1.014661 &                 0.881547 &                         0.748432 &                         1.014661 &                 0.881547 &                         0.748432 &                         1.014661 &           1.000006 &                   0.999549 &                   1.000463 &           1.000006 &                   0.999549 &                   1.000463 &                 1.000006 &                         0.999549 &                         1.000463 \\
\bottomrule
\end{tabular}
